Copyright: Copyright ® 2000 Novell, Inc.


Nome 1a intestazione

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Cattura di default

Specifica il testo stampato nella metà superiore della pagina dell'intestazione. Il testo può avere una lunghezza massima pari a 12 caratteri.


Nome 2a intestazione

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Cattura di default

Specifica il testo stampato nella metà inferiore della pagina dell'intestazione. Il testo può avere una lunghezza massima pari a 12 caratteri.


Accetta contratto di licenza

Pagina delle proprietà: Configurazione dell'installazione

Scheda: Imposta

Se questo parametro è disattivato, durante l’installazione verrà visualizzato il contratto di licenza,. Al contrario, se è attivo, il contratto di licenza non verrà visualizzato, ma l’utente dovrà dichiarare di accettare il contratto da parte dell’azienda e sarà ritenuto responsabile della conformità con i termini e le condizioni del contratto dagli utenti dell’azienda.


Adattatore

Pagina delle proprietà: Modalità di compatibilità Novell®

Scheda: Adattatori

Selezionare l’adattatore di rete che si desidera utilizzare.


Adattatore (pagina delle proprietà della modalità di compatibilità)
Adattatore

Pagina delle proprietà: Adattatore di compatibilità Novell® IPX™

Scheda: Parametri

Selezionare l’adattatore di cui si desidera modificare le impostazioni. Le impostazioni specificate tramite l’opzione Impostazioni di default si applicano a tutti gli adattatori che hanno la casella di controllo Usa impostazioni di default selezionata. Al contrario, l’adattatore non utilizzerà le impostazioni di default. Le modifiche apportate verranno applicate agli adattatori non ancora configurati.


Aggiunta di ulteriori percorsi di ricerca

Pagina delle proprietà: Configurazione MIB delle risorse dell'host

Scheda: Ricerca software

Dopo aver specificato una directory, fare clic su Aggiungi per aggiungerla alla lista Percorsi di ricerca aggiuntivi.


Pulsante Aggiungi

Dopo avere immesso il nome di un nuovo elemento, fare clic su Aggiungi per aggiungerlo alla lista.


Aggiunta di tipi di frame

Pagina delle proprietà: Protocollo IPX™ a 32 bit

Scheda: IPX avanzato

Dopo aver selezionato un tipo di frame, fare clic su Aggiungi per aggiungerlo alla lista delle schede logiche a cui IPX dovrebbe essere associato.


Aggiunta di modem locali

Pagina delle proprietà: Configurazione MIB delle risorse dell'host

Scheda: Stampanti e modem

Dopo aver specificato un modem, fare clic su Aggiungi per aggiungerlo alla lista dei modem locali.


Aggiunta di stampanti locali

Pagina delle proprietà: Configurazione MIB delle risorse dell'host

Scheda: Stampanti e modem

Dopo aver specificato una stampante, fare clic su Aggiungi per aggiungerla alla lista delle stampanti locali.


Aggiunta di unità nastro locali

Pagina delle proprietà: Configurazione MIB delle risorse dell'host

Scheda: Unità nastro

Dopo aver specificato un’unità nastro, fare clic su Aggiungi per aggiungerla alla lista delle unità nastro locali.


Aggiunta di campi di variabilità
Aggiungi

Dopo avere immesso il nome di un nuovo elemento, fare clic su Aggiungi per aggiungerlo alla lista.


Aggiunta della coppia albero e contesto

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Client

Fare clic su questo pulsante per aggiungere un nuova coppia albero e contesto. Immettere quindi il nome dell’albero e il contesto di default e fare clic su OK.


Componenti aggiuntivi

Pagina delle proprietà: Configurazione dell'installazione

Scheda: Componenti aggiuntivi

Elenca i prodotti Novell® che possono essere installati con il client. Selezionare gli elementi da includere durante un’installazione automatica tramite le caselle di controllo appropriate.


Percorsi di ricerca aggiuntivi

Pagina delle proprietà: Configurazione MIB delle risorse dell'host

Scheda: Ricerca software

Questa impostazione facoltativa specifica le directory in cui il MIB delle risorse dell'host cerca i file di programma.

Quando la casella di controllo accanto alla directory è selezionata, la ricerca avviene anche in tutte le sottodirectory di quella directory.

Le directory specificate vengono aggiunte a quelle ricercate a causa dell’impostazione dell’opzione Livelli di directory in cui cercare a partire dalla radice.

Le informazioni relative ai programmi vengono utilizzate dalla console di gestione di rete e sono utili per tenere traccia del software sulle workstation client.


Tempo di stallo lista Agenti

Pagina delle proprietà: Adattatore di compatibilità Novell® IPX™

Scheda: Parametri

Intervallo: da 0 a 65535 (minuti)

Default: 15

Specificare l’intervallo di tempo minimo al termine del quale il client aggiornerà le informazioni di indirizzamento dell’agente di migrazione.

Questa impostazione viene usata solo quando il client rileva dinamicamente gli agenti di migrazione.

Un’impostazione pari a 0 fa sì che il client non aggiorni le informazioni di indirizzamento dell’agente di migrazione dopo la rilevazione di un agente di migrazione.

Se tale impostazione ha un valore troppo elevato, il recupero da parte del client potrebbe essere difficoltoso dopo la rimozione di un agente di migrazione.

Se, al contrario, l’impostazione ha un valore troppo basso, il client potrebbe accedere alle informazioni di rete troppo spesso, creando in questo modo una quantità di traffico elevata.


Consenti utente di backup

Pagina delle proprietà: Preferenze TSA

Scheda: Preferenze

Selezionare questa casella di controllo per concedere i diritti di backup all’utente di backup. I diritti concessi all’utente dipendono dal gruppo al quale appartiene.


Consenti la sorveglianza della connessione

Pagina delle proprietà: Protocollo IPX™ a 32 bit

Scheda: SPX

Default: Attivo

Selezionare questa casella di controllo per fare in modo che SPX rispetti le richieste di applicazione per la sorveglianza della connessione.

Deselezionare questa casella di controllo per costringere SPX a ignorare le richieste di sorveglianza della connessione.


Consenti accesso di IPX via interrupt 64H

Pagina delle proprietà: Protocollo IPX a 32 bit

Scheda: IPX

Default: Attivo

Selezionare questa casella di controllo per consentire alle applicazioni DOS di usare l’interrupt 64h per accedere ai servizi IPX™.

Deselezionare questa casella di controllo se si verificano problemi con un’applicazione DOS dovuti alla connessione di IPX all’interrupt 64h.

Deselezionare questa casella di controllo per consentire alle applicazioni di usare l’interrupt 64h per operazioni diverse dall’accesso ai servizi IPX.

Se un'applicazione può essere utilizzata con versioni precedenti di NetWare® ma viene eseguita con NetWare 3.1, deselezionare questa casella di controllo.

Le applicazioni dovrebbero utilizzare l'interrupt 2Fh per ottenere l'indirizzo di chiamata FAR (File Address Register), quindi utilizzare tale indirizzo per accedere ai servizi IPX. Si preferisce questo metodo, perché rende effettivamente superfluo l’uso conflittuale dell’interrupt 64h.


Consenti accesso IPX via interrupt 7AH

Pagina delle proprietà: Protocollo IPX a 32 bit

Scheda: IPX

Default: Attivo

Selezionare questa casella di controllo per consentire alle applicazioni DOS di usare l’interrupt 7Ah per accedere ai servizi IPX™.

Deselezionare questa casella di controllo se si verificano problemi con un’applicazione DOS dovuti alla connessione di IPX all’interrupt 7Ah.

Deselezionare questa casella di controllo per consentire alle applicazioni di usare l’interrupt 7Ah per operazioni diverse dall’accesso ai servizi IPX.

Se un'applicazione può essere utilizzata con versioni precedenti di NetWare® ma viene eseguita con NetWare 3.1, deselezionare questa casella di controllo.

Le applicazioni dovrebbero utilizzare l'interrupt 2Fh per ottenere l'indirizzo di chiamata FAR (File Address Register), quindi utilizzare tale indirizzo per accedere ai servizi IPX. Si preferisce questo metodo, perché rende effettivamente superfluo l’uso conflittuale dell’interrupt 7Ah.


