Copyright: Copyright ｮ 2000 Novell, Inc.


最初のバナー-ｼ
最初のバナー名

プロパティページ：Novell Client環境設定

タブ：デフォルトキャプチャ

バナーページの上半分に印刷する文字列を指定します。最大12文字まで指定することができます。


2番-ﾚのバナー-ｼ
2番目のバナー名

プロパティページ：Novell Client環境設定

タブ：デフォルトキャプチャ

バナーページの下半分に印刷する文字列を指定します。最大12文字まで指定することができます。


使-p�-`_-ﾉ同意する
使用許諾契約に同意する

プロパティページ：インストール環境設定

タブ：セットアップ

Offを指定すると、インストール時に使用許諾契約画面が表示されます。Onを指定すると、使用許諾契約画面は表示されませんが、組織を代表して契約に同意したことになり、組織内のユーザに契約内容を遵守させる義務を負います。


アダプタ

プロパティページ：Novell互換モード

タブ：アダプタ

使用するネットワークアダプタを選択します。


アダプタ（互換モードプロパティページ）
アダプタ

プロパティページ：Novell(r) IPX(tm)互換アダプタ

タブ：パラメータ

設定を変更したいアダプタを選択します。［デフォルト設定］オプションで指定する設定は、［デフォルト設定を使用］ボックスにチェックマークが付いているすべてのアダプタに適用されます。アダプタの［デフォルト設定を使用］ボックスにチェックマークが付いていない場合、デフォルト設定は適用されません。行った変更は、まだ設定されていないすべてのアダプタに適用されます。


検索パスの'ﾇ加
検索パスの追加

プロパティページ：ホストリソースMIB環境設定

タブ：ソフトウェアの検索

ディレクトリを指定して［追加］をクリックすると、指定したディレクトリが［追加の検索パス］リストに追加されます。


［'ﾇ加］ボタン
［追加］ボタン

新しい項目の名前を入力して［追加］をクリックすると、その項目がリストに追加されます。


フレームタイプの'ﾇ加
フレームタイプの追加

プロパティページ：IPX 32ビットプロトコル

タブ：高度なIPX設定

フレームタイプを指定して［追加］をクリックすると、そのフレームタイプがIPXのバインド先の論理ボードのリストに追加されます。


ローカルモデムの'ﾇ加
ローカルモデムの追加

プロパティページ：ホストリソースMIB環境設定

タブ：プリンタとモデム

モデムを指定して［追加］をクリックすると、そのモデムがローカルモデムのリストに追加されます。


ローカルプリンタの'ﾇ加
ローカルプリンタの追加

プロパティページ：ホストリソースMIB環境設定

タブ：プリンタとモデム

プリンタを指定して［追加］をクリックすると、そのプリンタがローカルプリンタのリストに追加されます。


ローカルテープドライブの'ﾇ加
ローカルテープドライブの追加

プロパティページ：ホストリソースMIB環境設定

タブ：テープドライブ

テープドライブを指定して［追加］をクリックすると、そのテープドライブがローカルテープドライブのリストに追加されます。


スコープの'ﾇ加
追加

新しい項目の名前を入力して［追加］をクリックすると、その項目がリストに追加されます。


ツリーとネームコンテキストの'ﾇ加
ツリーとネームコンテキストの追加

プロパティページ：Novell Client環境設定

タブ：クライアント

ツリーとネームコンテキストの組み合わせを追加する場合に、このボタンをクリックしてください。次に、ツリー名とデフォルトのコンテキストを入力し、［OK］をクリックしてください。


コンポーネントの'ﾇ加
コンポーネントの追加

プロパティページ：インストール環境設定

タブ：コンポーネントの追加

クライアントのインストール時に、同時にインストールできるNovell(r)製品の一覧が表示されます。unattended（不在時）インストール時にインストールする項目を選択し、該当するボックスをチェックしてください。


'ﾇ加の検索パス
追加の検索パス

プロパティページ：ホストリソースMIB環境設定

タブ：ソフトウェアの検索

ホストリソースMIBがプログラムファイルを検索するディレクトリを指定します。

ディレクトリの隣にあるボックスがチェックされている場合、そのディレクトリの下のサブディレクトリもすべて検索されます。

［ルートから検索するディレクトリレベル］の設定により検索されるディレクトリに加えて、ここに指定したディレクトリが検索されます。

ネットワーク管理コンソールは、プログラムに関する情報を使用します。この情報は、クライアントワークステーション上のソフトウェアを追跡するために使用することができます。この設定は省略できます。


エージェントリスト失効時間

プロパティページ：Novell(r) IPX(tm)互換アダプタ

タブ：パラメータ

範囲：0～65535（分）

デフォルト：  15

クライアントがマイグレーションエージェントのアドレス情報を更新する最小間隔を指定します。

この設定は、クライアントが動的にマイグレーションエージェントを検出する場合（アクティブディスカバリ機能が設定されている場合）にのみ使用されます。

0を設定すると、クライアントはマイグレーションエージェントを検出した後、マイグレーションエージェントのアドレス情報の更新は行いません。

この設定が高すぎると、クライアントはマイグレーションエージェントが削除されたことを検出できない場合があります。

この設定が低すぎると、クライアントは頻繁にネットワーク情報にアクセスするため、トラフィックが増大する可能性があります。


ユーザバックアップを�-可
ユーザバックアップを許可

プロパティページ：TSA初期設定

タブ：環境設定

このボックスをチェックすると、バックアップユーザにバックアップ権が与えられます。ユーザに与えられる権利は、ユーザが所属するグループによって異なります。


接`ｱウォッチドッグを�-可する
接続ウォッチドッグを許可する

プロパティページ：IPX 32ビットプロトコル

タブ：SPX

デフォルト：On

SPXがアプリケーションの接続ウォッチドッグ要求を受け付けるようにするには、このボックスをチェックしてください。

SPXが接続ウｫッチドッグ要求を無視するようにするには、このボックスのチェックを解除してください。


割込み64HによるIPXアクセスを�-可する
割込み64HによるIPXアクセスを許可する

プロパティページ：IPX 32ビットプロトコル

タブ：IPX

デフォルト：On

DOSアプリケーションに、割込み64Hを使ったIPX(tm)サービスへのアクセスを許可するには、このボックスをチェックしてください。

IPXが割込み64Hを使用しているために、DOSアプリケーションで問題が発生する場合は、このボックスのチェックを解除してください。

アプリケーションに、割込み64Hを使ってIPXサービス以外のサービスへのアクセスを許可するには、このボックスのチェックを解除してください。

アプリケーションが、前のバージョンのNetWare(r)では動作するが、NetWare 3.1ではハングする場合は、このボックスのチェックを解除してください。

アプリケーションが、割込み2FHを使用してFAR（File Address Register）コールアドレスを取得し、そのアドレスでIPXサービスにアクセスする方法をお勧めします。これにより、割込み64Hを使用した衝突を回避できます。


割込み7AHによるIPXアクセスを�-可する
割込み7AHによるIPXアクセスを許可する

プロパティページ：IPX 32ビットプロトコル

タブ：IPX

デフォルト：On

DOSアプリケーションに、割込み7AHを使ったIPX(tm)サービスへのアクセスを許可するには、このボックスをチェックしてください。

IPXが割込み7AHを使用していることにより、DOSアプリケーションで問題が発生する場合は、このボックスのチェックを解除してください。

アプリケーションに、割込み7AHを使ってIPXサービス以外のサービスへのアクセスを許可するには、このボックスのチェックを解除してください。

アプリケーションが、前のバージョンのNetWare(r)では動作するが、NetWare 3.1ではハングする場合は、このボックスのチェックを解除してください。

アプリケーションが、割込み2FHを使用してFAR（File Address Register）コールアドレスを取得し、そのアドレスでIPXサービスにアクセスする方法をお勧めします。これにより、割込み7AHを使用した衝突を回避できます。


完-ｹ時に再起動するかどうかを確認する
完了時に再起動するかどうかを確認する

プロパティページ：インストール環境設定

タブ：セットアップ

デフォルト：On

Onを指定すると、インストールプロセスの終了時に、最後のインストール画面が表示されます。この画面では、インストール内容を有効にするにはワークステーションを再起動する必要があることが通知され、ワークステーションを再起動するかどうかを問い合わせるメッセージが表示されます。

Offを指定すると、インストール完了後、ワークステーションが自動的に再起動します。


NetWare/IPのインストールを確認する

プロパティページ：インストール環境設定

タブ：セットアップ

デフォルト：Off

このパラメータは、［NetWare/IPのインストール］パラメータと関係があります。これらのパラメータの組み合わせと、行われる処理を以下に示します。

AskNetWareIP=No	InstallNetWareIP=No

NetWare/IPをインストールするかどうかを問い合わせるメッセージは表示されず、NetWare/IPがインストールされることもありません。

AskNetWareIP=No	InstallNetWareIP=Yes

インストールするかどうかを問い合わせることなく、NetWare/IPが自動的にインストールされます。

AskNetWareIP=Yes

NetWare/IPをインストールするかどうかを問い合わせるメッセージが表示されます。［はい］または［いいえ］を選択します。［NetWare/IPのインストールを確認する］を［はい］に設定した場合、［NetWare/IPのインストール］パラメータは設定しなくても構いません。ただし、［NetWare/IPのインストール］パラメータを設定することによって、インストールするかどうかを問い合わせるメッセージの、［はい］または［いいえ］ボタンをデフォルトにすることができます。

AskNetWareIP=Yes	InstallNetWareIP=Yes

NetWare/IPをインストールするかどうかを問い合わせるメッセージが表示されます。［はい］ボタンがデフォルトになります。

AskNetWareIP=Yes	InstallNetWareIP=No

NetWare/IPをインストールするかどうかを問い合わせるメッセージが表示されます。［いいえ］ボタンがデフォルトになります。


Microsoft NetWareクライアントの削除を確認する

プロパティページ：インストール環境設定

タブ：セットアップ

デフォルト：Off

Onを指定すると、Microsoftクライアントを削除するかどうかを問い合わせるメッセージがインストール時に表示されます。Offを指定すると、ユーザへの確認なしに、Microsoftクライアントが削除されます。


Novell GINAの使-pを確認する
Novell GINAの使用を確認する

プロパティページ：インストール環境設定

タブ：セットアップ

デフォルト：Off

Onを指定すると、インストール時に、すでにインストールされているサードパーティ製のGINAの代わりにNovell(r) GINAを使用するかどうかを問い合わせるメッセージが表示されます。Offを指定することを強くお勧めします。Offを指定すると、ダイアログボックスは表示されず、自動的にNovell GINAがインストールされます。


サードパーティGINA検出時にNovell GINAの使-pを確認する
サードパーティGINA検出時にNovell GINAの使用を確認する

プロパティページ：Novell Client環境設定

タブ：クライアント

デフォルト：有効

Novell以外が提供しているGINAをワークステーションで使用している場合、この設定を有効にすると、サードパーティ製のGINAの代わりにNovell GINAを使用するかどうかを確認するメッセージがユーザに対して表示されます。

この設定が有効でない場合に、［サードパーティGINA検出時にNovell GINAを使用する］が有効になっていると、ユーザへの確認なしに、Novell GINAが使用されます。


環境設'閧ｩ動検出する
環境設定を自動検出する

プロパティページ：NetWare/IP環境設定

タブ：パラメータ

デフォルト：Off

DHCPがNetWare(r)/IP*パラメータを提供するよう設定されている場合に、このパラメータを選択してください。


オートエンドキャップ

プロパティページ：Novell Client環境設定

タブ：デフォルトキャプチャ

デフォルト：On

アプリケーションの終了後に、キャプチャされたデータをプリンタに送信する場合は、このボックスをチェックしてください。プリンタに送信しない場合は、ボックスのチェックを解除してください（この場合、プリントジョブに、より多くの情報を追加することができます）。


自動登録

プロパティページ：TSA初期設定

タブ：環境設定

起動時に、自動的にTSAProxyを登録する場合、［自動登録］ボックスをチェックしてください。自動的に登録しない場合は、［登録］画面から［登録］をクリックして登録することができます。


再起動時に自動登録する

プロパティページ：Target Service Agent

タブ：TSA情報

起動時に、自動的にTSAProxyを登録する場合、［再起動時に自動登録する］ボックスをチェックしてください。自動的に登録しない場合は、［登録］画面から［登録］をクリックして登録することができます。


［バインダリ接`ｱ］チェックボックス
［バインダリ接続］チェックボックス

プロパティページ：Novell Client環境設定

タブ：ログイン

［サーバへのログイン］を選択すると、［バインダリ接続］チェックボックスが利用できるようになります。eDirectory(tm)ではなく、バインダリ接続でサーバにログインする場合に、このボックスをチェックしてください。


バインダリログイン

［バインダリ］をクリックすると、ネットワークへのログイン時にNetWare(r)サーバにログインします。この場合、そのサーバ上で利用可能なファイル、アプリケーション、およびその他のサービスにアクセスできます。

バインダリ接続を行う場合、そのサーバ上にないeDirectory(tm)オブジェクトにはアクセスできません。


ビットマップファイル-ｼ
ビットマップファイル名

プロパティページ：Novell Client環境設定

タブ：カスタムログイン

デフォルト：Nwelcome.bmp

Windows* NT/2000/XP*の起動時に、初期画面に表示されるビットマップを指定します。Windows NT/2000/XPディレクトリ内のビットマップであれば、どれでも指定することができます。ビットマップを表示したくない場合、フィールドには何も指定しないでください。


-D先サーバ'T索-v求をネットワークにブロードキャストする
優先サーバ探索要求をネットワークにブロードキャストする

プロパティページ：NetWare/IP環境設定

タブ：パラメータ

デフォルト：Off

ローカルネットワークに要求をブロードキャストして、NetWare(r)/IP*クライアントが優先（最寄りの）NetWareサーバを探すようにするには、このボックスをチェックしてください。NetWare/IPサーバまたはDSSに要求を送信して、クライアントが優先（最寄りの）NetWareサーバを探すようにするには、このボックスのチェックを解除してください。

この指定は省略できます。


キャプション

プロパティページ：Novell Client環境設定

タブ：カスタムログイン

デフォルト：ログイン開始

例：Hello, Maria!