Chiedi di riavviare al termine

Pagina delle proprietà: Configurazione dell'installazione

Scheda: Imposta

Default: Attivo

Se tale parametro è impostato su attivo, la schermata d’installazione finale verrà visualizzata al termine del processo di installazione. Questa schermata avvisa l’utente che è necessario riavviare la workstation prima che la nuova installazione sia effettiva e chiede se si desidera effettuare l’operazione.

Se è disattivata, la workstation verrà riavviata automaticamente al termine del processo di installazione.


Chiedi di installare NetWare/IP

Pagina delle proprietà: Configurazione dell'installazione

Scheda: Imposta

Default: Disattivo

Questa opzione funziona con il parametro Installa NetWare®/IP*. Sono possibili i seguenti scenari:

AskNetWareIP=No	InstallNetWareIP=No

Non viene chiesto se si desidera installare NetWare/IP che, pertanto, non verrà installato.

AskNetWareIP=No	InstallNetWareIP=Yes

NetWare/IP viene installato automaticamente senza chiedere conferma.

AskNetWareIP=Yes

Viene chiesto se si desidera installare NetWare/IP. Selezionare Sì o No. Se s’imposta AskNetWareIP su Sì, non è necessario installare il parametro InstallNetWareIP. È comunque possibile impostare il parametro InstallNetWareIP per determinare se Sì o No è il pulsante di default del prompt.

AskNetWareIP=Yes	InstallNetWareIP=Yes

Nel prompt in cui viene chiesto se si desidera installare NetWare/IP, verrà visualizzato il pulsante Sì come default.

AskNetWareIP=Yes	InstallNetWareIP=No

Nel prompt in cui viene chiesto se si desidera installare NetWare/IP, verrà visualizzato il pulsante No come default.


Chiedi di rimuovere Microsoft NetWare Client

Pagina delle proprietà: Configurazione dell'installazione

Scheda: Imposta

Default: Disattivo

Se questo parametro è attivo, all’utente della workstation viene chiesto se desidera cancellare il client Microsoft durante l’installazione. Se viene disattivato, il client Microsoft* verrà rimosso senza richiedere nulla all’utente.


Chiedi di usare Novell GINA

Pagina delle proprietà: Configurazione dell'installazione

Scheda: Imposta

Default: Disattivo

Se questo parametro è attivo, all’utente della workstation viene chiesto se desidera usare Novell® GINA al posto di un GINA diverso già installato. Si consiglia di disattivare questo parametro. In tal caso, la finestra di dialogo non verrà visualizzata e Novell GINA verrà installato.


Chiedi di usare Novell GINA se viene trovato un GINA diverso

Pagina delle proprietà: Configurazione del client Novell

Scheda: Client

Default: Abilitato

Se la workstation usa un GINA diverso da quello di Novell®, l’abilitazione di queste impostazioni richiede all’utente se usare Novell GINA al posto di un GINA diverso.

Se questa impostazione non è attiva e l’opzione Usa Novell GINA se viene trovato un GINA diverso è abilitata, Novell GINA verrà usato senza richiedere nulla all’utente.


Rileva automaticamente configurazione

Pagina delle proprietà: Configurazione NetWare/IP

Scheda: Parametri

Default: Disattivo

Selezionare questo parametro, se DHCP viene configurato per fornire i parametri NetWare®/IP*.


Fine ridirezionamento automatico

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Cattura di default

Default: Attivo

Selezionare questa casella di controllo, se si desidera chiudere e inviare tutti i dati catturati alla stampante al termine dell’utilizzo di una applicazione. In caso contrario, deselezionare questa casella di controllo. (Quest’ultima operazione consente di aggiungere più informazioni al lavoro di stampa).


Registrazione automatica

Pagina delle proprietà: Preferenze TSA

Scheda: Preferenze

Selezionare la casella di controllo Registrazione automatica per la registrazione automatica al TSAProxy all’avvio. In caso contrario, è possibile effettuare la registrazione facendo clic su Registra nella finestra Registrazione.


Registrazione automatica al riavvio

Pagina delle proprietà: Target Service Agent

Scheda: Informazioni di TSA

Selezionare la casella di controllo Registrazione automatica al riavvio per la registrazione automatica al TSAProxy all’avvio. In caso contrario, è possibile effettuare la registrazione facendo clic su Registra nella finestra Registrazione.


Connessione bindery

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login

La selezione di Login al server rende disponibile la casella di controllo Connessione bindery. Selezionare questa casella, se si desidera eseguire il login al server con i servizi di bindery e non con eDirectory™.


Login di bindery

Se si fa clic su Bindery, verrà eseguito il login a un server NetWare® durante il login alla rete. In questo modo sarà possibile accedere a file, applicazioni e altri servizi disponibili sul server.

Se si desidera effettuare una connessione bindery, non è possibile accedere ad altri oggetti eDirectory™ che non sono disponibili sul server.


File bitmap

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login avanzato

Default: Nwelcome.bmp

Specifica la bitmap che viene visualizzata nella Finestra introduttiva all’avvio di Window* NT/2000/XP*. È possibile specificare qualsiasi bitmap ubicata nella directory di Windows NT/2000/XP. È anche possibile lasciare il campo vuoto, se non si desidera usare una bitmap.


Diffondi in rete le interrogazioni del server SAP più vicino

Pagina delle proprietà: Configurazione NetWare/IP

Scheda: Parametri

Default: Disattivo

Selezionare questa casella di controllo per fare in modo che il client NetWare®/IP* trovi il server NetWare più vicino diffondendo la richiesta sulla rete locale. Deselezionare questa casella di controllo per fare in modo che il client trovi il server NetWare più vicino inviando la richiesta al server NetWare/IP o al DSS.

Questa è un’impostazione facoltativa per NetWare/IP.


Didascalia

Pagina delle proprietà: Configurazione del client Novell

Scheda: Login avanzato

Default: Inizia il login

Esempio: Hello, Maria!

Utilizzare questa opzione per specificare il testo nell’intestazione della Finestra introduttiva che viene visualizzata all’avvio di Window* NT/2000/XP*.


Elimina le connessioni attuali

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login

La selezione di questa casella di controllo cancella le connessioni al server già effettuate quando si esegue il login.


Chiudi automaticamente i risultati dello script

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login di default

Durante il login, un messaggio informerà l’utente sul progresso del login e degli script relativi. Se si seleziona la casella di controllo Chiudi automaticamente i risultati dello script, questa finestra verrà chiusa, a meno che non si verifichino degli errori durante il login.


Componente

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Preferenze protocolli

Specifica il componente del protocollo selezionato da configurare.


Componente opzionale

Pagina delle proprietà: Configurazione dell'installazione

Scheda: Questa impostazione viene visualizzata nelle schede dei componenti multipli

Default: Dipende dal componente

Se l’impostazione Visualizza schermo iniziale viene abilitata, è possibile scegliere di non installare il componente deselezionando la casella di controllo Installa questo componente.


Connessione

Pagina delle proprietà: Preferenze TSA

Scheda: Preferenze

Selezionare la casella di controllo Connessione per registrare eventi di connessione.


Servizio di connessione

Usare questa finestra di dialogo per mappare le unità o catturare le stampanti da includere nel profilo di ubicazione. Dopo l’avvio della workstation, vengono create connessioni permanenti a questi dispositivi.

Nella finestra di dialogo Servizio di connessione sono contenuti i seguenti elementi:

Dispositivo

Elenca i dispositivi che sono stati mappati o catturati.

Percorso

Elenca il percorso di ogni dispositivo.

Mappa unità

Fare clic su Mappa unità per selezionare un’unità da mappare.

Cattura porta

Fare clic su Cattura porta per selezionare una stampante.

Scollega

Fare clic su un dispositivo della lista, quindi fare clic su Scollega per rimuovere il dispositivo dalla lista.

Rimuovi tutte le connessioni permanenti dell'utente

Selezionare questa casella di controllo, se si desidera mantenere le connessioni permanenti ai dispositivi per le workstation, ma non per gli utenti delle singole workstation.


Contenuto
Guida delle proprietà

Questa guida contiene informazioni sulle proprietà delle workstation Novell® Client™ per Window* NT/2000/XP* e Novell Client per Windows 95/98**.

Questo file è stato concepito come guida sensibile al contesto nelle pagine delle proprietà. È tuttavia possibile usarlo come guida di riferimento delle proprietà facendo clic su Indice per ricercare le informazioni desiderate.


Comunità di controllo

Pagina delle proprietà: SNMP

Scheda: SNMP

Default: Nessuno

Specifica il nome della comunità di controllo

che si riferisce alla comunità di lettura e scrittura (alla quale è consentito eseguire operazioni SET).