Windows* NT/2000/XP*起動時の、初期画面のヘッダに表示する文字列を指定します。


現在の接`ｱを解除
現在の接続を解除

プロパティページ：Novell Client環境設定

タブ：ログイン

このボックスをチェックすると、ログイン時に、確立されているサーバ接続がすべて解除されます。


スクリプト結果を自動的に*ﾂじる
スクリプト結果を自動的に閉じる

プロパティページ：Novell Client環境設定

タブ：デフォルトログイン

ログイン時に、ログインおよびログインスクリプトの処理状況を表すダイアログボックスが表示されます。［スクリプト結果を自動的に閉じる］ボックスをチェックすると、ログインが正常に完了した場合、このダイアログボックスは自動的に閉じられます。


コンポーネント

プロパティページ：Novell Client環境設定

タブ：プロトコルの初期設定

選択したプロトコルのどのコンポーネントを設定するかを指定します。


コンポーネントのインストールはオプションとする

プロパティページ：インストール環境設定

タブ：この設定は複数のコンポーネントタブに表示されます

デフォルト：コンポーネントによって異なります

［初期画面を表示する］設定が有効になっている場合は、ユーザは［このコンポーネントをインストールする］ボックスのチェックを解除することにより、コンポーネントをインストールしないことを選択できます。


接`ｱ
接続

プロパティページ：TSA初期設定

タブ：環境設定

接続イベントをログに記録する場合に、このボックスをチェックしてください。


接`ｱサービス
接続サービス

このダイアログボックスから、ロケーションプロファイルに含めるドライブのマップやプリンタのキャプチャを指定します。ワークステーションの起動時に、指定したデバイスに常時接続が行われます。

［接続サービス］ダイアログボックスには、以下の項目が表示されます。

デバイス

マップまたはキャプチャされているデバイスが表示されます。

パス

各デバイスへのパスが表示されます。

ドライブのマップ

マップするドライブを選択する場合に、［ドライブのマップ］をクリックしてください。

ポートのキャプチャ

プリンタを選択する場合に、［ポートのキャプチャ］をクリックしてください。

切断

リスト中のデバイスを選択して［接続解除］をクリックすると、リストからデバイスが削除されます。

ユーザ固有の常時接続を削除する

ユーザ個別ではなく、ワークステーションからデバイスへの常時接続を行う場合にこのボックスをチェックしてください。


-ﾚ次
プロパティのヘルプ

このヘルプには、Novell Client for Windows NT/2000/XPおよびNovell Client for Windows 95/98ワークステーションのプロパティに関する情報が記載されています。

これは、プロパティページから参照できる状況依存のヘルプです。［キーワード］をクリックして必要な情報を検索することにより、プロパティの参照ガイドとして利用することもできます。


制御コミュニティ

プロパティページ：SNMP

タブ：SNMP

デフォルト：なし

制御コミュニティ名を指定します。

制御コミュニティは、読み書き可能コミュニティです（SET操作を行えます）。

コミュニティ名には、任意のASCII文字列を指定することができます。ただし、スペース、タブ、角カッコ（[）、等号（=）、コロン（:）、セミコロン（;）、二重引用符（""）、またはシャープ記号（#）は利用できません。

コミュニティ名では、大文字と小文字が区別されます。

読み書き可能アクセス用に作成されたコミュニティ名は、読み込み専用アクセスでも有効になります。

制御コミュニティが無効の場合、書き込みアクセスはすべて無効になります。


カスタム環境設'�
カスタム環境設定

プロパティページ：NetWare/IP環境設定

タブ：パラメータ

デフォルト：On

NetWare(r)/IP*パラメータをDHCPから取得しない場合、またはこのワークステーションのNetWare/IPパラメータをカスタマイズする必要がある場合に、このパラメータを選択してください。


カスタムツリー

Workstation Managerがワークステーションの管理に使用するツリーを指定します。


DOS Long Name Support

プロパティページ：Novell Client環境設定

タブ：詳細設定

パラメータグループ：ファイルシステム

デフォルト：On

DOSウィンドウでの、長いファイル名の表示を許可します。


一時的ユーザのキャッシュ日数

プロパティページ：Novell(r) Workstation Manager

タブ：Workstation Manager

デフォルト：  0

［一時的ユーザキャッシュを有効にする］を選択した場合、一時的ユーザのアカウント情報をキャッシュに保持する日数を指定することができます。キャッシュには、一時的ユーザのアカウント情報が保持されて、再使用することができます。


デフォルトポリシーのサポート

プロパティページ：Novell Client環境設定

タブ：カスタムログイン

デフォルト：有効

NetWareログインによるネットワークへのログインが完了した後、認証サーバの\SYS\PUBLIC\WINNTディレクトリ中でNTCONFIG.POLファイルが検索されます。ファイルが見つかったら、そのポリシーがユーザとワークステーションに適用されます。


'ﾇ加の検索パスの削除
追加の検索パスの削除

プロパティページ：ホストリソースMIB環境設定

タブ：ソフトウェアの検索

ディレクトリを選択して［削除］をクリックすると、検索パスのリストからそのディレクトリが削除されます。


［説-ｾ］ボックス
［説明］ボックス

プロパティページ：Novell Client環境設定

タブ：詳細設定

選択したパラメータの簡単な説明が表示されます。


ディレクトリエージェントリスト

プロパティページ：Novell Client環境設定

タブ：SLPのプロパティ

SLPディレクトリエージェントのアドレスの一覧です。ディレクトリエージェントは複数のアドレスを持つことができます。各アドレスは、完全に修飾されたドメイン名（DNS）またはドット付き10進形式のIPアドレスで表示されます。ディレクトリエージェントは、DHCPによって設定することも、動的に検出することもできます。

ディレクトリエージェントをリストに追加するには

1.	名前を入力します。

2.	［追加］をクリックします。

ディレクトリエージェントをリストから削除するには

1.	ディレクトリエージェントリスト中の名前をクリックします。

2.	［削除］をクリックします。

リスト中のディレクトリエージェントを新しいディレクトリエージェントで置き換えるには

1.	新しいディレクトリエージェントの名前を入力します。

2.	置き換えたい項目の名前をクリックします。

3.	［置換］をクリックします。

ディレクトリエージェントをリスト内で上に移動するには

1.	移動したいディレクトリエージェントの名前をクリックします。

2.	項目が目的の位置に達するまで［上へ］をクリックします。

ディレクトリエージェントをリスト内で下に移動するには

1.	移動したいディレクトリエージェントの名前をクリックします。

2.	項目が目的の位置に達するまで［下へ］をクリックします。


ルートから検索するディレクトリレベル

プロパティページ：ホストリソースMIB環境設定

タブ：ソフトウェアの検索

範囲：0～256（レベル）

デフォルト：  1

ホストリソースMIBが、プログラムファイルを検索する際に、eDirectory(tm)ツリー中をどの位の深さまで検索するか、階層のレベルを指定します。

注記

0を指定すると、追加の検索パスを指定しないかぎり、検索は行われません。

最初のレベルはルートです。そのため、デフォルトではルートディレクトリにあるプログラムファイルだけが検索されます。

ローカルハードディスクがすべて検索されます。フロッピーディスクドライブ、CD-ROMドライブ、またはネットワークドライブは検索されません。

大容量のローカルディスクの場合、ディスク容量すべてを検索することは避けてください。最高の性能を引き出すために、検索範囲をできるだけ狭めるようにしてください。

ネットワーク管理コンソールは、プログラムに関する情報を使用します。この情報は、クライアントワークステーション上のソフトウェアを追跡するために使用することができます。


接`ｱページの*\示
接続ページの表示

プロパティページ：Novell Client環境設定

タブ：ログイン

［ログイン］ウィンドウ中に［接続］タブを表示するには、［接続ページの表示］を選択してください。［接続］タブからは、［ログイン］ウィンドウの［接続ページの表示］と同じパラメータを設定することができます。

［接続ページの表示］オプションは、unattend.txtファイルで設定することもできます。

［ログイン］プロパティページの［接続ページの表示］には、以下のようなオプションがあります。

［ツリーへのログイン］ボタン

［サーバへのログイン］ボタン

［現在の接続を解除］チェックボックス

［バインダリ接続］チェックボックス


初期画-ﾊを*\示する
初期画面を表示する

プロパティページ：インストール環境設定

タブ：セットアップ

デフォルト：On

このパラメータを使って、インストールプロセスをカスタマイズします。Onを指定すると、インストールの開始時に初期画面が表示されます。Offを指定すると、画面は表示されずにインストールが開始されます。


スクリプトページの*\示
スクリプトページの表示

プロパティページ：Novell Client環境設定

タブ：ログイン

［ログイン］ウィンドウ中に［スクリプト］タブを表示するには、［スクリプトページの表示］を選択してください。［スクリプト］タブを使って、［ログイン］ウィンドウの［スクリプトページの表示］と同じパラメータを設定することができます。

［ログイン］プロパティページの［スクリプトページの表示］には、以下のようなオプションがあります。

［ログインスクリプト］フィールド

［プロファイルスクリプト］フィールド

［スクリプト結果を自動的に閉じる］チェックボックス

［スクリプトを実行］チェックボックス


スクリプト結果の画-ﾊを*\示
スクリプト結果の画面を表示

プロパティページ：Novell Client環境設定

タブ：デフォルトログイン

ログイン時に、ログインの進行状況を表示したい場合、［スクリプト結果の画面を表示］ボックスをチェックしてください。


*ﾏ数ページの*\示
変数ページの表示

プロパティページ：Novell Client環境設定

タブ：ログイン

［ログイン］ウィンドウ中に［変数］タブを表示するには、［変数ページの表示］をクリックしてください。［変数］タブからは、［ログイン］ウィンドウの［変数ページの表示］と同じパラメータを設定することができます。

ログインスクリプトで使用する、最大4つの変数を定義することができます。


下へ

項目をリスト内で1つ下の位置に移動するには、項目を選択して［下へ］をクリックします。


使-p可能なドライブ
使用可能なドライブ

プロパティページ：TSA初期設定

タブ：環境設定

使用可能なすべてのローカルドライブが表示されます。


認証トラップを-L効にする
認証トラップを有効にする

プロパティページ：SNMP

タブ：SNMP

デフォルト：Off

このボックスをチェックすると、適切なアクセス権を持たないユーザがSNMPを使ってデスクトップSNMPが管理する情報を取得または変更しようとした場合に、デスクトップSNMPにトラップメッセージを送信させることによりワークステーションのセキュリティを高めることができます。


バナーの使-p
バナーの使用

プロパティページ：Novell Client環境設定

タブ：デフォルトキャプチャ

デフォルト：Off

各プリントジョブでバナーページを印刷する場合、このボックスをチェックしてください。


コンテキストレスログインを-L効にする
有効にする

プロパティページ：Novell Client環境設定

タブ：コンテキストレスログイン

デフォルト：無効（チェックマークなし）

コンテキストレスログインを有効にするには、このボックスにチェックマークを付けます。コンテキストレスログインでは、eDirectory(tm)コンテキストを指定せずに、ネットワークにログインすることができます。


制御コミュニティを-L効にする
制御コミュニティを有効にする

プロパティページ：SNMP

タブ：SNMP

値：指定 | Any | Off

デフォルト：なし

制御コミュニティは、読み書き可能コミュニティです（SET操作を行えます）。

以下のいずれかの設定を選択してください。

［指定］を選択すると、指定したコミュニティ名の制御コミュニティが有効になります。Novell(r) SNMPエージェントは、指定された制御コミュニティだけを使用します。

［Any］を選択すると、制御コミュニティが有効になり、すべてのコミュニティに読み書きアクセスが許可されます。アクセスには、任意のコミュニティ文字列を使用できます。指定された制御コミュニティも、他の制御コミュニティと同じアクセスを行えます。

［Off］を選択すると、制御コミュニティが無効になります。指定された制御コミュニティは、その制御コミュニティにアクセスできません。また、他のコミュニティ名もアクセスできません。制御コミュニティを無効にすると、そのコミュニティの情報にはアクセスできません。たとえば、Novell SNMPエージェントを使って、SET操作を行うことはできません。

注記：設定［Omitted］はなくなりました。


ゲートウェイを-L効にする
ゲートウェイを有効にする

プロパティページ：IP Gateway

Novell(r) IP Gatewayを使用する場合、このボックスをチェックしてください。ボックスをチェックすると、［優先サーバ］および［優先ツリー］フィールドが利用できるようになります。


監視コミュニティを-L効にする
監視コミュニティを有効にする

プロパティページ：SNMP

タブ：SNMP

値：指定 | Any | Off

デフォルト：指定

監視コミュニティは、読み込み専用コミュニティです（GETおよびGET NEXT操作を行えます）。

以下のいずれかの設定を選択してください。

［指定］を選択すると、指定したコミュニティ名の監視コミュニティが有効になります。Novell(r) SNMPエージェントは、指定された監視コミュニティだけを使用します。

［Any］を選択すると、監視コミュニティが有効になり、すべてのコミュニティに読み込みアクセスが許可されます。アクセスには、任意のコミュニティ文字列を使用できます。指定された監視コミュニティも、他の監視コミュニティと同じアクセスを行えます。

［Off］を選択すると、監視コミュニティが無効になります。監視コミュニティを無効にすると、すべての読み込みアクセスが無効になります。指定された監視コミュニティは、その監視コミュニティにアクセスできません。また、他のコミュニティ名もアクセスできません。監視コミュニティを無効にすると、そのコミュニティの情報にはアクセスできません。たとえば、Novell SNMPエージェントを使って、GET操作を行うことはできません。