Un nome di comunità può essere costituito da qualsiasi stringa di caratteri ASCII. Può includere qualunque carattere a eccezione di spazi, tabulazioni, parentesi quadre aperte ( [ ), segni di uguale ( = ), due punti ( : ), punto e virgola ( ; ), virgolette doppie ( " ) o simboli dei numeri ( # ).

Le stringhe dei nomi di comunità sono in grado di distinguere maiuscole e minuscole.

I nomi di comunità stabiliti per l’accesso in lettura e scrittura sono validi anche per l’accesso in sola lettura.

Quando la comunità di controllo è disattivata, viene disabilitato l'accesso in scrittura.


Configurazione personalizzata

Pagina delle proprietà: Configurazione NetWare/IP

Scheda: Parametri

Default: Attivo

Selezionare questo parametro, se DHCP non è configurato per fornire i parametri NetWare®/IP* oppure se è necessario personalizzare NetWare/IP per questa workstation.


Albero personalizzato

Indicare l'albero utilizzato da Workstation Manager per gestire la workstation.


Supporto per i nomi lunghi in DOS

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Impostazioni avanzate

Gruppo di parametri: File System

Default: Attivo

Questo parametro consente la visualizzazione di nomi lunghi nella finestra DOS.


Giorni per memorizzare nella cache gli utenti volatili

Pagina delle proprietà: Novell® Workstation Manager

Scheda: Workstation Manager

Default: 0

Se il caching degli utenti volatili è abilitato, è possibile specificare il numero di giorni in cui gli utenti volatili rimarranno nella cache. La cache memorizza le credenziali degli utenti volatili perché possa essere utilizzate anche in altre occasioni.


Supporto norme di default

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login avanzato

Default: Abilitato

Dopo l’accesso alla rete con NetWare® Login, nella directory \sys\public\winnt del server di autenticazione verrà effettuata la ricerca del file ntconfig.pol. Se il file viene trovato, la norma viene applicata all’utente e alla workstation.


Rimozione percorsi di ricerca aggiuntivi
Rimozione di percorsi di ricerca aggiuntivi

Pagina delle proprietà: Configurazione MIB delle risorse dell'host

Scheda: Ricerca software

Dopo aver selezionato una directory, fare clic su Rimuovi per cancellarla dalla lista Percorsi di ricerca aggiuntivi.


Casella Descrizione

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Impostazioni avanzate

In questa casella è contenuta una breve descrizione del parametro evidenziato.


Lista agenti di directory

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Ubicazione del servizio

È una lista degli indirizzi degli agenti di directory SLP. Sono consentiti più indirizzi degli agenti di directory. Ogni indirizzo rappresenta un nome di dominio (DNS) completo o un indirizzo IP decimale a punti. Gli agenti di directory possono inoltre essere configurati tramite DHCP o rilevati in modo dinamico.

Per aggiungere un agente di directory alla lista:

1.	Immettere un nome.

2.	Fare clic su Aggiungi.

Per rimuovere un agente di directory dalla lista:

1.	Fare clic su un nome nella lista degli agenti di directory.

2.	Fare clic su Cancella.

Per sostituire un agente di directory esistente nella lista con un nuovo agente:

1.	Digitare il nome del nuovo agente di directory.

2.	Fare clic sul nome dell’elemento che si desidera sostituire.

3.	Fare clic su Sostituisci.

Per spostare un agente di directory verso l’alto all’interno della lista:

1.	Fare clic sul nome dell'agente di directory che si desidera spostare.

2.	Fare clic su Su per spostare l'elemento nella posizione desiderata della lista.

Per spostare un agente di directory verso il basso all’interno della lista:

1.	Fare clic sul nome dell'agente di directory che si desidera spostare.

2.	Fare clic su Giù per spostare l'elemento nella posizione desiderata della lista.


Livelli di directory in cui cercare a partire dalla radice

Pagina delle proprietà: Configurazione MIB delle risorse dell'host

Scheda: Ricerca software

Intervallo: da 0 a 256 (livelli)

Default: 1

Specifica un numero che indica il livello più basso dell’albero eDirectory™ in cui il MIB delle risorse dell'host cerca i file di programma.

Note:

Zero (0) indica che non viene effettuata alcuna ricerca, a meno che non vengano specificati i percorsi di ricerca aggiuntivi.

Il primo livello è la radice, quindi, di default vengono trovati solo i file di programma nella radice.

La ricerca avviene nei dischi rigidi locali, ma non nelle unità floppy, CD-ROM o di rete.

Se si dispone di molto spazio sul disco locale, il MIB delle risorse dell'host non dovrebbe effettuare la ricerca su tutto lo spazio su disco. Per prestazioni ottimali, ridurre al minimo la ricerca.

Le informazioni relative ai programmi vengono utilizzate dalla console di gestione di rete. È utile per tenere traccia del software sulle workstation client.


Visualizza pagina di connessione

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login

Se si sceglie Visualizza pagina di connessione, la scheda Connessione verrà visualizzata nella finestra di login. La scheda Connessione consente di configurare gli stessi parametri presenti in Visualizza pagina di connessione dalla finestra di login.

È anche possibile attivare l’opzione Visualizza pagina di connessione dal file unattend.txt.

La sezione di Visualizza pagina di connessione della pagina delle proprietà di login include più opzioni.

Pulsante Login all’albero

Pulsante Login al server

Casella di controllo Elimina le connessioni attuali

Casella di controllo Connessione bindery


Visualizza schermo iniziale

Pagina delle proprietà: Configurazione dell'installazione

Scheda: Imposta

Default: Attivo

Usare questo parametro per personalizzare il processo di installazione. Se si imposta questo parametro su Sì, l’ACU iniziale o la finestra introduttiva verranno visualizzati all’inizio dell’installazione. Impostare questo parametro su No per iniziare l’installazione senza visualizzare questa finestra.


Visualizza pagina di script

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login

Se si sceglie Visualizza pagina di script, la scheda Script verrà visualizzata nella finestra di login. Usare la scheda Script per configurare gli stessi parametri presenti in Visualizza pagina di script nella finestra di login.

La sezione di Visualizza pagina di script delle pagina delle proprietà di login include più opzioni.

Campo Script di login

Campo Script di profilo

Casella di controllo Chiudi automaticamente i risultati dello script

Casella di controllo Esegui script


Visualizza finestra dei risultati dello script

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login di default

Selezionare Visualizza finestra dei risultati dello script per verificare il progresso del login durante tale operazione.


Visualizza pagina di variabili

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login

Se si sceglie Visualizza pagina di variabili, la scheda Variabili verrà visualizzata nella finestra di login. La scheda Variabili consente di configurare gli stessi parametri presenti in Visualizza pagina di variabili nella finestra di login.

È possibile definire un numero massimo di quattro variabili che possono essere utilizzate dagli script di login.


Giù

Per spostare un elemento verso il basso di una posizione nella lista, selezionarlo e fare clic su Giù.


Unità disponibili

Pagina delle proprietà: Preferenze TSA

Scheda: Preferenze

Tutte le unità locali disponibili vengono visualizzate nella casella di riepilogo Unità disponibili.


Abilita trap di autenticazione

Pagina delle proprietà: SNMP

Scheda: SNMP

Default: Disattivo

Selezionare questa casella di controllo se si desidera migliorare la sicurezza della workstation facendo in modo che Desktop SNMP invii un messaggio trap ogni volta che un utente senza l’accesso appropriato utilizza SNMP per ottenere o modificare le informazioni gestite da Desktop SNMP.


Attiva intestazione

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Cattura di default

Default: Disattivo

Selezionare questa casella di controllo se si desidera disporre di una pagina di intestazione per ogni lavoro di stampa.


Abilita login senza contesto
Abilita

Pagina delle proprietà: Configurazione del client Novell

Scheda: Login senza contesto

Default: Disabilitato (deselezionato)

Selezionare questa casella di controllo per abilitare il login senza contesto che rende possibile accedere alla rete senza specificare un contesto eDirectory™.


Attiva comunità di controllo

Pagina delle proprietà: SNMP

Scheda: SNMP

Valori: Specificato | Qualsiasi | Disattivo

Default: Nessuno

La comunità di controllo è la comunità di lettura e scrittura (alla quale è consentito eseguire operazioni SET).

Scegliere una delle seguenti impostazioni.

Specificato abilita la comunità di controllo con il nome di comunità specificato: L’agente SNMP di Novell® utilizza solo la comunità di controllo specificata.

Qualsiasi abilita la comunità di controllo, consentendo a tutti i nomi di comunità l’accesso in lettura e scrittura. Per avere accesso è possibile utilizzare qualsiasi stringa di comunità. La comunità di controllo specificata ha accesso come qualunque altra comunità di controllo.

Disattivo disabilita la comunità di controllo. La comunità di controllo specificata non può avere accesso alla comunità di controllo e nemmeno può farlo un altro nome di comunità. Quando la comunità di controllo è disabilitata, nessuna entità di gestione può accedere alle informazioni di quella comunità. Ad esempio, nessuno può usare l’agente SNMP di Novell per eseguire operazioni SET in relazione ai dati che gestisce.

Nota: l'opzione di omissione non è più un valore valido per questa impostazione.


Abilita gateway

Pagina delle proprietà: Gateway IP

Selezionare questa casella di controllo per usare il gateway IP Novell®. Una volta selezionata la casella di controllo, i campi Server preferito e Albero preferito sono disponibili.


Attiva comunità monitoraggio

Pagina delle proprietà: SNMP

Scheda: SNMP

Valori: Specificato | Qualsiasi | Disattivo

Default: Specificato

La comunità monitoraggio è la comunità di sola lettura alla quale è consentito eseguire operazioni GET e GET NEXT.

Scegliere una delle seguenti impostazioni.

Specificato abilita la comunità monitoraggio con il nome di comunità specificato: l’agente SNMP di Novell® usa solo la comunità monitoraggio specificata.

Qualsiasi abilita la comunità monitoraggio, consentendo a tutti i nomi di comunità l’accesso in lettura. Per avere accesso è possibile utilizzare qualsiasi stringa di comunità. La comunità monitoraggio specificata ha accesso come qualunque altra comunità monitoraggio.

Disattivo disabilita la comunità monitoraggio. Quando la comunità monitoraggio è disattivata, viene disabilitato l'accesso in lettura. La comunità monitoraggio specificata non può avere accesso alla comunità monitoraggio e nemmeno può farlo un altro nome di comunità. Quando la comunità monitoraggio è disabilitata, nessuna entità di gestione può accedere alle informazioni di quella comunità. Ad esempio, nessuno può usare l’agente SNMP di Novell per eseguire operazioni GET in relazione ai dati che gestisce.

Nota: l'opzione di omissione non è più un valore valido per questa impostazione.


Abilita source routing su NDIS

Pagina delle proprietà: Protocollo IPX a 32 bit

Scheda: IPX

Default: Disattivo

Selezionare questa casella di controllo se si utilizza un driver NDIS per un adattatore di rete FDDI o token-ring e si desidera utilizzare source routing.

Questa impostazione si applica a tutte le schede logiche presentate da tutti i driver token-ring e FDDI NDIS.

I driver LAN ODI* non utilizzano questa funzionalità.


Attiva tabulazioni

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Cattura di default

Default: Disattivo

Selezionare questa casella di controllo se si desidera stampare il numero di spazi specificato al posto dei caratteri di tabulazione. Deselezionare questa casella di controllo se non si desidera che gli spazi vengano stampati al posto delle tabulazioni. I lavori di stampa del flusso di byte non richiedono l’attivazione delle tabulazioni.


Adattatore abilitato

Pagina delle proprietà: Adattatore di compatibilità Novell® IPX™

Scheda: Parametri

Default: Abilitato

Selezionare questa casella di controllo per usare l’adattatore specificato nel campo Adattatore per abilitare la funzione di compatibilità IPX.

Se la configurazione prevede più adattatori e si desidera che la compatibilità IPX funzioni solo su alcuni adattatori, disabilitare gli adattatori ai quali non si desidera applicare la modalità di compatibilità.


Abilita caching degli utenti volatili

Pagina delle proprietà: Novell® Workstation Manager

Scheda: Workstation Manager

È possibile memorizzare in una cache le credenziali degli utenti volatili in modo da poterle riutilizzare. Selezionare la casella di controllo Abilita caching degli utenti volatili per attivare questa opzione. Dopo avere selezionato la casella di controllo, il parametro Giorni per memorizzare nella cache gli utenti volatili sarà disponibile.


Abilita Workstation Manager

Pagina delle proprietà: Novell® Workstation Manager

Scheda: Workstation Manager

Questa casella di controllo abilita Workstation Manager. Quando la casella di controllo è selezionata, le altre opzioni della scheda Workstation Manager saranno disponibili.


Eventi da registrare

Pagina delle proprietà: Preferenze TSA

Scheda: Preferenze

Per specificare gli eventi da registrare usare la casella di gruppo Eventi da registrare

Connessione

Registrazione

Sicurezza

Servizio


Lista tipi di servizi filtrati

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Ubicazione del servizio

È possibile specificare determinati tipi di servizio che verranno registrati in un campo di variabilità filtrato specifico nella Lista campi di variabilità filtro di registrazione. I tipi di servizio specificati per ogni campo di variabilità filtrato sono univoci rispetto a quel campo.

Per creare un tipo di servizio specifico per un campo di variabilità filtrato:

1.	Evidenziare il campo di variabilità filtrato specifico nella Lista campi di variabilità filtro di registrazione.

2.	Nella Lista tipi di servizi filtrati immettere il tipo di servizio e fare clic su Aggiungi.

3.	Ripetere il punto 2 per aggiungere gli ulteriori tipi di servizio al campo di variabilità filtrato.


Prima unità di rete

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Client

Default: F

Questo parametro imposta la prima unità di rete con la lettera dell’unità scelta quando si esegue il collegamento a un server NetWare®.

La prima unità di rete viene applicata a qualsiasi utente che accede alla rete tramite la workstation in cui è installata.


Esegui il riavvio anche se vi sono applicazioni aperte

Pagina delle proprietà: Configurazione dell'installazione

Scheda: Imposta

Default: Disabilitato

Avviso: l’abilitazione di questa opzione potrebbe comportare una perdita di dati.

Se questa impostazione è abilitata, la workstation viene riavviata automaticamente al termine dell’installazione del client. Tutte le applicazioni aperte verranno chiuse senza effettuare il salvataggio dei dati non salvati.

Se questa impostazioni è disabilitata, la workstation non verrà riavviata, a meno che non venga attivato il parametro Riavvia al termine. Se l’opzione Riavvia al termine viene abilitata ed Esegui il riavvio anche se vi sono applicazioni aperte viene disabilitata, gli utenti della workstation possono salvare i dati e chiudere le applicazioni prima della chiusura della workstation.


Salto pagina

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Cattura di default

Default: Disattivo

Selezionare questa casella di controllo se si desidera che la stampante aggiunga fogli nuovi alla fine del lavoro di stampa.


Tipo di frame

Pagina delle proprietà: Protocollo IPX a 32 bit

Scheda: IPX avanzato

Default: Ethernet_802.2

Dopo aver selezionato un tipo di frame, fare clic su Aggiungi per aggiungerlo alla lista dei tipi di frame che il protocollo IPX™ dovrebbe usare.

Alcuni tra i tipi di frame più utilizzati sono Ethernet_802.2, Ethernet_802.3, Ethernet_II, Ethernet_SNAP, Token-Ring e Token-Ring_SNAP.


Tipo di frame della scheda logica primaria

Pagina delle proprietà: Protocollo IPX a 32 bit

Scheda: IPX avanzato

Default: Ethernet_802.2

Specifica il tipo di frame della scheda logica utilizzato dal protocollo IPX™ come scheda primaria.

Alcuni tra i tipi di frame più utilizzati sono Ethernet_802.2, Ethernet_802.3, Ethernet_II, Ethernet_SNAP, Token-Ring e Token-Ring_SNAP.


Tempo di stallo della lista gateway

Pagina delle proprietà: Modalità di compatibilità Novell®

Scheda: Adattatori

Default: 250


In attesa

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Cattura di default

Default: Disattivo

Selezionare questa casella di controllo per mettere in attesa i lavori di stampa.


Solo IP

Installa lo stack del protocollo IP, che consente di eseguire il client solo in reti IPX. La scelta di questa opzione non permetterà alla workstation di comunicare con i server IPX.


IP e IPX

Questa opzione consente di eseguire il client in reti IP e IPX. La workstation usa lo stesso protocollo del server con cui sta comunicando.