注記：設定［Omitted］はなくなりました。


NDIS経-Rのソースルーティングを-L効にする
NDIS経由のソースルーティングを有効にする

プロパティページ：IPX 32ビットプロトコル

タブ：IPX

デフォルト：Off

トークンリングまたはFDDIネットワークアダプタ用のNDISドライバを使用していて、ソースルーティングを使いたい場合に、このボックスをチェックしてください。

この設定は、トークンリングおよびFDDI NDISドライバが表しているすべての論理ボードに適用されます。

ODI* LANドライバは、この機能を使用しません。


タブの使-p
タブの使用

プロパティページ：Novell Client環境設定

タブ：デフォルトキャプチャ

デフォルト：Off

タブ文字の代わりに、指定した数のスペースを印刷する場合、このボックスをチェックしてください。タブの代わりにスペースを印刷したくない場合には、このボックスのチェックを解除してください。バイトストリームのプリントジョブの場合、タブを有効にする必要はありません。


アダプタを-L効にする
アダプタを有効にする

プロパティページ：Novell(r) IPX(tm)互換アダプタ

タブ：パラメータ

デフォルト：有効

［アダプタ］フィールドに指定したアダプタを使用したIPX互換機能を有効にするには、このボックスにチェックマークを付けます。

複数のアダプタを使用しており、IPX互換機能を一部のアダプタでのみ有効にしたい場合は、互換モードを使用しないアダプタを無効にしてください。


一時的ユーザキャッシュを-L効にする
一時的ユーザキャッシュを有効にする

プロパティページ：Novell(r) Workstation Manager

タブ：Workstation Manager

一時的ユーザのアカウント情報を、再使用できるようにキャッシュに格納しておくことができます。このオプションを有効にするには、［一時的ユーザキャッシュを有効にする］ボックスをチェックしてください。このボックスをチェックすると、［一時的ユーザのキャッシュ日数］パラメータが利用できるようになります。


Workstation Managerを-L効にする
Workstation Managerを有効にする

プロパティページ：Novell(r) Workstation Manager

タブ：Workstation Manager

Workstation Managerを有効にします。このボックスをチェックすると、［Workstation Manager］タブにあるオプションを設定できるようになります。


ログに記録するイベント

プロパティページ：TSA初期設定

タブ：環境設定

［ログに記録するイベント］グループボックスでは、ログに記録するイベントを指定します。記録できるイベントを以下に示します。

接続

登録

セキュリティ

サービス


フィルタ処-搓ﾏみサービスタイプリスト
フィルタ処理済みサービスタイプリスト

プロパティページ：Novell Client環境設定

タブ：SLPのプロパティ

［登録フィルタのスコープリスト］では、特定のサービスタイプを指定して、特定のフィルタ処理済みのスコープに登録することができます。フィルタ処理済みの各スコープに対して指定するサービスタイプは、そのスコープで一意でなければなりません。

フィルタ処理済みスコープに対して特定のサービスタイプを作成するには

1.	［登録フィルタのスコープリスト］で特定のフィルタ処理済みスコープを選択して反転表示します。

2.	［フィルタ処理済みサービスタイプリスト］にサービスタイプを入力し、［追加］をクリックします。

3.	手順2を繰り返して、このフィルタ処理済みスコープに他のサービスタイプを追加します。


最初のネットワークドライブ

プロパティページ：Novell Client環境設定

タブ：クライアント

デフォルト：F

NetWare(r)サーバに接続した時の、最初のネットワークドライブのドライブ名を指定します。

設定したワークステーションからネットワークにログインしたすべてのユーザに、指定したドライブ名が適用されます。


実行'�のアプリケーションの-L-ｳにかかわらず再起動する
実行中のアプリケーションの有無にかかわらず再起動する

プロパティページ：インストール環境設定

タブ：セットアップ

デフォルト：無効

警告：このオプションを有効にすると、データが失われる可能性があります。

この設定を有効にすると、クライアントのインストール後に、ワークステーションは自動的に再起動します。実行中のアプリケーションはすべて終了され、作業中のデータは保存されません。

この設定を無効にすると、［完了時に再起動する］パラメータが有効になっていないかぎり、ワークステーションは再起動されません。［完了時に再起動する］が有効になっており、［実行中のアプリケーションの有無にかかわらず再起動する］が無効になっていると、ユーザはワークステーションがシャットダウンする前に、データを保存し、アプリケーションを終了することができます。


フォームフィード

プロパティページ：Novell Client環境設定

タブ：デフォルトキャプチャ

デフォルト：Off

プリントジョブの最後に、1枚の空白の用紙を出力する場合は、このボックスをチェックしてください。


フレームタイプ

プロパティページ：IPX 32ビットプロトコル

タブ：高度なIPX設定

デフォルト：Ethernet_802.2

IPX(tm)で使用するフレームタイプを選択した後、［追加］をクリックしてフレームタイプのリストに追加してください。

よく使われるフレームタイプとしては、Ethernet_802.2、Ethernet_802.3、Ethernet_II、Ethernet_SNAP、Token-Ring、およびToken-Ring_SNAPがあります。


1次論-揀{ードのフレームタイプ
1次論理ボードのフレームタイプ

プロパティページ：IPX 32ビットプロトコル

タブ：高度なIPX設定

デフォルト：Ethernet_802.2

IPX(tm)が1次ボードとして使用する、論理ボードのフレームタイプを指定します。

よく使われるフレームタイプとしては、Ethernet_802.2、Ethernet_802.3、Ethernet_II、Ethernet_SNAP、Token-Ring、およびToken-Ring_SNAPがあります。


エージェントリスト失効時間

プロパティページ：Novell互換モード

タブ：アダプタ

デフォルト：  250


*ﾛ持
保持

プロパティページ：Novell Client環境設定

タブ：デフォルトキャプチャ

デフォルト：Off

プリントジョブの印刷を保留する場合は、このボックスをチェックしてください。


IPのみ

IPプロトコルスタックをインストールします。これにより、クライアントはIP専用ネットワークで動作することができます。このオプションを選択すると、ワークステーションはIPXサーバと通信できません。


IPおよびIPX

このオプションを指定すると、クライアントはIPおよびIPXの両方のネットワークで動作することができるようになります。ワークステーションは、通信先のサーバと同じプロトコルを使用します。


IP（互換性あり）
IP（IPX互換性あり）

IPをインストールし、互換モードを設定します。IPX互換モードでは、IPXアプリケーションはIPXパケットをIPパケットに変換することにより、IP専用ネットワークでも動作することができます。また、いずれかのNetWare 5サーバにマイグレーションエージェントがインストールされていれば、クライアントはIPX専用ネットワークのサービスと通信することもできます。IPX互換モードは、SLP（Service Location Protocol）に依存しています。


IPX互換スコープ

プロパティページ：Novell IPX互換アダプタ

タブ：パラメータ

デフォルト：スコープの指定なし

ネットワーク上のSLPスコープが互換モードサービス情報のみを含むようにしたい場合は、IPX互換スコープを指定します。

ほとんどの場合、IPX互換モードを指定する必要はありません。

スコープを指定する場合、互換モードを使用するすべてのノードに対して同じスコープを指定する必要があります。

スコープを指定しない場合、ワークステーションは、［Novell(r) Client(tm)環境設定］プロパティページの［SLPのプロパティ］タブで設定されたSLPスコープを使用します。


IPX診'fを-L効にする
IPX診断を有効にする

プロパティページ：IPX 32ビットプロトコル

タブ：IPX

デフォルト：On

IPX(tm)診断機能を有効にするには、このボックスをチェックしてください。

IPXおよびSPX(tm)統計情報を、このワークステーションから照会させたくない場合にだけ、このボックスのチェックを解除してください。


IPXのみ

このオプションを指定すると、クライアントはIPX専用ネットワークで動作できるようになります。このオプションはIPをインストールしません。

ネットワークでNetWare 5以前のNetWareのみが稼動している場合は、［IPXのみ］オプションを指定してNovell Clientをインストールしてください。


IPX再試行回数

プロパティページ：IPX 32ビットプロトコル

タブ：IPX

範囲：0～65535（回）

デフォルト：  20

ワークステーションが接続先への経路を見つけるための試行回数を指定します。

この値を増やすと、SPX(tm)の再試行回数も増加します。

IPX(tm)またはSPXアプリケーションがタイムアウトになる場合は、この値を増やしてください。

このバージョンのIPXは、この設定を以前のバージョンのNetWare(r)クライアントとは異なる方法で使用します。


NetWare/IPをインストールする

プロパティページ：インストール環境設定

タブ：コンポーネントの追加

Novell(r)Clientのインストール時に、NetWare(r)/IP*もインストールする場合、このボックスをチェックしてください。

このパラメータは、［NetWare/IPのインストールを確認する］パラメータと関係しています。考えられる関係の一覧については、NetWare/IPのインストールを確認するを参照してください。


このコンポーネントをインストールする

プロパティページ：インストール環境設定

タブ：複数のコンポーネントタブ

デフォルト：コンポーネントによって異なります

［このコンポーネントをインストールする］を有効にすると、コンポーネントがインストールされます。


内*買oージョン：メジャー
内部バージョン：メジャー

プロパティページ：インストール環境設定

タブ：各種のコンポーネントタブ

範囲：0～4,294,967,295

デフォルト：  0

メジャーバージョン番号とマイナーバージョン番号により、クライアントをアップグレードするかどうかが判断されます。アップグレードを行うには、現在のクライアントがインストールされたときよりも大きい値のバージョン番号を指定します。たとえば、バージョン番号が0の場合は1を指定します。ACUはクライアントのログイン時にバージョン番号を比較して、バージョン番号が違うことを検出し、クライアントをアップグレードします。


内*買oージョン：マイナー
内部バージョン：マイナー

プロパティページ：インストール環境設定

タブ：各種のコンポーネントタブ

範囲：0～4,294,967,295

デフォルト：  0

メジャーバージョン番号とマイナーバージョン番号により、クライアントをアップグレードするかどうかが判断されます。アップグレードを行うには、現在のクライアントがインストールされたときよりも大きい値のバージョン番号を指定します。たとえば、バージョン番号が0の場合は1を指定します。ACUはクライアントのログイン時にバージョン番号を比較して、バージョン番号が違うことを検出し、クライアントをアップグレードします。


継`ｱ
継続

プロパティページ：Novell Client環境設定

タブ：デフォルトキャプチャ

デフォルト：Off

プリントジョブを、印刷後もプリントキューに保持する場合、このボックスをチェックしてください。


Line Draw Characters

プロパティページ：Novell Client環境設定

タブ：詳細設定

パラメータグループ：接続

有効な値：1～6

NWPOPUpメッセージの境界を表す値を指定します。値の意味を次に示します。

1 = 左上部

2 = 右上部

3 = 左下部

4 = 右下部

5 = 垂直線

6 = 水平線


ローカルモデム

プロパティページ：ホストリソースMIB環境設定

タブ：プリンタとモデム

このワークステーションで使用するモデムの情報を指定します。この情報は、ネットワーク管理コンソールが使用します。この設定は省略できます。


ローカルプリンタ

プロパティページ：ホストリソースMIB環境設定

タブ：プリンタとモデム

このワークステーションに接続されたプリンタの情報を指定します。この情報は、ネットワーク管理コンソールが使用します。この設定は省略できます。


ローカルテープドライブ

プロパティページ：ホストリソースMIB環境設定

タブ：テープドライブ

このワークステーションで使用する、テープドライブの情報を指定します。この情報は、ネットワーク管理コンソールが使用します。この設定は省略できます。


ロケーションプロファイル

プロパティページ：Novell Client環境設定

タブ：ロケーションプロファイル

ネットワーク管理者はロケーションプロファイルを使って、ユーザのログイン情報を1つのプロファイルに保存することができます。ユーザがログイン時にこのプロファイルを選択すると、ユーザ名、サーバ、コンテキスト、ログインスクリプト、およびその他の情報などが自動的に設定され、これらの情報をわざわざユーザが入力する必要がなくなります。

ロケーションプロファイルを追加するには

1.	システムトレイのNアイコンを右クリックして、［Novell Clientのプロパティ］>［位置］の順にクリックします。

2. 	追加するプロファイルの名前を入力します。

3. 	［追加］をクリックします。

ロケーションプロファイルを削除するには

1. 	削除するプロファイルを選択します。

2. 	［削除］をクリックします。

プロファイルのプロパティを表示するには

1.	プロファイルを選択します。

2.	［プロパティ］をクリックします。


サーバへのログイン

プロパティページ：Novell Client環境設定

タブ：デフォルトログイン

ネットワークログイン時にNetWare(r)サーバにログインする場合、［サーバへのログイン］をクリックします。この場合、そのサーバ上で利用可能なファイル、アプリケーション、およびその他のサービスにアクセスできます。

［サーバへのログイン］をクリックすると、［バインダリ接続］チェックボックスが利用できるようになります。バインダリ接続を行う場合、そのサーバ上にないeDirectory(tm)オブジェクトにはアクセスできません。


ツリーへのログイン

プロパティページ：Novell Client環境設定

タブ：デフォルトログイン

［ツリーへのログイン］をクリックすると、ネットワークログイン時にeDirectory(tm)ツリーにログインします。これにより、プリンタやサーバなど、ツリー上で利用可能なサービスにアクセスすることができます。


ログインスクリプト

プロパティページ：Novell Client環境設定

タブ：ログイン

NetWare(r)ログイン時に使用する、ログインスクリプト名を設定します。


Maximum Transmission Unit

プロパティページ：Novell Client環境設定

タブ：詳細設定

パラメータグループ：SLP一般

範囲：576～4096（バイト）

デフォルト：  1400


Message Sound File

プロパティページ：Novell Client環境設定

タブ：詳細設定

パラメータグループ：グラフィカルインタフェース

デフォルト：空

メッセージの受信時に鳴らす、サウンドファイルのファイル名を指定します。サウンドファイルは、.wav形式でなければなりません。ファイルが指定されていない場合、サウンドは鳴りません。


マイグレーションエージェント

プロパティページ：Novell(r) IPX(tm)互換アダプタ

タブ：パラメータ

範囲：最大で10個のマイグレーションエージェント

デフォルト：空

IPXノードとIPノード間の接続を提供するマイグレーションエージェントを、最大10まで指定します。

サーバを指定するには、ドット付きアドレス形式、完全に修飾されたDNS名、またはローカルホストファイルに指定されている名前を使用することができます。

マイグレーションエージェントを設定していない場合、クライアントはSLPを使用して、マイグレーションエージェントの動的な検出を試みます。


監視コミュニティ

プロパティページ：SNMP

タブ：SNMP

デフォルト：Public

監視コミュニティ名を指定します。監視コミュニティは、読み込み専用コミュニティであり、GETおよびGET NEXT操作を行えます。

コミュニティ名には、任意のASCII文字列を指定することかできます。ただし、スペース、タブ、角カッコ（[）、等号（=）、コロン（:）、セミコロン（;）、二重引用符（""）、またはシャープ記号（#）は利用できません。

コミュニティ名では、大文字と小文字が区別されます。

監視コミュニティを無効にすると、すべての読み込みアクセスが無効になります。


eDirectoryログイン

［eDirectory］をクリックすると、ネットワークへのログイン時にeDirectoryツリーにログインします。これにより、プリンタやサーバなど、ツリー上で利用可能なサービスにアクセスすることができます。


eDirectoryまたはバインダリ
eDirectoryまたはバインダリログイン

ネットワークへのログイン時に使用する方法を選択してください。

［eDirectory］をクリックすると、ネットワークへのログイン時にeDirectoryツリーにログインします。このオプションを選択することにより、プリンタやサーバなど、ツリー上で利用可能なサービスにアクセスすることができます。

［バインダリ］をクリックすると、ネットワークへのログイン時にNetWare(r)サーバにログインします。この場合、そのサーバ上で利用可能なファイル、アプリケーション、およびその他のサービスにアクセスできます。そのサーバ上にないeDirectoryオブジェクトにはアクセスできません。


ネームコンテキスト

プロパティページ：Novell Client環境設定

タブ：クライアント

デフォルト：ルート

eDirectoryツリー構造中の、現在の位置（コンテキスト）を指定します。たとえば、Marketing組織のMngt部門のコンテキストは、「ou=mngt.o=marketing」と指定します。

重複するユーザ名が存在する場合に、目的のユーザ名を区別するためこの設定を使用します。

ネームコンテキストには、最大256文字を指定できます。また、eDirectoryツリーのルートを表すNULLコマンドを指定することもできます。


ネームレゾリューションの順序

プロパティページ：Novell Client環境設定

タブ：プロトコルの初期設定

デフォルト順序：NWHOST、eDirectory、SLP、DNS、DHCP

このリストは、名前を解決するために使用されるプロトコルの順序を指定します。

たとえば、NetWare(r) 5サーバに、IP*とIPX(tm)の両方がバインドされている場合（またはCMD）、クライアントはリスト中のいずれかのIPネームサービスを使用して、そのサーバの名前を解決します。［プロトコルの順序］ボックス内でIPXが2番目に指定されていれば、クライアントは次にIPXアドレスをサポートするIPXネームサービスを使用して名前の解決を試みます。

NT/2000/XPクライアントでは、順序に沿っては表示されず、デフォルトの順序もありません。

設定されているすべてのネームサービスプロバイダは、アドレスに対する名前を解決するために非同期的に照会されます。これらは、最初に、キャッシュを維持するネームサービスプロバイダ（NSP）が名前を解決しようとすることを許可するキャッシュフラグを使って照会されます。名前を解決できるNSPがない場合、すべてのNSPが名前を解決しようとすることを許可するキャッシュフラグを使わずに、再び照会されます。クライアントは、［Name Resolution Timeout］（［詳細設定］にあり、デフォルトは10秒です）で指定された時間、またはすべての照会中のNSPがNOT_FOUNDやNO_MOREで応答を返すまで待ちます。


-D先NetWare/IPサーバ
優先NetWare/IPサーバ

プロパティページ：NetWare/IP環境設定

タブ：サーバ

デフォルト：なし

例：

mydss	（ホスト名）

mydss.atlantic.com	（完全修飾ホスト名）

222.33.44.55	（mydssのIPアドレス）

222.33.0.0	（mydssのIPアドレスマスク）

優先（最寄りの）NetWare(r)/IP*サーバを探すために用いられます。最高5台の優先NetWare/IPサーバを指定することができます。指定したサーバが利用できない場合、DSSによって他のサーバが指定されます。

NetWare/IPサーバ名は、DNSホスト名、完全修飾ホスト名、IPアドレス、またはIPアドレスマスクで指定することができます。この設定は省略できます。


Roamingプロファイルの*ﾛ`ｶを-L効にする
Roamingプロファイルの保存を有効にする

プロパティページ：Novell Client環境設定

タブ：カスタムログイン

Roamingプロファイルを有効にするには、このボックスをチェックしてください。


NetWare/IP 1.1互換性

プロパティページ：NetWare/IP環境設定

タブ：パラメータ

デフォルト：Off

サーバ上でNetWare(r)/IP* 1.1が動作している場合、このボックスをチェックしてください。この設定は、最初のバージョンのNetWare/IPとDSSサーバをサポートします。NetWare/IP 1.1を使用している場合、バージョン2.2にアップグレードすることをお勧めします。それまでの暫定措置として、このボックスをチェックしておけば、このクライアント（NetWare/IP 2.2準拠）とNetWare/IPサーバとの間で通信することが可能になります。


NetWare/IPドメイン-ｼ
NetWare/IPドメイン名

プロパティページ：NetWare/IP環境設定

タブ：パラメータ

デフォルト：なし

例：nwip.atlantic.com

NetWare(r)/IP*ドメインを指定します。必ず設定する必要があります。


ネットワーク番号（16進）

プロパティページ：Novell(r) IPX(tm)互換アダプタ

タブ：パラメータ

デフォルト：FFFFFFFD

選択されたアダプタ上でIPX互換ドライバによって作成された、仮想IPXセグメント（CMDネットワーク番号）を指定します。

異なるCMDネットワーク番号を使用するIPノードは、IPXクライアント/サーバアプリケーションを実行する場合には、同じCMCネットワーク番号をサポートするマイグレーションエージェントを通して通信する必要があります。


ネットワークプロトコル

Novell(r) Client(tm) for Windows* は、NetWare(r)5*サーバ上で動作するIP（Internet Protocol）をサポートしています。NetWare 5以外のバージョンのNetWareでクライアントを使用する場合は、NetWare/IPを使用してIP接続を行うことができます。Novell Clientは、IPX(tm)/SPX(tm)プロトコルファミリもサポートしています。また、NetBEUIプロトコルなどのその他のプロトコルスタックとともに使用することもできます。

Novell Clientのインストール時には、以下のプロトコルオプションの中から選択することができます。

IPのみ

IP（IPX互換性あり）

IPおよびIPX（デフォルト）

IPX

クライアントはIPX専用ネットワークで動作することができます。このオプションはIPをインストールしません。

注記：ネットワークでNetWare 5以前のバージョンのNetWareのみが動作している場合、［IPX］オプションを指定してNetWare Clientをインストールしてください。


'ﾊ'm
通知

プロパティページ：Novell Client環境設定

タブ：デフォルトキャプチャ

デフォルト：On

プリントジョブの印刷完了時にメッセージを受信したい場合は、このボックスをチェックしてください。


*柏�
部数

プロパティページ：Novell Client環境設定

タブ：デフォルトキャプチャ

範囲：1～255

デフォルト：  1

印刷部数を指定します。


再試行間隔（*b）
再試行間隔（秒）

プロパティページ：NetWare/IP環境設定

タブ：パラメータ

範囲：5～99（秒）

デフォルト：  10

DSS要求の応答がない場合に、再試行する間隔を秒単位で指定します。


スペース数

プロパティページ：Novell Client環境設定

タブ：デフォルトキャプチャ

範囲：1～18

デフォルト：無効、8

タブ文字の代わりに印刷するスペースの数を指定します。この設定を有効にするには、［タブの使用］ボックスをチェックする必要があります。


パラメータグループ

プロパティページ：Novell Client環境設定

タブ：詳細設定

詳細設定パラメータを、パラメータグループごとに一覧表示します。パラメータグループは、パラメータを機能ごとに分類したものです。これによって、特定の種類のパラメータを探しやすくなります。


パラメータリスト

プロパティページ：Novell Client環境設定

タブ：詳細設定

Novell(r) Client(tm)で利用可能な、詳細設定パラメータが一覧表示されます。

特定のパラメータの情報については、該当するパラメータを選択して、［説明］ボックスの説明を参照してください。


パスワード（TSA）
パスワード

プロパティページ：Target Service Agent

タブ：TSA情報

TSAユーザのパスワードを指定してください。


パス

プロパティページ：Novell Client環境設定

タブ：カスタムログイン

このオプションを選択すると、［パス］編集ボックスにパスを指定できるようになります。この編集ボックスに、プロファイルの保存先を指定してください。


ポリシーのパスとファイル-ｼ
ポリシーのパスとファイル名

プロパティページ：Novell Client環境設定

タブ：カスタムログイン

ポリシーのパスとファイル名を指定するには、［ポリシーのパスとファイル名］テキストボックスにポリシーファイルへのパスを入力します。UNCパスで指定してください。

UNCパスは、通常のMS-DOS*のパス命名規約（drive:\directory）とは異なります。以下の形式で入力します。

\\server\volume\dir1\dir2\filename.ext


ポート番号

プロパティページ：NetWare/IP環境設定

タブ：パラメータ

デフォルト：ABCD

［NWIPカスタムポートを使用する］を有効にした場合に、NetWare(r)/IP*で使用するポートを指定します。


VGNMAメモリを�-`Oに割り�-てる
VGNMAメモリを事前に割り当てる

プロパティページ：IPX 32ビットプロトコル

タブ：IPX

デフォルト：Off

VGNMA操作にコンベンショナルメモリを割り当てる場合、このボックスをチェックしてください。16ビットGNMA Responderアプリケーションが正常に動作しない場合は、事前にVGNMAメモリを割り当ててください。


-D先ドメインSAP/RIPサーバ
優先ドメインSAP/RIPサーバ

プロパティページ：NetWare/IP環境設定

タブ：サーバ

デフォルト：なし

例：

dss	 （ホスト名）

dss.atlantic.com	 （完全修飾ホスト名）

2.33.44.55	 （mydssのIPアドレス）

2.33.0.0	 （mydssのIPアドレスマスク）

優先ドメインSAP/RIPサーバを指定します。

ここに指定したアドレスや名前が、優先ドメインSAP/RIPサーバの検索に用いられます。どのドメインSAP/RIPサーバも利用できない場合は、DNSに対して照会が行われます。

最高5台の優先ドメインSAP/RIPサーバを指定することができます。

ドメインSAP/RIPサーバ名には、ホスト名、完全修飾ホスト名、IPアドレス、またはIPアドレスマスクを指定することができます。


-D先IP/IP Gatewayサーバ
優先IP/IP Gatewayサーバ

プロパティページ：IP Gateway

タブ：Novell IP Gateway

目的のNovell(r) IP Gatewayが動作するサーバを指定してください。


-D先IPX/IP Gatewayサーバ
優先IPX/IP Gatewayサーバ

プロパティページ：IP Gateway

タブ：Novell IP Gateway

目的のNovell(r) IP Gatewayが動作するサーバを指定してください。


-D先ネットワークプロトコル
優先ネットワークプロトコル

プロパティページ：Novell Client環境設定

タブ：プロトコルの初期設定

パラメータグループ：ネームレゾリューション

値：なし、IP、IPX

デフォルト：なし

クライアントは、［Name Resolution Timeout］に設定された時間の1/4が経過するのを待ってから、指定した名前を優先ネットワークタイプのアドレスに解決します。この値を0に設定すると、クライアントは設定されているいずれかのネームスペースサービスから返された最初のアドレスに接続します。


-D先サーバ
優先サーバ

プロパティページ：Novell Client環境設定

タブ：クライアント

Novell(r) Client(tm)の起動時に、eDirectory(tm)がどのサーバでユーザを認証するかを指定します。クライアントは、指定されたサーバに接続を試みます。

［優先サーバ］と［優先ツリー］パラメータは、互いに関係しています。［優先サーバ］パラメータを設定すると、eDirectoryはそのサーバへのユーザの認証を試みます。［優先ツリー］パラメータを設定すると、eDirectoryはGet Nearest Serverメッセージを送信して、そのメッセージに応答したサーバへのユーザの認証を試みます。この場合、［優先サーバ］の設定は無視されます。

この設定は、このワークステーションを使ってログインするすべてのユーザに適用されます。


-D先サーバ（IP Gateway）
優先サーバ

プロパティページ：IP Gateway

使用するNovell(r) IP Gatewayが動作しているサーバを指定してください。

このオプションは、［ゲートウェイを有効にする］がチェックされている場合にだけ指定することができます。


-D先サーバ（TSA）
優先サーバ（TSA）

プロパティページ：TSA初期設定

タブ：環境設定

TSAの登録先のサーバを指定します。


-D先ツリー
優先ツリー

プロパティページ：Novell Client環境設定

タブ：クライアント

Novell(r) Client(tm)の起動時に、最初にアタッチするディレクトリツリーを指定します。クライアントは、指定したツリー中のサーバへの接続を試みます。

このパラメータを設定すると、クライアントはツリー中の任意のサーバへの接続を試みます。ツリーが設定されていない場合は、［優先サーバ］に指定されたサーバへの接続が試みられます。どちらのパラメータも設定されていない場合は、Get Nearest Server要求に応答したサーバに接続します。

優先ツリーの設定は、このワークステーションを使ってログインするすべてのユーザに適用されます。異なるツリーにログインする場合は、ネットワークログイン時に、このログインセッションのツリーを変更することができます。