Protocollo IP con modalità di compatibilità
Protocollo IP con modalità di compatibilità IPX

Installa il protocollo IP e include la modalità di compatibilità, che consente di eseguire le applicazioni IPX solo in reti IP convertendo i pacchetti IPX in pacchetti IP. La modalità di compatibilità IPX consente anche la comunicazione del client con i servizi solo in reti IPX, se l’agente di migrazione è installato nei server NetWare 5. La modalità di compatibilità IPX dipende dal protocollo SLP (Service Location Protocol).


Campo di variabilità della compatibilità IPX

Pagina delle proprietà: Adattatore di compatibilità Novell® IPX™

Scheda: Parametri

Default: Nessun campo di variabilità specificato

Se si desidera impostare un campo di variabilità SLP sulla rete affinché contenga solo le informazioni di servizio della modalità di compatibilità, specificare un campo di variabilità della compatibilità IPX.

Nella maggior parte delle situazioni, non è necessario specificare il campo di variabilità della compatibilità IPX™.

Se si specifica un campo di variabilità, è necessario specificare lo stesso campo di variabilità in tutti i nodi che utilizzano la modalità compatibile.

Se non si specifica un campo di variabilità, la workstation usa i campi di variabilità SLP che l’utente configura nella scheda Ubicazione del servizio della pagina delle proprietà Configurazione di Novell® Client™.


Diagnostica IPX attivata

Pagina delle proprietà: Protocollo IPX a 32 bit

Scheda: IPX

Default: Attivo

Selezionare questa casella di controllo per abilitare la funzione di diagnostica IPX™.

Deselezionare questa casella di controllo solo se non si desidera che un amministratore possa interrogare le statistiche IPX e SPX™ di questa workstation.


Solo IPX

Questa opzione consente di eseguire il client solo in reti IPX. L'opzione non consente di installare il protocollo IP.

Se nella rete è in esecuzione solo una versione di NetWare precedente a NetWare 5, installare Novell Client con l'opzione Solo IPX.


Numero di tentativi IPX

Pagina delle proprietà: Protocollo IPX a 32 bit

Scheda: IPX

Intervallo: da 0 a 65535 (tentativi)

Default: 20

Indica il numero di tentativi che la workstation dovrebbe effettuare per trovare un instradamento a una destinazione.

L’incremento di questo numero comporta anche un aumento del numero di tentativi IPX™.

Aumentare il valore di questa impostazione, se viene eseguito il timeout delle applicazioni IPX™ o SPX.

IPX usa questa impostazione in modo diverso dai client NetWare® precedenti.


Installa NetWare/IP

Pagina delle proprietà: Configurazione dell'installazione

Scheda: Componenti aggiuntivi

Selezionare questa casella di controllo se si desidera installare NetWare®/IP* dopo l’installazione del software Novell® Client™.

Questa opzione funziona con il parametro Chiedi di installare NetWare/IP. Vedere Chiedi di installare NetWare/IP per una lista di eventuali scenari.


Installa questo componente

Pagina delle proprietà: Configurazione dell'installazione

Scheda: schede dei componenti multipli

Default: dipende dal componente

Se l’opzione Installa questo componente è abilitata, il componente verrà installato.


Versione interna primaria

Pagina delle proprietà: Configurazione dell'installazione

Scheda: schede per componenti diversi

Intervallo: da 0 a 4.294.967.295

Default: 0

I numeri delle versioni primaria e secondaria determinano l’esecuzione dell'aggiornamento del client. Per eseguire l'aggiornamento, è necessario che il numero di versione sia superiore a quello relativo alla prima installazione del client. (Ad esempio, se il numero è 0, impostarlo a 1). ACU confronta i numeri di versione durante il login del client, individua la discrepanza ed esegue gli aggiornamenti del client con i file di sistema più recenti.


Versione interna secondaria

Pagina delle proprietà: Configurazione dell'installazione

Scheda: schede per componenti diversi

Intervallo: da 0 a 4.294.967.295

Default: 0

I numeri delle versioni primaria e secondaria determinano l’esecuzione dell'aggiornamento del client. Per eseguire l'aggiornamento, è necessario che il numero di versione sia superiore a quello relativo alla prima installazione del client. (Ad esempio, se il numero è 0, impostarlo a 1). ACU confronta i numeri di versione durante il login del client, individua la discrepanza ed esegue gli aggiornamenti del client con i file di sistema più recenti.


Mantieni

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Cattura di default

Default: Disattivo

Selezionare questa casella di controllo se si desidera mantenere i lavori di stampa in coda al termine della stampa.


Caratteri per tracciare le linee

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Impostazioni avanzate

Gruppo di parametri: Connessione

Valori validi: da 1 a 6

I sei caratteri determinano il bordo del messaggio di NWPOPUp e i relativi significati sono riportati di seguito:

1 = in alto a sinistra

2 = in alto a destra

3 = in basso a sinistra

4 = in basso a destra

5 = linea verticale

6 = linea orizzontale


Modem locali

Pagina delle proprietà: Configurazione MIB delle risorse dell'host

Scheda: Stampanti e modem

Questa impostazione facoltativa specifica le informazioni relative ai modem utilizzati da questa workstation. Le informazioni vengono utilizzate dalla console di gestione di rete.


Stampanti locali

Pagina delle proprietà: Configurazione MIB delle risorse dell'host

Scheda: Stampanti e modem

Questa impostazione facoltativa specifica le informazioni relative alle stampanti collegate a questa workstation. Le informazioni vengono utilizzate dalla console di gestione di rete.


Unità nastro locali

Pagina delle proprietà: Configurazione MIB delle risorse dell'host

Scheda: Unità nastro

Questa impostazione facoltativa specifica le informazioni relative alle unità nastro utilizzate dalla workstation. Le informazioni vengono utilizzate dalla console di gestione di rete.


Profili dell'ubicazione

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Profili dell'ubicazione

I profili dell’ubicazione consentono a un amministratore di rete di salvare le informazioni da un login dell’utente in un nuovo profilo. Quando l’utente seleziona il profilo durante il login, quest’ultimo imposta automaticamente le informazioni di login, quali il nome utente, il server, il contesto, lo script di login e altre informazioni applicabili in modo da consentire all’utente di non immetterle ogni volta.

Per aggiungere un profilo dell’ubicazione:

1.	Fare clic con il pulsante destro del mouse sull’icona N nel system tray, scegliere Proprietà del client Novell, quindi Ubicazione

2. 	Immettere il nome del profilo da aggiungere.

3. 	Fare clic su Aggiungi.

Per rimuovere un profilo dell’ubicazione:

1. 	Fare clic sul nome del profilo che si desidera rimuovere.

2. 	Fare clic su Rimuovi.

Per visualizzare le proprietà di un profilo:

1.	Fare clic sul nome di un profilo.

2.	Fare clic su Proprietà.


Login al server

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login di default

Fare clic su Login al server per connettersi a un server NetWare® dopo l’accesso alla rete. In questo modo sarà possibile accedere a file, applicazioni e altri servizi disponibili sul server.

La selezione di Login al server rende disponibile la casella di controllo Connessione bindery. Se si desidera effettuare una connessione bindery, non è possibile accedere ad altri oggetti eDirectory™ che non sono disponibili sul server.


Login all'albero

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login di default

Fare clic su Login all’albero per connettersi a un albero eDirectory™ dopo l’accesso alla rete. È quindi possibile accedere ai servizi quali stampanti e server disponibili nell'albero.


Script di login

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login

Imposta il nome dello script di login da usare quando si esegue il login a NetWare®.


Numero massimo di unità di trasmissione

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Impostazioni avanzate

Gruppo di parametri: Generale SLP

Intervallo: da 576 a 4096 (byte)

Default: 1400


File dei suoni dei messaggi

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Impostazioni avanzate

Gruppo di parametri: Interfaccia grafica

Default: Vuoto

Specifica il nome del file dei suoni che viene eseguito al momento della ricezione di un messaggio. Il formato del file dei suoni deve essere WAV. Se non è specificato alcun file, non viene eseguito alcun suono.


Agenti di migrazione

Pagina delle proprietà: Adattatore di compatibilità Novell® IPX™

Scheda: Parametri

Intervallo: massimo 10 agenti di migrazione

Default: Vuoto

Specifica un numero massimo pari a dieci server degli agenti di migrazione che forniscono la connettività tra i nodi IPX e IP.