-D先ツリー（IP Gateway）
優先ツリー

プロパティページ：IP Gateway

目的のNovell(r) IP Gatewayが動作しているサーバがあるツリーを指定します。

このオプションは、［ゲートウェイを有効にする］がチェックされている場合にだけ指定することができます。


1次論-揀{ード
1次論理ボード

プロパティページ：IPX 32ビットプロトコル

タブ：高度なIPX設定

デフォルト：Off（IPX(tm)が自動的に1次論理ボードを検出する）

IPXが1次ボードとして使用する論理ボードを指定する場合、このボックスをチェックしてください。論理ボードは、フレームタイプによって指定します。

デフォルトでは、IPXは自動的に1次ボードを検出します。このオプションが選択されていない場合、IPXは自己検出アルゴリズムを使って、自動的に1次ボードを選択します。IPXが正しい1次ボードを選択できない場合に、このオプションを使用してください。


プロファイルスクリプト

プロパティページ：Novell Client環境設定

タブ：ログイン

ログイン時に使用する代替eDirectory(tm)プロファイルスクリプトを指定します。このプロファイルスクリプトが、通常のeDirectoryプロファイルスクリプトの代わりに実行されます。


プロパティ

プロパティページ：Novell Client環境設定

タブ：ロケーションプロファイル、サービス

選択したプロファイルやサービスのプロパティを参照するには、［プロパティ］をクリックしてください。


プロトコル

プロパティページ：TSA初期設定

タブ：TSA情報

TSAは、複数のプロトコルをサポートしています。現在は、SPX(tm)/IPX(tm)とTCP/IPの2つのプロトコルオプションが提供されています。ワークステーションにインストールされているプロトコルのプロトコルスタックだけが表示されます。ドロップダウンリストから、いずれかのオプションを選択してください。


プロトコル（クライアントプロパティページ）
プロトコル

プロパティページ：インストール環境設定

タブ：クライアント

クライアントが通信に使用するネットワークプロトコルを指定します。


プロトコル（プロトコルの初期設'閭vロパティページ）
プロトコル

プロパティページ：Novell Client環境設定

タブ：プロトコルの初期設定

設定するプロトコルをクリックします。


プロトコルコンポーネントの設'�
プロトコルコンポーネントの設定

プロパティページ：Novell Client環境設定

タブ：プロトコルの初期設定

選択されたプロトコルコンポーネントで使用する項目を選択します。


プロトコルの順序

プロパティページ：Novell Client環境設定

タブ：プロトコルの初期設定

デフォルト順序：IP、IPX

Novell(r) Client(tm)がサーバに接続する際に使用するプロトコルの順番を指定します。たとえば、リスト中にIPX(tm)、IPの順で指定されている場合、クライアントはまずIPXを使用して接続を試みます。IPX接続が行えなかった場合は、次にIPが使用されます。


完-ｹ時に再起動する
完了時に再起動する

プロパティページ：インストール環境設定

タブ：セットアップ

デフォルト：有効

有効にすると、Novell(r) Client(tm)のインストール後にワークステーションが自動的に再起動します。実行中のアプリケーションがある場合は、ワークステーションをシャットダウンする前に、開いているファイルを保存するかを確認するメッセージが表示されます。

この設定が有効で、［実行中のアプリケーションの有無にかかわらず再起動する］も有効になっている場合、開いているファイルの保存を確認するメッセージは表示されずに、ワークステーションはシャットダウンし、再起動します。

この設定を無効にすると、クライアントのインストール後に、ワークステーションは再起動されません。ただし、ワークステーションを再起動しないかぎり、新しいクライアントおよび設定は有効にはなりません。


登録

プロパティページ：TSA初期設定

タブ：環境設定

登録イベントをログに記録する場合にチェックしてください。


登録フィルタのスコープリスト

プロパティページ：Novell Client環境設定

タブ：SLPのプロパティ

このワークステーション上のSLPアプリケーションにレポートされる登録フィルタのスコープ名の一覧です。複数のスコープ名を指定することができます。サービスを登録するときは、作成済みの一般的なスコープリストのほか、このリストが使用されます。

厳密な登録フィルタ処理を行う

登録フィルタのスコープリストを、この特定のリストだけに制限するには、［厳密な登録フィルタ処理を行う］ボックスをチェックします。

フィルタ処理済みサービスタイプリスト

特定のサービスタイプを一覧表示して、［登録フィルタのスコープリスト］の特定のスコープに登録するには、スコープを反転表示してから［フィルタ処理済みサービスタイプリスト］にサービスタイプを入力し、［追加］をクリックします。


削除

リストから項目を削除するには、項目を選択して、［削除］をクリックしてください。


［削除］ボタン

プロパティページ：NetWare/IP環境設定

タブ：サーバ

［優先NetWare/IPサーバ］または［優先ドメインSAP/RIPサーバ］の一覧から、サーバを削除します。


フレームタイプの削除

プロパティページ：IPX 32ビットプロトコル

タブ：高度なIPX設定

リストからフレームタイプを選択して、［削除］をクリックしてください。


IPXが`ｶ在する場合は削除する
IPXが存在する場合は削除する

［IPのみ］のクライアントのインストール時に、ワークステーション上にすでにインストールされているIPXスタックを削除するには、このボックスをチェックします。

警告：IPXを削除すると、ワークステーションはIPXサーバおよびアプリケーションとは通信できなくなります。


ローカルモデムの削除

プロパティページ：ホストリソースMIB環境設定

タブ：プリンタとモデム

リストからモデムを選択して、［削除］をクリックしてください。


ローカルプリンタの削除

プロパティページ：ホストリソースMIB環境設定

タブ：プリンタとモデム

リストからプリンタを選択して、［削除］をクリックしてください。


ローカルテープドライブの削除

プロパティページ：ホストリソースMIB環境設定

タブ：テープドライブ

リストからテープドライブを選択して、［削除］をクリックしてください。


Microsoft NetWareクライアントを削除する

プロパティページ：インストール環境設定

タブ：クライアント

デフォルト：On

Onを指定すると、クライアントを削除するかどうかを問い合わせるダイアログボックスが表示されない場合に、Microsoft*NetWare(r)クライアントが削除されます。ダイアログボックスが表示される場合は、［はい］ボタンがデフォルトになります。


ツリーとネームコンテキストの削除

プロパティページ：Novell Client環境設定

タブ：クライアント

リストからツリーとネームコンテキストの組み合わせを選択して、［削除］をクリックしてください。


'u換
置換

既存の項目を新しい項目で置き換えるには、新しい項目の名前を入力し、既存の項目を選択してから、［置換］をクリックしてください。


'ﾇ加の検索パスの'u換
追加の検索パスの置換

プロパティページ：ホストリソースMIB環境設定

タブ：ソフトウェアの検索

置換するディレクトリを指定した後、［追加の検索パス］リストから置換対象のディレクトリを選択して、［置換］をクリックしてください。


［'u換］ボタン
［置換］ボタン

プロパティページ：NetWare/IP環境設定

タブ：サーバ

［優先NetWare/IPサーバ］または［優先ドメインSAP/RIPサーバ］リスト中のサーバを置換します。


ローカルモデムの'u換
ローカルモデムの置換

プロパティページ：ホストリソースMIB環境設定

タブ：プリンタとモデム

置換するモデムを指定し、［ローカルモデム］リストから置換対象のモデムを選択し、［置換］をクリックしてください。


ローカルプリンタの'u換
ローカルプリンタの置換

プロパティページ：ホストリソースMIB環境設定

タブ：プリンタとモデム

置換するプリンタを指定し、［ローカルプリンタ］リストから置換対象プリンタを選択し、［置換］をクリックしてください。


ローカルテープドライブの'u換
ローカルテープドライブの置換

プロパティページ：ホストリソースMIB環境設定

タブ：テープドライブ

置換するテープドライブを指定し、［ローカルテープドライブ］リストから置換対象テープドライブを選択し、［置換］をクリックしてください。


ツリーとネームコンテキストの'u換
ツリーとネームコンテキストの置換

プロパティページ：Novell Client環境設定

タブ：クライアント

置換するツリー名とネームコンテキストの組み合わせを選択して［置換］をクリックし、次に新しいツリーとコンテキスト情報を適切なフィールドに入力してください。


TSAに使-p可能なリソース
TSAに使用可能なリソース

プロパティページ：Target Service Agent

タブ：TSA情報

TSAでバックアップできる、リソースの一覧が表示されます。


起動時のDSSへの再試行回数

プロパティページ：NetWare/IP環境設定

タブ：パラメータ

範囲：0～10（回）

デフォルト：  1

DSS要求に応答がない場合の、再試行回数を指定します。


スクリプトを実行

プロパティページ：Novell Client環境設定

タブ：ログイン

このボックスをチェックしないと、ログイン時にログインスクリプトは実行されません。


SPX'�止のタイムアウト
SPX中止のタイムアウト

プロパティページ：IPX 32ビットプロトコル

タブ：SPX

範囲：1～65535（チック）

デフォルト：  540

SPX(tm)プロトコルが、接続先からどれくらいの時間（チック単位）応答がなかった場合にセッションを終了するかを指定します。

SPXが頻繁にタイムアウトする場合を除き、この設定は変更しないでください。


SPX接`ｱ
SPX接続

プロパティページ：IPX 32ビットプロトコル

タブ：SPX

範囲：1～255

デフォルト：  15

この情報を照会して、それをもとに動作を決定するアプリケーションとの互換性の目的で用いられます。

この設定によって、SPX(tm)接続の数が制限されるわけではありません。SPX接続の数は、使用可能なメモリ量によってのみ制限されます。


SPXリッスンのタイムアウト

プロパティページ：IPX 32ビットプロトコル

タブ：SPX

範囲：1～65535（チック）

デフォルト：  108

SPX(tm)プロトコルが、接続先からパケットを受信しない場合に、どれくらいの時間（チック単位）が経過すると、接続が有効かどうかを確認するパケットを送信するかを指定します。

SPXが頻繁にタイムアウトする場合を除き、この設定は変更しないでください。


SPX検査のタイムアウト

プロパティページ：IPX 32ビットプロトコル

タブ：SPX

範囲：1～65535（チック）

デフォルト：  54

SPX(tm)プロトコルが、接続が有効であることを示すバケットを、接続先に送信する頻度（チック単位）を指定します。

SPX接続を確立したソフトウェアによってSPX接続上でパケットが交換されていない場合、SPXは一定間隔で接続が有効であることを確認するパケットを送信します。

SPXが頻繁にタイムアウトする場合を除き、この設定は変更しないでください。


ログイン終-ｹ時に設'閧�*ﾛ`ｶする
ログイン終了時に設定を保存する

プロパティページ：Novell Client環境設定

タブ：ログイン

このボックスをチェックすると、［NetWareログイン］ページを終了するときに、変更または入力した設定内容が保存されます。ボックスをチェックしない場合、設定内容は保存されません。


スコープリスト

プロパティページ：Novell Client環境設定

タブ：SLPのプロパティ

このワークステーション上のSLPアプリケーションにレポートされるスコープ名の一覧です。複数のスコープ名を指定することができます。リスト内の順番は、優先度を表しています。スコープは、DHCPを使用して設定したり、ディレクトリエージェントを使用して動的に検出することもできます。

スコープは、論理グループ内のサービスのコレクションに似ています。スコープを使って、ディレクトリエージェントのグループを作成したり、大きな組織内でこれらのディレクトリエージェントを使って登録されたサービスを作成することができます。

リストにスコープを追加するには

1.	名前を入力します。

2.	［追加］をクリックします。

リストからスコープを削除するには

1.	リスト内の名前をクリックします。

2.	［削除］をクリックします。

リスト内のスコープを新しいスコープで置き換えるには

1.	新しいスコープの名前を入力します。

2.	置き換えたい項目の名前をクリックします。

3.	［置換］をクリックします。

スコープをリスト内で上下に移動するには

1.	移動したいスコープの名前をクリックします。

2.	項目が目的の位置に達するまで［上へ］または［下へ］をクリックします。


～*b後に検索をタイムアウトする
～秒後に検索をタイムアウトする

プロパティページ：Novell Client環境設定

タブ：コンテキストレスログイン

範囲：0～999（秒）

デフォルト：  2

NovellログインがeDirectory(tm)内で指定されたユーザを検索する最大時間（秒）を指定します。この値が低すぎると、ユーザが見つかる前に検索がタイムアウトする可能性があります。一方、値が高すぎると、無効なユーザまたはアクセスできないユーザの検索に無駄な時間が費やされる可能性があります。

まず、この値を低く設定しておき、検索中にタイムアウトするようであれば、検索が常に成功するようになるまで、少しずつ値を高くしてください。


タイムアウトまでの*b数
タイムアウトまでの秒数

プロパティページ：Novell Client環境設定

タブ：デフォルトキャプチャ

範囲：0～1000（秒）

デフォルト：  0

OSが最後のデータを受信してから、プリントジョブをクローズするまでの秒数を指定します。


セキュリティ

プロパティページ：TSA初期設定

タブ：環境設定

セキュリティイベントをログに記録する場合に、このボックスをチェックしてください。


サーバ

プロパティページ：IP Gateway

IP Gatewayが動作しているサーバ名です。


サーバ-ｼ
サーバ名

プロパティページ：Target Service Agent

タブ：TSA情報

TSAの登録先のサーバの名前を指定します。


サーバ*ｪ析時間
サーバ分析時間

プロパティページ：Novell(r) IPX(tm)互換アダプタ

タブ：パラメータ

範囲：0～5000（ミリ秒）

デフォルト：  250

NewWare接続を確立する前に、IPXアドレスによって認識されているサーバが実際はIPサーバであるかどうかを判断するための最大時間を指定します。指定された時間内に、そのIPXアドレスをサポートするIPサーバが検出された場合は、クライアントはTCP/IP接続を使用してそのサーバにアタッチします。そのIPXアドレスをサポートするIPサーバが検出される前に指定された時間が経過した場合は、クライアントはトンネル化されたIPX接続を使用してそのサーバにアタッチします。

注記：この設定は、IPXアプリケーションによってクライアントのNetWare接続が要求された場合、またはユーザがIPXサーバに接続したい場合に、使用されます。


サービス

プロパティページ：TSA初期設定

タブ：環境設定

サービスイベントをログに記録する場合に、このボックスをチェックしてください。


サービス（ロケーションプロファイル）
サービス

プロパティページ：ロケーションプロファイルのプロパティ

タブ：サービス

［接続サービス］または［ログインサービス］を選択します。

［ログインサービス］を選択した場合、ログインに関する環境設定を行うことができます。


サービスインスタンス

プロパティページ：ロケーションプロファイルのプロパティ

タブ：サービス

新しいサービスインスタンスの名前を入力するか、またはドロップダウンリストから既存のサービスインスタンスを選択してください。終わったら、［追加］をクリックします。


設'�
設定

プロパティページ：Novell Client環境設定

タブ：詳細設定

選択したパラメータの現在の設定です。


ログイン時にカスタムボタンを*\示
ログイン時にカスタムボタンを表示

プロパティページ：Novell Client環境設定

タブ：カスタムログイン

［ログイン］ダイアログボックスの［詳細］ボタンを有効にするかどうかを指定します。このボタンをクリックすると、各種のカスタムログインパラメータを設定できるタブが表示されます。


ログイン時に現在の接`ｱを解除を*\示
ログイン時に現在の接続を解除を表示

プロパティページ：Novell Client環境設定

タブ：カスタムログイン

［ログイン］ダイアログボックスに、［現在の接続を解除］チェックボックスを表示するかどうかを指定します。このボックスをチェックすると、新しい接続を確立する際に、以前の接続はすべて解除されます。


ログイン時にロケーションリストを*\示
ログイン時にロケーションリストを表示

プロパティページ：Novell Client環境設定

タブ：カスタムログイン

［ログイン］ダイアログボックスの［位置］リストを有効にするかどうかを指定します。このリストには、ユーザが最近ログインした場所が表示されます。


タスクバーにTSAアイコンを*\示する
タスクバーにTSAアイコンを表示する

プロパティページ：Target Service Agent

タブ：TSA情報

タスクバーにTSAアイコンを表示する場合、このボックスをチェックしてください。


ログイン時に*ﾏ数ボタンを*\示
ログイン時に変数ボタンを表示

プロパティページ：Novell Client環境設定

タブ：カスタムログイン

［ログイン］ダイアログボックスに、［変数］ボタンを表示するかどうかを指定します。このボタンをクリックして、ログイン時に使用するログインスクリプト変数を入力することができます。


ログイン時にワークステーションのみを*\示
ワークステーションのみ

プロパティページ：Novell Client環境設定

タブ：カスタムログイン

ユーザのログイン時に［ワークステーションのみ］チェックボックスを表示する場合に、このボックスをチェックしてください。

NetWare(r)ネットワークにログインしないで、Windows*ワークステーションにのみログインしたい場合に、［ワークステーションのみ］チェックボックスをチェックします。


スタティック

リストに、ディレクトリエージェントによって動的に検出されたスコープを含めたくない場合は、［スタティック］ボックスをチェックします。

ディレクトリエージェントリストの［スタティック］ボックスをチェックすると、SLP要求は、アドレスまたはDNS名がリスト内に設定されているディレクトリエージェントに送信されます。［スタティック］ボックスをチェックしないと、SLP要求は、ネットワーク上でアドバタイズされているすべてのディレクトリエージェントに送信されます。


ステータス

プロパティページ：IP Gateway

IP Gatewayのステータスを表示します。

ステータス番号と意味を以下に示します。

0 = Gatewayは無効

1 = Gatewayに接続されていない

2 = Gatewayに接続中

3 = Gatewayへのアクセスがタイムアウトした

4 = Gatewayサーバがビジー

5 = Gatewayアクセスが拒否された

6 = Gatewayに接続されている

7 = Gatewayサーバが見つからない

8 = Gatewayサーバが接続を拒否した

9 = ローカルネットワークが停止している

10 = Gatewayクライアントが接続を中止した

11 = Gatewayサーバが接続をリセットした


プロファイルをユーザのホームディレクトリに*ﾛ`ｶする
プロファイルをユーザのホームディレクトリに保存する

プロパティページ：Novell Client環境設定

タブ：カスタムログイン

［カスタムログイン］プロパティページの［Roamingプロファイルの保存を有効にする］ボックスをチェックしている場合のみ、このボタンを利用できます。

Roamingプロファイルをネットワークに保存する場合に、［プロファイルをユーザのホームディレクトリに保存する］オプションを選択してください。バインダリ接続の場合はユーザのメールディレクトリが使用され、eDirectory(tm)接続の場合はユーザのホームディレクトリが使用されます。

ネットワーク上にユーザプロファイルを保存すると、ユーザはネットワーク上のどのワークステーションからログインしても、常に同じデスクトップ環境を利用できます。あるワークステーション上でユーザ環境を変更すると、変更内容はネットワーク上のプロファイルに保存されます。以降、ユーザが別の場所からログインしても、変更内容を反映したユーザ環境を利用することができます。


プロファイルをNetWareファイルシステムディレクトリに*ﾛ`ｶする
プロファイルをNetWareファイルシステムディレクトリに保存する

プロパティページ：Novell Client環境設定

タブ：カスタムログイン

［カスタムログイン］プロパティページの［Roamingプロファイルの保存を有効にする］ボックスをチェックしている場合にのみ、このボタンを利用できます。

Roamingプロファイルを、NetWare(r)サーバ上の特定のディレクトリに保存する場合に、［プロファイルをNetWareファイルシステムディレクトリに保存する］オプションを選択してください。このオプションを選択すると、ワークステーションにログインしたすべてのユーザのプロファイルが、指定されたディレクトリに保存されます。必須プロファイルを使用する際には、このオプションを使用することをお勧めします。

ネットワーク上にユーザプロファイルを保存すると、ユーザがネットワーク上のどのワークステーションからログインしても、常に同じデスクトップ環境を利用できます。あるワークステーション上でユーザ環境を変更すると、変更内容はネットワーク上のプロファイルに保存されます。以降、ユーザが別の場所からログインしても、変更内容を反映したユーザ環境を利用することができます。

このオプションを選択すると、［パス］編集ボックスにパスを指定できるようになります。この編集ボックスに、プロファイルの保存先を指定してください。


システムコンタクト

プロパティページ：SNMP

タブ：SNMP

デフォルト：なし

ワークステーションのシステム管理者（ネットワーク管理者）の名前を指定します。ワークステーションの保守を行う必要がある場合に連絡する担当者の実名（ユーザ名などではなく）を指定してください。

これによって、ワークステーションのシステム管理者の名前をSNMPマネージャに対して指定することができ、またSNMP管理ステーションから連絡先情報を取得することができるようになります。

この情報単体で使用されることもあれば、［システム名］または［システム位置］に指定した情報とともに使用されることもあります。この設定は省略できます。


システム位'u
システム位置

プロパティページ：SNMP

タブ：SNMP

デフォルト：なし

ワークステーションの物理的な位置を指定します。

これによって、ワークステーションの物理的な位置をSNMPマネージャに対して指定することができ、またSNMP管理ステーションから位置情報を取得することができるようになります。

この情報単体で使用されることもあれば、［システム名］または［システムコンタクト］に指定した情報とともに使用されることもあります。この設定は省略できます。


システム-ｼ
システム名

プロパティページ：SNMP

タブ：SNMP

デフォルト：なし

自分のユーザ名を指定します。ユーザ名かログイン名、またはTCP/IPホスト名を指定してください。たとえば、ログイン名がTSUZUKIの場合は、TSUZUKIと指定してください。

これによって、ユーザ名をSNMPマネージャに対して指定できます。また、SNMP管理ステーションからユーザ名の情報を取得することができるようになります。

この情報単体で使用されることもあれば、［システム位置］または［システムコンタクト］に指定した情報とともに使用されることもあります。この設定は省略できます。


商*W、'�作権、*ﾛ証および特�-
商標、著作権、保証および特許

Copyright  1994-2003 Novell, Inc. All rights reserved.本書の一部または全体を無断で複写および転載することは、その形態を問わず禁じます。

U.S. Patent Nos.5,157,663; 5,349,642; 5,455,932; 5,553,139; 5,553,143; 5,594,863; 5,608,903; 5,633,931; 5,652,854; 5,671,414; 5,677,851; 5,692,129. U.S. and Foreign Patents Pending.

米国Novell, Inc.およびノベル株式会社は、本書の内容または本書を使用した結果について、いかなる保証、表明または約束も行っていません。また、本書の商品性、および特定の目的への適合性について、いかなる暗黙的な保証も否認し、排除します。米国Novell, Inc.およびノベル株式会社は、本書の内容を変更する権利を常に留保します。

米国Novell, Inc.およびノベル株式会社は、すべてのノベル製ソフトウェアについて、いかなる保証、表明または約束も行っていません。またノベル製ソフトウェアの商品性、および特定の目的への適合性について、いかなる暗黙的な保証も否認し、排除します。米国Novell, Inc.およびノベル株式会社は、ノベル製ソフトウェアの内容を変更する権利を常に留保します。

Novellの商標

Internetwork Packet ExchangeおよびIPXは、米国Novell, Inc.の商標です。

eDirectoryは、米国Novell, Inc.の商標です。

NetWareは、米国Novell, Inc.の米国ならびに他の国における登録商標です。

NetWare 4は、米国Novell, Inc.の商標です。

NetWare 5は、米国Novell, Inc.の商標です。

NetWare Core ProtocolおよびNCPは、米国Novell, Inc.の商標です。

NetWare/IPは、米国Novell, Inc.の商標です。

Novellは、米国Novell, Inc.の米国ならびに他の国における登録商標です。

Novell Clientは、米国Novell, Inc.の商標です。

Open Data-Link InterfaceおよびODIは、米国Novell, Inc.の商標です。

Packet Burstは、米国Novell, Inc.の商標です。

Sequenced Packet ExchangeおよびSPXは、米国Novell, Inc.の商標です。

サードパーティの商標

International Business MachinesおよびIBMは、International Business Machines Corporationの登録商標です。

Microsoftは、Microsoft Corporationの登録商標です。

MS-DOSは、Microsoft Corporationの登録商標です。

Network Driver Interface SpecificationおよびNDISは、PC-Plus Communications LPの商標です。

Windowsは、Microsoft Corporationの登録商標です。

Windows 95/98は、Microsoft Corporationの商標です。

Windows NT/2000/XPは、Microsoft Corporationの登録商標です。


ツリー

プロパティページ：Novell Client環境設定

タブ：クライアント

このリストは、eDirectory(tm)を使うNetWare(r) 4*以降のユーザ用に、eDirectoryツリー中の各ユーザオブジェクトの位置を指定する、［ツリーとネームコンテキスト］パラメータの一部分です。バインダリサービスを使ってNetWareサーバにログインする場合、このパラメータは使用されません。

このワークステーションを使って指定のツリーにログインするすべてのユーザに、ネームコンテキストが適用されます。複数のツリーにログインすることができるため、各ツリーには固有のネームコンテキストがあります。ログイン時にツリーおよびネームコンテキストを変更することができます。ただし、1人のユーザは、1つのツリーに対して1つのネームコンテキストしか持ちません。


ツリー（ログイン）
ツリー

Workstation Managerがワークステーションの管理に使用するツリーを指定します。


ツリーとカタログ

プロパティページ：Novell Client環境設定

タブ：コンテキストレスログイン

ログインセッション中に、使用可能なカタログが自動的に検出されます。ツリーとカタログの組み合わせを指定することにより、コンテキストレスログインを強制的に実行して、リスト中の各ツリーに対して特定のカタログが使用されるようにすることができます。


ツリーとネームコンテキスト

プロパティページ：Novell Client環境設定

タブ：クライアント

eDirectory(tm)を使うNetWare(r) 4*以降のユーザ用に、eDirectoryツリー中の各ユーザオブジェクトの位置を指定します。NetWare 3*サーバにログインする場合や、NetWare 4サーバにバインダリサービスを使ってログインする場合は、適用されません。

このワークステーションを使って指定のツリーにログインするすべてのユーザに、ネームコンテキストが適用されます。複数のツリーにログインすることができるため、各ツリーには固有のネームコンテキストがあります。ログイン時にツリーおよびネームコンテキストを変更することができます。ただし、1人のユーザは、1つのツリーに対して1つのネームコンテキストしか持ちません。


信-鰍ｷるツリー
信頼するツリー

プロパティページ：Novell(r) Workstation Manager

タブ：Workstation Manager

Workstation Managerが使用する、信頼するツリーを指定します。


上へ

項目をリスト内で1つ上の位置に移動するには、リストから項目を選択して、［上へ］をクリックします。


古いコンポーネントをすべてアップデートする

プロパティページ：インストール環境設定

タブ：セットアップ

デフォルト：有効

このボックスをチェックすると、インストールされているコンポーネントの中に古いバージョンのものがある場合は、すべてのコンポーネントがアップデートされます。このボックスがチェックされていない場合は、古いコンポーネントだけがすべてアップデートされます。


検出されたフレームタイプをすべて使-pする
検出されたフレームタイプをすべて使用する

プロパティページ：IPX 32ビットプロトコル

タブ：高度なIPX設定

デフォルト：On

検出したすべての論理ボードに、IPX(tm)が自動的にバインドするかどうかを指定します。

Onを指定すると、IPXはすべての論理ボードに対して自動的にバインドします。IPXの前に、LANドライバをロードしておく必要はありません。LANドライバがロードされていることをIPXが検出した場合、そのLANドライバが表す論理ボードにバインドします。

すべての論理ボードにバインドする必要がない場合は、［次のフレームタイプだけを使用する］に、必要な論理ボードだけを指定することにより、ワークステーションの性能を向上させることができます。