Per specificare i server, è possibile usare gli indirizzi a punti, i nomi DNS completi oppure i nomi contenuti nel file dell'host locale.

Nel caso in cui gli agenti di migrazione non siano configurati, il client cerca di rilevare dinamicamente gli agenti di migrazione tramite il protocollo SLP.


Comunità monitoraggio

Pagina delle proprietà: SNMP

Scheda: SNMP

Default: Pubblico

Specifica il nome della comunità monitoraggio, che è la comunità di sola lettura alla quale è consentito eseguire operazioni GET e GET NEXT.

Un nome di comunità può essere costituito da qualsiasi stringa arbitraria di caratteri ASCII. Può includere qualunque carattere a eccezione di spazi, tabulazioni, parentesi quadre aperte ( [ ), segni di uguale ( = ), due punti ( : ), punto e virgola ( ; ), virgolette doppie ( " ) o simboli dei numeri ( # ).

Le stringhe dei nomi di comunità sono in grado di distinguere maiuscole e minuscole.

Quando la comunità monitoraggio è disattivata, viene disabilitato l'accesso in lettura.


Login eDirectory

Se si fa clic su eDirectory™, verrà eseguito il login a un albero eDirectory al momento del login alla rete. È quindi possibile accedere ai servizi quali stampanti e server disponibili nell'albero.


eDirectory o bindery
Login eDirectory o bindery

Selezionare il metodo da usare quando si accede alla rete.

Se si fa clic su eDirectory™, verrà eseguito il login a un albero eDirectory al momento del login alla rete. La scelta di questa opzione consente di accedere ai servizi quali stampanti e server disponibili nell'albero.

Se si fa clic su Bindery, verrà eseguito il login a un server NetWare® al momento del login alla rete. In questo modo sarà possibile accedere a file, applicazioni e altri servizi disponibili sul server. Non è possibile accedere agli oggetti eDirectory che non sono disponibili sul server.


Contesto

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Client

Default: Radice

Imposta la posizione o il contesto attuali nella struttura dell'albero eDirectory. Ad esempio, ou=mngt.o=marketing specifica l’unità organizzativa Mngt nell’organizzazione Marketing come contesto.

Se esistono nomi utenti duplicati, usare questa impostazione per specificare il contesto del nome utente desiderato.

Il contesto può contenere un numero massimo di 256 caratteri oltre al comando NULL, che indica la radice dell’albero eDirectory.


Ordine risoluzione nomi

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Preferenze protocolli

Ordine di default: NWHOST, eDirectory, SLP, DNS, DHCP

Questa lista specifica l’ordine di utilizzo dei protocolli per cercare di risolvere i nomi.

Ad esempio, se un server NetWare® 5 ha associato i protocolli IP* e IPX™ (o CMD), il client risolve il nome del server tramite uno dei servizi dei nomi IP, se sono presenti nella lista. Quindi, il client cerca di utilizzare i servizi dei nomi IPX, se IPX è la seconda scelta nella casella Ordine dei protocolli, tramite i servizi di denominazione che supportano gli indirizzi IPX.

Nel client NT/2000/XP client i protocolli non sono elencati per ordine e non esiste nessun ordine di default.

Tutti i provider del servizio dei nomi configurati vengono interrogati in modo asincrono per risolvere il nome in un indirizzo. Vengono innanzitutto interrogati con un flag della cache che consente ai provider del servizio dei nomi (NSP) che mantengono una cache di cercare di risolvere il nome. Se nessun NSP risolve il nome, i provider vengono interrogati di nuovo senza il flag della cache, permettendo così agli NSP di cercare di risolvere il nome. Il client attende per un periodo di tempo specificato dal timeout di risoluzione del nome (in corrispondenza delle impostazioni avanzate, che di default sono 10 secondi) oppure fino a quando gli NSP interrogati non rispondono con NOT_FOUND o NO_MORE.


Server NetWare/IP più vicini

Pagina delle proprietà: Configurazione NetWare/IP

Scheda: Server

Default: Nessuno

Esempi:

mydss	(nome host)

mydss.atlantic.com	(nome host completo)

222.33.44.55	(indirizzo IP per mydss)

222.33.0.0	(maschera di indirizzo IP per mydss)

Questa impostazione facoltativa è usata per individuare i server NetWare®/IP* più vicini. È possibile specificare un numero massimo di cinque server NetWare/ IP. Se i server specificati non sono disponibili, il DSS ne fornirà altri da utilizzare.

Specificare i nomi dei server NetWare/IP a dominio come nomi host DNS, nomi host completi, indirizzi IP o maschere di indirizzi IP.


Memorizzazione del profilo comune NetWare

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login avanzato

Selezionare questa casella di controllo per abilitare un profilo comune.


Compatibilità NetWare/IP 1.1

Pagina delle proprietà: Configurazione NetWare/IP

Scheda: Parametri

Default: Disattivo

Se i server eseguono la versione di NetWare®/IP* 1.1 anteriore alla patch, selezionare questa casella di controllo. Questa impostazione supporta la prima versione dei server NetWare/IP e DSS. Se i server eseguono la versione di NetWare/IP 1.1 anteriore alla patch, si consiglia di eseguire l’upgrade con la patch o alla versione 2.2. Al tempo stesso, la selezione della casella di controllo consente al client, NetWare/IP 2.2 compatibile, di comunicare con i server NetWare/IP.


Nome dominio NetWare/IP

Pagina delle proprietà: Configurazione NetWare/IP

Scheda: Parametri

Default: Nessuno

Esempio: nwip.atlantic.com

Questa impostazione necessaria per NetWare®/IP* specifica il dominio NetWare/IP configurato per l'area di lavoro.


Numero di rete (esadecimale)

Pagina delle proprietà: Adattatore di compatibilità Novell® IPX™

Scheda: Parametri

Default: FFFFFFFD

Specifica il numero di rete del segmento IPX virtuale (Numero di rete CMD) creato dal driver di compatibilità IPX sull’adattatore selezionato.

I nodi IP che utilizzano numeri di rete CMD diversi devono comunicare tramite agenti di migrazione che supportano lo stesso numero di rete CMD durante l’esecuzione di applicazioni client/server IPX.


Protocolli di rete

Novell® Client™ per Window* supporta il protocollo Internet nativo eseguito in un server NetWare® 5*. Se il client viene utilizzato con una versione di NetWare diversa da NetWare 5, è possibile usare la connettività di NetWare/IP per il protocollo IP. Novell Client supporta inoltre la famiglia di protocolli IPX™/SPX™. Il client può essere utilizzato con altri stack di protocolli, quali i protocolli NetBEUI.

Novell Client può essere installato con una delle seguenti opzioni dei protocolli:

Solo IP

IP con compatibilità IPX

IP e IPX (default)

IPX

Consente di eseguire il client solo in reti IPX. L'opzione non consente di installare il protocollo IP.

Nota: se nella rete è in esecuzione solo una versione di NetWare precedente a NetWare 5, installare Novell Client con l'opzione IPX.


Notifica

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Cattura di default

Default: Attivo

Se si desidera ricevere un messaggio al termine della stampa, selezionare questa casella di controllo.


Numero di copie

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Cattura di default

Intervallo: da 1 a 255

Default: 1

Specifica il numero di copie da stampare.


Numero di secondi tra tentativi

Pagina delle proprietà: Configurazione NetWare®/IP*

Scheda: Parametri

Intervallo: da 5 a 99 (secondi)

Default: 10

Specifica il numero di secondi di attesa tra i tentativi di una richiesta DSS alla quale non è stata fornita risposta.


Numero di spazi

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Cattura di default

Intervallo: da 1 a 18

Default: disabilitato, 8

Specifica il numero di spazi che vengono stampati al posto dei caratteri di tabulazione. Per rendere operativa l'impostazione è necessario selezionare la casella di controllo Attiva tabulazioni.


Gruppi di parametri

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Impostazioni avanzate

Visualizza i parametri avanzati in base ai relativi gruppi. I gruppi di parametri ordinano i parametri per funzione. Questo semplifica la ricerca di tipi di parametri specifici.


Lista di parametri

Pagina delle proprietà: Configurazione del client Novell

Scheda: Impostazioni avanzate

Elenca i parametri avanzati disponibili per il software Novell® Client™.

Per informazioni su un parametro specifico, selezionare il parametro e leggere la descrizione disponibile nella casella Descrizione.


Parola d'ordine (TSA)
Parola d'ordine

Pagina delle proprietà: Target Service Agent

Scheda: Informazioni di TSA

Immettere la parola d'ordine che l'utente TSA deve digitare.


Percorso

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login avanzato

La selezione di questa opzione rende disponibile la casella di modifica Percorso. Utilizzare questa casella per specificare l’ubicazione della memorizzazione del profilo.


Nome e percorso del file di protezione

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login avanzato

Per specificare il nome e il percorso del file di protezione, immettere il percorso nella casella di testo Nome e percorso del file di protezione. Il percorso deve essere un percorso UNC valido.

I nomi di percorsi di stile UNC non utilizzano la convenzione dei nomi di percorsi MS-DOS* standard (unità:\directory), bensì il seguente formato:

\\server\volume\nomedir1\nomedir2\nomefile.ext


Numero porta

Pagina delle proprietà: Configurazione NetWare/IP

Scheda: Parametri

Default: ABCD

Se l'opzione Usa la porta NWIP definita dall'utente è abilitata, specificare la porta che si desidera utilizzare per NetWare®/IP* in questo campo.


Memoria VGNMA pre-allocata

Pagina delle proprietà: Protocollo IPX™ a 32 bit

Scheda: IPX

Default: Disattivo

Per allocare la memoria convenzionale necessaria per il funzionamento di VGNMA, selezionare questa casella di controllo. Pre-allocare la memoria VGNMA per le applicazioni responder GNMA a 16 bit se queste non funzionano in modo corretto diversamente.


Server SAP/RIP a dominio preferito

Pagina delle proprietà: Configurazione NetWare®/IP*

Scheda: Server

Default: Nessuno

Esempi:

dss	 (nome host)

dss.atlantic.com	 (nome host completo)

2.33.44.55	 (indirizzo IP per mydss)

2.33.0.0	 (maschera di indirizzo IP per mydss)

Specifica i server SAP/RIP a dominio che si desidera utilizzare come server SAP/RIP a dominio preferito.

Gli indirizzi e i nomi sono usati come riferimento per individuare i server SAP/RIP a dominio preferito. Se non vi è alcun server SAP/RIP a dominio disponibile, la lista di server SAP/RIP a dominio viene ricercata in DNS.

È possibile specificare un numero massimo di cinque server SAP/RIP a dominio preferito.

Specificare i nomi dei server SAP/RIP a dominio come nomi host, nomi host completi, indirizzi IP o maschere di indirizzi IP.


Server gateway IP/IP preferito

Pagina delle proprietà: Gateway IP

Scheda: Gateway IP Novell

Specificare il server che esegue il gateway IP Novell® che si desidera utilizzare.


Server gateway IPX/IP preferito

Pagina delle proprietà: Gateway IP

Scheda: Gateway IP Novell

Specificare il server che esegue il gateway IP Novell® che si desidera utilizzare.


Protocollo di rete preferito

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Preferenze protocolli

Gruppo di parametri: Risoluzione del nome

Valori: Nessuno, IP, IPX

Default: Nessuno

Il client attende per un periodo di tempo massimo pari a un quarto del valore relativo al timeout di risoluzione del nome per risolvere il nome specificato a un indirizzo del tipo di rete preferito. Se questo valore viene impostato a 0, il client potrà connettersi al primo indirizzo restituito da uno dei provider dello spazio dei nomi configurati.


Server preferito

Pagina delle proprietà: Configurazione del client Novell

Scheda: Client

Specifica il server al quale eDirectory™ deve autenticare l’utente all’avvio del software Novell® Client™. Con questa impostazione il client cerca di creare una connessione al server specificato.

I parametri Server preferito e Albero preferito vengono utilizzati contemporaneamente. Se è impostato il parametro Server preferito, eDirectory cercherà di autenticare l’utente al server. Se è impostato il parametro Albero preferito, eDirectory invierà un messaggio per trovare il server più vicino e cercherà di autenticare l’utente al server che risponde al messaggio, indipendentemente dal fatto che sia impostato il parametro Server preferito.

Il server preferito è valido per tutti gli utenti che accedono alla rete utilizzando la workstation.


Server preferito (Gateway IP)
Server preferito

Pagina delle proprietà: Gateway IP

Specificare il server che esegue il gateway IP Novell® che si desidera utilizzare.

L'opzione è disponibile solo se la casella Abilita gateway è selezionata.


Server preferito (TSA)

Pagina delle proprietà: Preferenze TSA

Scheda: Preferenze

Utilizzare il campo Server preferito per specificare il nome del server al quale TSA deve essere registrato.


Albero preferito

Pagina delle proprietà: Configurazione del client Novell

Scheda: Client

Il parametro Albero preferito specifica l’albero della directory a cui ci si collega all’avvio del software Novell® Client™. Con questa impostazione il client cerca di creare una connessione a un server nell’albero specificato.

Se è impostato il parametro Albero preferito, il client cercherà di collegarsi a un server dell’albero specificato. Se non è impostato alcun albero, cercherà di collegarsi al server preferito configurato. Se non è impostato alcun parametro, il client si collegherà a qualsiasi server che risponda alla richiesta di ricerca del server più vicino.

L’albero preferito è valido per tutti gli utenti che accedono alla rete utilizzando la workstation. Per eseguire il login a un albero diverso, è possibile modificare l’albero per la sessione corrente durante l’accesso alla rete.


Albero preferito (Gateway IP)
Albero preferito

Pagina delle proprietà: Gateway IP

Specificare l’albero contenente il server che esegue il gateway IP Novell® che si desidera utilizzare.

L'opzione è disponibile solo se la casella Abilita gateway è selezionata.


Scheda logica primaria

Pagina delle proprietà: Protocollo IPX a 32 bit

Scheda: IPX avanzato

Default: Deselezionato (IPX™ rileva automaticamente la scheda primaria)

Per specificare la scheda logica che IPX deve usare come scheda primaria, selezionare questa casella di controllo. Per specificare la scheda logica è sufficiente specificare un tipo di frame.

Per default IPX rileva automaticamente la scheda primaria. IPX utilizza un algoritmo di rilevamento automatico per selezionare una scheda primaria quando l’opzione non è selezionata. Usare questa opzione se IPX non riesce a selezionare la scheda primaria corretta.


Script di profilo

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login

Specificare uno script di profilo eDirectory™ alternativo da utilizzare durante il login. Questo script di profilo verrà eseguito al posto dello script di profilo eDirectory normale.


Proprietà

Pagina delle proprietà: Configurazione di Novell® Client™

Schede: Profili dell’ubicazione, Servizi

Fare clic su Proprietà per visualizzare le proprietà del profilo selezionato o dell’istanza del servizio.


Protocollo

Pagina delle proprietà: Preferenze TSA

Scheda: Informazioni di TSA

TSA supporta più protocolli. Attualmente sono disponibili due opzioni dei protocolli: SPX™/IPX™ e TCP/IP. Vengono visualizzati solo i protocolli i cui stack sono installati sulla workstation. È possibile scegliere una delle opzioni fornite utilizzando la lista discesa Protocollo.


Protocollo (pagina delle proprietà del client)
Protocollo

Pagina delle proprietà: Configurazione dell'installazione

Scheda: Client

Questo parametro specifica i protocolli di rete che il client usa per la comunicazione.


Protocollo (pagina delle proprietà Preferenze protocolli)
Protocollo

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Preferenze protocolli

Fare clic sul protocollo da configurare.


Impostazione del componente di protocollo

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Preferenze protocolli

Usare questa lista per selezionare gli elementi che verranno utilizzati dal componente di protocollo selezionato.


Ordine dei protocolli

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Preferenze protocolli

Ordine di default: IP, IPX

Usare la lista Ordine dei protocolli per specificare la sequenza di protocolli utilizzata da Novell® Client™ durante la connessione a un server. Se, ad esempio, la lista contiene i protocolli IPX™ e IP, in questo ordine, il client cerca di connettersi usando prima IPX. Se risulta impossibile creare una connessione IPX, il client ritenta utilizzando il protocollo IP.


Riavvia al termine

Pagina delle proprietà: Configurazione dell'installazione

Scheda: Imposta

Default: Abilitato

Se questa impostazione è abilitata, la workstation viene riavviata automaticamente al termine dell’installazione del software Novell® Client™. Se vi sono delle applicazioni in esecuzione, è possibile salvare i file aperti prima della chiusura della workstation.