コンテキストの使-p（DHCP）
コンテキストの使用（DHCP）

プロパティページ：Novell Client環境設定

タブ：DHCP設定

デフォルト：無効

DHCPサーバにコンテキスト情報を照会し、その情報をドロップダウンリストから選択したロケーションプロファイルの［ログインサービス］セクションに設定します。


DHCPを使-p
DHCPを使用

プロパティページ：Novell(r) IPX(tm)互換アダプタ

タブ：パラメータ

デフォルト：有効

DHCPを有効にすると、IPX互換ドライバは、DHCPを通して、ネットワーク番号、エージェントリストの失効時刻、およびマイグレーションエージェントパラメータの設定を取得しようとします。DHCPを通して環境設定情報が得られない場合は、デフォルト設定が使用されます。


デフォルト設'閧g-p
デフォルト設定を使用

プロパティページ：Novell(r) IPX(tm)互換アダプタ

タブ：パラメータ

デフォルト：有効

有効にすると、［アダプタ］フィールドの下で［デフォルト設定］を指定した場合の設定が使用されます。

無効にすると、アダプタには指定した設定が使用されます。


NWIPカスタムポートを使-pする
NWIPカスタムポートを使用する

プロパティページ：NetWare/IP環境設定

タブ：パラメータ

デフォルト：Off

デフォルトのNWIPポート（0xABCD）を使わないネットワーク用のパラメータです。NetWare(r)/IP* 2.2ネットワークでNWIPデフォルトポートを正しく設定すれば、NWIPクライアントの起動速度を向上させることができます。


Novell GINAを使-pする
サードパーティGINA検出時にNovell GINAを使用する

プロパティページ：インストール環境設定

タブ：クライアント

デフォルト：On

サードパーティ製のGINAが検出されたときに、Novell(r) Client(tm) for Windows* NT/2000/XP*のGINA認証システムをインストールするかどうかを指定します。

［サードパーティGINA検出時にNovell GINAの使用を確認する］が［いいえ］に設定されており、［サードパーティGINA検出時にNovell GINAを使用する］が［はい］に設定されていると、Novell GINAは常にインストールされます。

［サードパーティGINA検出時にNovell GINAの使用を確認する］が［いいえ］に設定されており、［サードパーティGINA検出時にNovell GINAを使用する］が［いいえ］に設定されていると、サードパーティ製のGINA（Microsoft* GINAを除く。この場合はNovell GINAによって常に置き換えられます。）が検出された場合、Novell GINAは使用されません。

［サードパーティGINA検出時にNovell GINAの使用を確認する］が［はい］に設定されている場合、［サードパーティGINA検出時にNovell GINAを使用する］の設定によって、ダイアログボックス上でどのボタンがデフォルトになるかが決まります。


次のフレームタイプだけを使-pする
次のフレームタイプだけを使用する

プロパティページ：IPX 32ビットプロトコル

タブ：高度なIPX設定

デフォルト：Off

IPX(tm)がバインドする論理ボードを指定します。論理ボードを指定するには、フレームタイプを選択してください。フレームタイプを1つ選択するごとに［追加］をクリックして、リストに論理ボードを追加してください。

提示されているすべての論理ボードを使用する必要がない場合は、必要な論理ボードだけを指定することにより、ワークステーションの性能を向上させることができます。


ツリーの使-p（DHCP）
ツリーの使用（DHCP）

プロパティページ：Novell Client環境設定

タブ：DHCP設定

デフォルト：無効

DHCPサーバにツリー情報を照会し、その情報をドロップダウンリストから選択したロケーションプロファイルの［ログインサービス］セクションに設定します。


ユーザ

プロパティページ：IP Gateway

IP Gatewayを使用する、ユーザの名前が表示されます。


ユーザ-ｼ（TSA）
ユーザ名

プロパティページ：Target Service Agent

タブ：TSA情報

ワークステーション上でのTSA（Target Service Agent）の実行を許可するユーザの名前を入力してください。


*ﾏ数 %2
変数

プロパティページ：Novell Client環境設定

タブ：カスタムログイン

ログインスクリプトで使用する変数を、最大4つまで定義することができます。ユーザまたはネットワーク管理者は、ログインスクリプトを設定して、これらの変数を使用することができます。

たとえば、1つの変数を定義して、メールサーバにドライブをマップすることができます。

変数を定義するには

注記：この手順を完了するには、最初に、［カスタムログイン］プロパティページにある［カスタムボタン］および［変数ボタン］ボックスをチェックする必要があります。［NetWareログイン］ダイアログボックスに［カスタムボタン］がない場合、これらのボックスがチェックされていないことがわかります。

1. システムトレイにある赤いNのアイコンを右クリックします。

2. ［NetWareログイン］>［詳細］>［スクリプト］>［変数］の順にクリックします。

3. 使用する変数を適切なフィールドに入力します。最大64文字までの変数名を指定することができます。

これらのパラメータは、DOS中でLOGINコマンドに渡すパラメータにそれぞれ対応しています。


*ﾏ数 %3
変数

プロパティページ：Novell Client環境設定

タブ：カスタムログイン

ログインスクリプトで使用する変数を、最大4つまで定義することができます。ユーザまたはネットワーク管理者は、ログインスクリプトを設定して、これらの変数を使用することができます。

たとえば、1つの変数を定義して、メールサーバにドライブをマップすることができます。

変数を定義するには

注記：この手順を完了するには、最初に、［カスタムログイン］プロパティページにある［カスタムボタン］および［変数ボタン］ボックスをチェックする必要があります。［NetWareログイン］ダイアログボックスに［カスタムボタン］がない場合、これらのボックスがチェックされていないことがわかります。

1. システムトレイにある赤いNのアイコンを右クリックします。

2. ［NetWareログイン］>［詳細］>［スクリプト］>［変数］の順にクリックします。

3. 使用する変数を適切なフィールドに入力します。最大64文字までの変数名を指定することができます。

これらのパラメータは、DOS中でLOGINコマンドに渡すパラメータにそれぞれ対応しています。


冗'ｷ
冗長

プロパティページ：NetWare/IP環境設定

タブ：パラメータ

デフォルト：Off

NetWare(r)/IP*のトラブルシューティングを行う必要がある場合、このボックスをチェックしてください。Onを指定すると、詳細なNetWare/IPメッセージがログに記録されます。


バージョン

プロパティページ：Novell Client環境設定

タブ：クライアント

クライアントのバージョン番号を示します。


ワイルドカード検索を�-可する
ワイルドカード検索を許可する

プロパティページ：Novell Client環境設定

タブ：コンテキストレスログイン

デフォルト：無効（チェックマークなし）

ワイルドカード検索を許可すると、ユーザ名中にワイルドカードを使用することができ、ユーザ名全体を入力する必要がありません。

たとえば、ユーザ名JLOPEZに対して、｢JLOP*｣と入力することができます。


ワークステーションのeDirectory更新間隔

プロパティページ：Novell(r) Workstation Manager

タブ：Workstation Manager

範囲：1～60000（分）

デフォルト：  30

Workstation Managerサービスが認証された後、スケジュールされたアクションがワークステーションに追加または削除されていないかどうかを確認するために、定期的にeDirectoryに対してポーリングが行われます。このポーリング間隔を指定してください。


チック

IBM* PCおよびその互換コンピュータの場合、1秒はおよそ18.21チックになります。目安を以下に示します。

3秒は54チック

30秒は545チック

1分は1090チック

5分は5460チック


*ﾏ数 %4
変数

プロパティページ：Novell Client環境設定

タブ：カスタムログイン

ログインスクリプトで使用する変数を、最大4つまで定義することができます。ユーザまたはネットワーク管理者は、ログインスクリプトを設定して、これらの変数を使用することができます。

たとえば、1つの変数を定義して、メールサーバにドライブをマップすることができます。

変数を定義するには

注記：この手順を完了するには、最初に、［カスタムログイン］プロパティページにある［カスタムボタン］および［変数ボタン］ボックスをチェックする必要があります。［NetWareログイン］ダイアログボックスに［カスタムボタン］がない場合、これらのボックスがチェックされていないことがわかります。

1. システムトレイにある赤いNのアイコンを右クリックします。

2. ［NetWareログイン］>［詳細］>［スクリプト］>［変数］の順にクリックします。

3. 使用する変数を適切なフィールドに入力します。最大64文字までの変数名を指定することができます。

これらのパラメータは、DOS中でLOGINコマンドに渡すパラメータにそれぞれ対応しています。


*ﾏ数 %5
変数

プロパティページ：Novell Client環境設定

タブ：カスタムログイン

ログインスクリプトで使用する変数を、最大4つまで定義することができます。ユーザまたはネットワーク管理者は、ログインスクリプトを設定して、これらの変数を使用することができます。

たとえば、1つの変数を定義して、メールサーバにドライブをマップすることができます。

変数を定義するには

注記：この手順を完了するには、最初に、［カスタムログイン］プロパティページにある［カスタムボタン］および［変数ボタン］ボックスをチェックする必要があります。［NetWareログイン］ダイアログボックスに［カスタムボタン］がない場合、これらのボックスがチェックされていないことがわかります。

1. システムトレイにある赤いNのアイコンを右クリックします。

2. ［NetWareログイン］>［詳細］>［スクリプト］>［変数］の順にクリックします。

3. 使用する変数を適切なフィールドに入力します。最大64文字までの変数名を指定することができます。

これらのパラメータは、DOS中でLOGINコマンドに渡すパラメータにそれぞれ対応しています。


サーバを使う

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:DHCP�設定

デフォルト:無効

DHCPサーバにサーバ情報を問い合わせ、ドロップダウンリストから選択されるロケーションプロファイルの［ログインサービス］セクションに、その情報を設定します。

［バイナリデータ］チェックボックスがオンの場合、DHCPサーバから受信されるデータはIPアドレス(バイナリデータ)になります。

チェックボックスがオフの場合(デフォルト)は、DHCPサーバから受信されるデータはサーバ、ツリー、およびコンテキスト情報(文字列データ)になります。


LDAPコンテキストレスログイン有効
LDAPコンテキストレスログインを有効にする

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン

デフォルト:無効

LDAPコンテキストレスログインを有効にするには、このチェックボックスをオンにします。LDAPコンテキストレスログインを利用するには、企業ツリーをホストする企業サーバにLDAP Services for eDirectory(tm)をインストールする必要があります。


LDAPコンテキストレスログインのポート

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン

LDAPコンテキストレスログインがLDAPサーバと通信するために使用するポートを指定します。


LDAPコンテキストレスログインのタイムアウト
LDAPコンテキストレスログインの接続タイムアウト

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン

デフォルト:10秒

LDAPコンテキストレスログインが要求をキャンセルするまでの待機秒数を指定します。


LDAPコンテキストレスログインの証明書
LDAPコンテキストレスログインの証明書の名前と位置

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン

LDAPコンテキストレスログインがLDAPサーバとのセキュリティ保護された接続を確立するために使用する、ワークステーション上の証明書へのパスと名前を指定します。


LDAPツリーリスト

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン

ログイン中に検索される、LDAPサービスを実行しているツリーを表示します。


LDAPツリーの［追加］ボタン

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン

LDAPサービスを実行しているツリーを、ログイン中に検索されるツリーのリストに追加するには、［ツリー］ボックスにツリー名を入力し、［追加］をクリックします。


LDAPツリーの［削除］ボタン

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン

LDAPサービスを実行している1つ以上のツリーを削除するには、ツリーを選択して［削除］をクリックします。このツリーはログイン中に検索されなくなります。


LDAPツリーの［プロパティ］ボタン

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン

ツリーのコンテキストスコープ情報を設定するには、リストからツリーを選択し、［プロパティ］をクリックします。［コンテキスト内のみを検索する］を選択すると、検索スコープを制限できます。


LDAPサーバリスト

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン

LDAPサービスを実行しているツリーに関連付けられたサーバを表示します。


LDAPサーバの［追加］ボタン

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン

LDAPサービスを実行しているツリーに関連付けられたサーバを追加するには、［サーバ］ボックスにサーバ名を入力し、［追加］をクリックします。サーバの検索は、このリストに表示されている順に実行されます。検索順は並べ替えることができます。


LDAPサーバの［削除］ボタン

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン

1つ以上のLDAPサーバを削除するには、サーバを選択し、［削除］をクリックします。


LDAPサーバの［プロパティ］ボタン

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン

LDAPサーバのタイムアウト設定およびデータ暗号化設定を設定するには、リストからサーバを選択し、［プロパティ］をクリックします。


LDAPサーバの［上へ］ボタン

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン

検索リストで移動するサーバを選択し、［上へ］をクリックします。サーバは検索リストの1つ上の場所に移動します。サーバの検索は、リストに表示されている順に実行されます。


LDAPサーバの［下へ］ボタン

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン

検索リストで移動するサーバを選択し、［下へ］をクリックします。サーバは検索リストの1つ下の場所に移動します。サーバの検索は、リストに表示されている順に実行されます。


LDAPコンテキスト検索スコープを有効にする

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン:コンテキスト検索スコープ

デフォルト:無効

特定のコンテキスト、または特定のコンテキストとサブツリーに検索スコープを制限できます。


コンテキストリスト

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン:コンテキスト検索スコープ

LDAPコンテキストレスログインが検索する、ツリー内のコンテキストを表示します。コンテキストの検索は、リストに表示されている順に実行されます。

コンテキストには、ou=organizational_unit,o=organizationのように、コンマ区切り記号により識別されたLDAPコンテキストを入力します。

LDAPコンテキストレスログインは、ツリー内の指定されたコンテキストからユーザを検索します。

コンテキスト検索スコープは1つ以上指定できます。コンテキスト検索スコープの検索は、リストに表示されている順に実行されます。検索順は並べ替えることができます。


コンテキストの［追加］ボタン

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン:コンテキスト検索スコープ

LDAPコンテキストレスログインによって検索されるコンテキストを入力し、［追加］をクリックします。コンテキストは、ou=organizational_unit,o=organizationのように、コンマ区切り記号により識別されたLDAPコンテキストである必要があります。

LDAPコンテキストレスログインは、ツリー内の指定されたコンテキストからユーザを検索します。


コンテキストの［削除］ボタン

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン:コンテキスト検索スコープ

LDAPコンテキストレスログインの検索リストから削除するツリー内のコンテキストを1つ以上選択し、［削除］をクリックします。削除されたコンテキストは検索されなくなります。


コンテキストの［置換］ボタン

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン:コンテキスト検索スコープ

置き換えるコンテキストをコンテキストリストから選択し、［コンテキスト］テキストフィールドに新しいコンテキスト情報を入力して、［置換］をクリックします。コンテキストは、ou=organizational_unit,o=organizationのように、コンマ区切り記号により識別されたLDAPコンテキストである必要があります。古いコンテキスト情報は新しいコンテキスト情報と置き換えられますが、リスト内でのコンテキストの順序は維持されます。


コンテキストの［上へ］ボタン

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン:コンテキスト検索スコープ

検索リストで移動するコンテキストを選択し、［上へ］をクリックします。コンテキストは検索リストの1つ上の場所に移動します。コンテキストの検索は、リストに表示されている順に実行されます。


コンテキストの［下へ］ボタン

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン:コンテキスト検索スコープ

検索リストで移動するコンテキストを選択し、［下へ］をクリックします。コンテキストは検索リストの1つ下の場所に移動します。コンテキストの検索は、リストに表示されている順に実行されます。


ツリーレスログインを有効にする
LDAPツリーレスログインを有効にする

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン

デフォルト:無効

ツリーレスログインを有効にするには、このチェックボックスをオンにします。ツリーレスログインにより、ツリーを指定せずにネットワークにログインできるようになります。


LDAPコンテキストレスログインのクリアテキストパスワード
LDAPコンテキストレスログインの非暗号化データ

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン:LDAPサーバのプロパティ

クリアテキスト形式でパスワードを転送できるようにするには、［非暗号化データ］を選択します。非暗号化データのセキュリティは、SSLほど高くありません。


LDAPコンテキストレスログインの暗号化データ(SSL)

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン:LDAPサーバのプロパティ

セキュアソケットレイヤ(SSL)を使用してデータを暗号化するには、［暗号化データ(SSL)］を選択します。


LDAPコンテキストレスログインの暗号化データ(SSL)

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン:LDAPサーバのプロパティ

LDAPコンテキストレスログインがSSL暗号化を使用してLDAPサーバと通信するために使用するポートを指定します。


LDAPコンテキストレスログインの検索のタイムアウト

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン:LDAPサーバのプロパティ

デフォルト:10秒

LDAPコンテキストレスログインが検索をキャンセルするまでの検索秒数を指定します。


コンテキストの［コンテキストとサブツリー内を検索する］
コンテキストとサブツリー内を検索する

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン:コンテキスト検索スコープ

指定されたコンテキストおよびそのコンテキスト内の任意のコンテナの検索を有効にするには、［コンテキストとサブツリー内を検索する］を選択します。


コンテキストの［コンテキスト内のみを検索する］
コンテキスト内のみを検索する

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:LDAPコンテキストレスログイン

指定されたコンテキスト内のみの検索を有効にするには、［コンテキスト内のみを検索する］を選択します。


自動アップデートエージェントを有効にする

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:アップデートエージェント

デフォルト:無効

Novell Client自動アップデートエージェントが自動的に起動するようにするには、［自動アップデートエージェントを有効にする］チェックボックスをオンにします。アップデートエージェントは、Novell Clientの新しいバージョンを、指定された位置で、指定された間隔を置いて検索します。アップデートエージェントは、ログインプロセスの一環として自動的に起動されます。アップデートエージェントを自動的に起動しないようにするには、このチェックボックスをオフにします。


自動アップデートエージェントの起動間隔

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:アップデートエージェント

デフォルト:7日

Novell Client自動アップデートエージェントがNovell Clientの新しいバージョンをチェックするために自動的に起動する間隔を、日数で設定します。デフォルト=


アップデート位置を有効にする

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:アップデートエージェント

デフォルト:無効

このチェックボックスをオンにすると、Novell Client自動アップデートエージェントは、指定されたアップデート位置にNovell Clientの新しいバージョンがあるかを調べます。

アップデートエージェントは、最初に［アップデート位置］を調べ、次に［以前のインストール位置］、最後に［Novell ClientアップデートのWebサイト］の順にアップデートを調べます。

注意: アップデートエージェントは、有効にされた位置ごとに有効なファイルタイプがあるかを調べ、有効なファイルタイプを検出すると停止します。アップデートエージェントが検索する最初の位置に、最新のファイルを置くようにしてください。


アップデート位置

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:アップデートエージェント

自動アップデートエージェントが、Novell Clientソフトウェアの新しいバージョンをチェックする場所を指定します。これにはUNCパス、マップされたドライブ、またはURLを指定できます。


以前のインストール位置を有効にする

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:アップデートエージェント

デフォルト:無効

Novell Client自動アップデートエージェントが、Novell Clientソフトウェアが最後にインストールされたのと同じ位置で、Novell Clientソフトウェアの新しいバージョンを調べるようにするには、このチェックボックスをオンにします。この位置は編集できません。

アップデートエージェントは、最初に［アップデート位置］を調べ、次に［以前のインストール位置］、最後に［Novell ClientアップデートのWebサイト］の順にアップデートを調べます。

注意: アップデートエージェントは、指定された場所ごとに有効なファイルタイプがあるかを調べ、有効なファイルタイプを検出すると停止します。アップデートエージェントが検索する最初の場所に、最新のファイルを置くようにしてください。


以前のインストール位置

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:アップデートエージェント

現在のNovell Clientがどこからインストールされたかを表示します。この位置は編集できません。


Novell ClientアップデートのWebサイトを有効にする

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:アップデートエージェント

デフォルト:無効

Novell Client自動アップデートエージェントが、指定されたアップデートWebサイトで、Novell Clientの新しいバージョンを調べるようにするには、このボックスをオンにします。

アップデートエージェントは、最初に［アップデート位置］を調べ、次に［以前のインストール位置］、最後に［Novell ClientアップデートのWebサイト］の位置の順にアップデートを調べます。

注意: アップデートエージェントは、指定された場所ごとに有効なファイルタイプがあるかを調べ、有効なファイルタイプを検出すると停止します。アップデートエージェントが検索する最初の場所に、最新のファイルを置くようにしてください。


Novell ClientアップデートのWebサイト

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:アップデートエージェント

自動アップデートエージェントが、Novell Clientソフトウェアの新しいバージョンをチェックするWebサイトを指定します。これにはIPアドレスまたはDNS名を指定できます。


unattendファイル

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:アップデートエージェント

Novell Clientをアップデートするかを判断するために自動アップデートエージェントが使用するunattendファイルの名前を指定します。［アップデート位置］または［以前のインストール位置］を有効にした場合は、それらの場所にunattendファイルを置く必要があります。［Novell ClientアップデートのWebサイト］でunattendファイルを指定することはできません。


Service Packのアップデートを有効にする

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:アップデートエージェント

デフォルト:無効

Novell Client自動アップデートエージェントが、指定されたアップデート位置でNovell Clientサポートパックをチェックできるようにするには、このボックスをオンにします。

注意: アップデートエージェントは、指定された場所ごとに有効なファイルタイプがあるかを調べ、有効なファイルタイプを検出すると停止します。アップデートエージェントが検索する最初の場所に、最新のファイルを置くようにしてください。


［バイナリデータ］チェックボックス

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:DHCP�設定

デフォルト:無効

［バイナリデータ］チェックボックスがオンの場合、DHCPサーバから受信されるデータはIPアドレス(バイナリデータ)になります。

チェックボックスがオフの場合(デフォルト)は、DHCPサーバから受信されるデータはサーバ、ツリー、およびコンテキスト情報(文字列データ)になります。


初期Novellログイン

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:カスタムログイン

デフォルト:無効

ワークステーションが起動したときに初回Novellログインのウィンドウが最初に表示されないようにするには、このチェックボックスをオフにします。


OEM/拡張ASCIIパスワード

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:カスタムログイン

デフォルト:無効

パスワードでOEM拡張ASCII文字を使用できるようにするには、このボックスをオンにします。OEM拡張ASCII文字は、OEMコードページの使用が必要なレガシーソフトウェアが存在する場合にのみ使用してください。

最新バージョンのNovell Clientは、UNICODEコードページを使用して拡張ASCII文字をサポートしているため、&Ntilde;や&euro;などの特殊文字を処理するためにこの設定を有効にする必要はありません。


NMAS認証

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:カスタムログイン

デフォルト:有効

ログイン中にNMAS (Novell Modular Authentication Service)を有効にするには、このボックスをオンにします。NMAS認証によって、ネットワークのセキュリティがさらに強化されます。ただし、ネットワークがNMASを使用していない場合は、ログインに要する時間が長くなることがあるため、NMASを無効にする必要があります。


ログイン時のツリーの表示

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:カスタムログイン

デフォルト:有効

［ログイン］ダイアログボックスにツリーを表示するかどうかを指定します。


ログイン時のツリーボタンの表示

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:カスタムログイン

デフォルト:有効

［ログイン］ダイアログボックスに［ツリー］参照ボタンを表示するかどうかを指定します。


ログイン時のコンテキストの表示

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:カスタムログイン

デフォルト:有効

［ログイン］ダイアログボックスにコンテキストを表示するかどうかを指定します。


ログイン時のコンテキストボタンの表示

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:カスタムログイン

デフォルト:有効

［ログイン］ダイアログボックスに［コンテキスト］参照ボタンを表示するかどうかを指定します。


ログオフの強制ボタンの表示

プロパティページ:Novell(r) Client(tm)�環境設定

タブ:カスタムログイン

デフォルト:無効

ワークステーションがロックされているときに、［ログイン］ダイアログボックスに［ログオフの強制ボタン］を表示するかどうかを指定します。［ログオフの強制実行］により、ワークステーションがロックされていても、以前ログインしていたユーザのNovell Clientセッションを終了できます。

警告:以前のユーザが開始した、保存されていない作業は、すべて失われます。開いているアプリケーションと現在のネットワーク接続を維持するには、以前ログインしたユーザ名とパスワードでログインしてください。


このログインでSingle Sign onを有効にしない

プロパティページ:  Novell(r) Client(tm) の環境設定

タブ:  カスタムログイン

［ログイン］ダイアログボックスに［このログインでSingle Sign onを有効にしない］チェックボックスを表示するかどうかを指定します。  このチェックボックスは、Novell シングルサインオン製品がワークステーションにインストールされている場合のみ、［ログイン］ダイアログボックスに表示されます。  チェックボックスにより、現在のログイン操作のシングルサインオンプロセスを無効にできます。


アップデートプロンプトを表示しない

プロパティページ:  Novell(r) Client(tm)の環境設定

タブ:  アップデートエージェント

デフォルト:  無効

アップデートエージェントがアップデートの必要性を調べるときに表示されるアップデートプロンプトを表示しないようにする場合は、このチェックボックスをオンにします。このチェックボックスがオンの場合、ユーザに対して何も表示せず自動的にアップデートが開始されます。


NICIとNMASのインストール
NMASのインストール

プロパティページ:インストール環境設定

タブ:セットアップ

デフォルト: 有効

このチェックボックスをオンにすると、Novell Modular Authentication Services� (NMAS�)がインストールされます。NMASは、NetWareｮ 6.5以降で使用されるパスワード認証の重要な部分です。NMASをインストールしてネットワークで使用しないと、ログインに時間がかかる場合があります。この製品のインストールをスキップする場合は、このチェックボックスをオフにします。

注意:この製品をインストールした場合でも、［Novell Clientの環境設定］ページの［カスタムログイン］タブで［NMAS認証］チェックボックスをオフにすることにより、この製品の使用を無効にすることができます。


NetIdentityのインストール

プロパティページ:  インストール環境設定

タブ:  セットアップ

デフォルト:  無効

このチェックボックスをオンにすると、NetIdentityエージェントがインストールされます。NetIdentityエージェントは、Novell(r) Client(tm)認証とともに動作して、Novell iManager、iPrint、Novell iFolder(r)など、Novell eDirectory(tm)の認証を必要とするWebベースアプリケーションへのバックグラウンド認証を可能にします。

このエージェントをインストールすると、NetIdentityエージェントを使用するWebベースアプリケーションやNovell Clientのログインを通じてeDirectoryの認証を受けたユーザについては、eDirectoryの認証を必要とする別のアプリケーションを起動しても、ログインプロンプトが表示されなくなります。

このチェックボックスをオフにすると、NetIdentityエージェントはインストールされず、ユーザはアプリケーションごとにログインしなければならなくなります。


アップデートエージェントのシステム管理権を有効にする

プロパティページ:  Novell(r) Client(tm)の環境設定

タブ:  アップデートエージェント

デフォルト:  有効

ワークステーション上でNovell Clientアップデートエージェントにシステム管理権を持たせる場合は、このチェックボックスをオンにします。  Novell Clientをアップデートするには、アップデートエージェントにシステム管理権が必要です。これは、ワークステーションのシステム管理ユーザでないユーザがワークステーションにログインしている場合に便利です。

このチェックボックスをオフにすると、アップデートエージェントは現在ログインしているユーザの権利で起動します。


NICIのインストール
NICI???????

プロパティページ:インストール環境設定

タブ:セットアップ

デフォルト:有効

このチェックボックスをオンにすると、Novellｮ International Cryptographic Infrastructure (NICI)がインストールされます。その他のNovell製品と同様に、Novell Modular Authentication Services� (NMAS�)を使用するにはNICIが必要です。NICIを必要とするNMASまたはその他のNovell製品を使用しない場合は、この製品をインストールする必要はありません。この製品のインストールをスキップする場合は、このチェックボックスをオフにします。