Se questa impostazione e l’opzione Esegui il riavvio anche se vi sono applicazioni aperte sono abilitate, la workstation verrà chiusa e riavviata senza poter salvare i file aperti.

Se questa impostazione è disabilitata, la workstation non verrà riavviata al termine dell’installazione del client. Le nuove impostazioni e il nuovo client non avranno effetto se la workstation non verrà riavviata.


Registrazione

Pagina delle proprietà: Preferenze TSA

Scheda: Preferenze

Selezionare la casella di controllo Registrazione se si desidera registrare eventi relativi.


Lista campi di variabilità filtro di registrazione

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Ubicazione del servizio

Questa è una lista di nomi dei campi di variabilità del filtro di registrazione che verrà segnalata alle applicazioni SLP della workstation. Sono consentiti nomi di campi di variabilità multipli. Quando si registrano i servizi, questa lista viene utilizzata in aggiunta alla Lista campi di variabilità generale già creata.

Usa filtro di registrazione rigido

Per limitare il campo di variabilità del filtro di registrazione alla lista dei campi di variabilità specifica, selezionare la casella di controllo Usa filtro di registrazione rigido.

Lista tipi di servizi filtrati

Per elencare tipi di servizi specifici da registrare in un campo di variabilità specifico nella Lista campi di variabilità filtro di registrazione, evidenziare il campo di variabilità e immettere i tipi di servizi nella Lista tipi di servizi filtrati, quindi fare clic su Aggiungi.


Rimuovi

Per eliminare un elemento dalla lista, selezionare l’elemento, quindi fare clic su Rimuovi.


Pulsante Rimuovi

Pagina delle proprietà: Configurazione NetWare®/IP*

Scheda: Server

Rimuove un server dai server NetWare/IP più vicini o dalla lista Server SAP/RIP a dominio preferito.


Rimozione del tipo di frame

Pagina delle proprietà: Protocollo IPX™ a 32 bit

Scheda: IPX avanzato

Dopo aver selezionato il tipo di frame da rimuovere dalla lista, fare clic su Rimuovi.


Rimuovi IPX

Se si desidera rimuovere uno stack IPX precedentemente installato nella workstation, selezionare questa casella di controllo durante l’installazione del client Solo IP.

Avviso: se si rimuove il protocollo IPX, la workstation non potrà comunicare con i server e le applicazioni IPX.


Rimozione di modem locali

Pagina delle proprietà: Configurazione MIB delle risorse dell'host

Scheda: Stampanti e modem

Dopo aver selezionato il modem da rimuovere dalla lista, fare clic su Rimuovi.


Rimozione di stampanti locali

Pagina delle proprietà: Configurazione MIB delle risorse dell'host

Scheda: Stampanti e modem

Dopo aver selezionato la stampante da rimuovere dalla lista, fare clic su Rimuovi.


Rimozione di unità nastro locali

Pagina delle proprietà: Configurazione MIB delle risorse dell'host

Scheda: Unità nastro

Dopo aver selezionato l’unità nastro da rimuovere dalla lista, fare clic su Rimuovi.


Rimozione del client Microsoft NetWare

Pagina delle proprietà: Configurazione dell'installazione

Scheda: Client

Default: Attivo

Se questo parametro è attivo, il client Microsoft* NetWare® verrà rimosso se la finestra di dialogo che richiede se si desidera rimuovere il client non verrà visualizzata. Se la finestra di dialogo verrà visualizzata, il pulsante Sì sarà il pulsante di default.


Rimozione della coppia albero e contesto

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Client

Dopo aver selezionato la coppia albero e contesto da rimuovere dalla lista, fare clic su Rimuovi.


Sostituisci

Per sostituire un elemento esistente nella lista con uno nuovo, immettere il nome di un nuovo elemento, selezionarne uno esistente, quindi fare clic su Sostituisci.


Sostituzione di percorsi di ricerca aggiuntivi

Pagina delle proprietà: Configurazione MIB delle risorse dell'host

Scheda: Ricerca software

Dopo aver specificato la directory da sostituire e avere selezionato una directory di sostituzione dalla lista Percorsi di ricerca aggiuntivi, fare clic su Sostituisci.


Pulsante Sostituisci

Pagina delle proprietà: Configurazione NetWare®/IP*

Scheda: Server

Sostituisce uno dei server NetWare/IP più vicini o un server dalla lista Server SAP/RIP a dominio preferito.


Sostituzione di modem locali

Pagina delle proprietà: Configurazione MIB delle risorse dell'host

Scheda: Stampanti e modem

Specificare il modem che si desidera sostituire, selezionare un modem di sostituzione dalla lista Modem locali, quindi fare clic su Sostituisci.


Sostituzione di stampanti locali

Pagina delle proprietà: Configurazione MIB delle risorse dell'host

Scheda: Stampanti e modem

Specificare la stampante che si desidera sostituire, selezionare una stampante di sostituzione dalla lista Stampanti locali, quindi fare clic su Sostituisci.


Sostituzione di unità nastro locali

Pagina delle proprietà: Configurazione MIB delle risorse dell'host

Scheda: Unità nastro

Specificare l’unità nastro che si desidera sostituire, selezionare un’unità nastro di sostituzione dalla lista Unità nastro locali, quindi fare clic su Sostituisci.


Sostituzione della coppia albero e contesto

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Client

Selezionare la coppia albero e contesto che si desidera sostituire, fare clic su Sostituisci, quindi immettere le informazioni relative alla nuova coppia albero e contesto nei campi appropriati.


Risorse disponibili per TSA

Pagina delle proprietà: Target Service Agent

Scheda: Informazioni di TSA

Elenca le risorse di cui TSA può effettuare la copia di backup.


Riprova nel DSS durante l'avvio

Pagina delle proprietà: Configurazione NetWare®/IP*

Scheda: Parametri

Intervallo: da 0 a 10 (tentativi)

Default: 1

Specifica il numero di volte in cui è possibile riprovare a effettuare una richiesta DSS non soddisfatta.


Esegui script

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login

Se questa casella di controllo non è selezionata, gli script di login non verranno eseguiti durante il login.


Timeout interruzione SPX

Pagina delle proprietà: Protocollo IPX™ a 32 bit

Scheda: SPX

Intervallo: da 1 a 65.535 (tick)

Default: 540

Specifica (in tick) il tempo di attesa da parte del protocollo SPX™ trascorso senza ricevere una risposta proveniente dall’altro capo della connessione prima della chiusura della sessione.

Non è necessario regolare questa impostazione a meno che il timeout SPX venga eseguito troppo presto.


Connessioni SPX

Pagina delle proprietà: Protocollo IPX™ a 32 bit

Scheda: SPX

Intervallo: da 1 a 255

Default: 15

Questa impostazione consente di assicurare la compatibilità con le applicazioni che richiedono tali informazioni e si basano su di esse.

SPX™ non usa l’impostazione per limitare il numero di connessioni SPX. Il numero di connessioni SPX è limitato solo dalla quantità di memoria disponibile.


Timeout ricezione SPX

Pagina delle proprietà: Protocollo IPX™ a 32 bit

Scheda: SPX

Intervallo: da 1 a 65.535 (tick)

Default: 108

Specifica (in tick) il tempo di attesa da parte del protocollo SPX™ trascorso senza ricevere un pacchetto proveniente dall’altro capo della connessione prima di richiedere l’invio del pacchetto per confermare la validità della connessione.

Non è necessario regolare questa impostazione a meno che il timeout SPX venga eseguito troppo presto.


Timeout verifica SPX

Pagina delle proprietà: Protocollo IPX™ a 32 bit

Scheda: SPX

Intervallo: da 1 a 65.535 (tick)

Default: 54

Specifica la frequenza (in tick) con cui il protocollo SPX™ invia un pacchetto all’altro capo della connessione per indicarne l’esistenza.

Se nella connessione SPX non viene scambiato alcun pacchetto dal software che ha stabilito la sessione, SPX invia i pacchetti a intervalli regolari per verificarne la presenza nella connessione.

Non è necessario regolare questa impostazione a meno che il timeout SPX venga eseguito troppo presto.


Salva impostazioni all'uscita dal login

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login

Se questa casella di controllo viene selezionata, le impostazioni modificate o immesse verranno salvate all’uscita dalla pagina di configurazione del login di NetWare®. Se questa casella di controllo non viene selezionata, le impostazioni non verranno salvate.


Lista campi di variabilità

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Ubicazione del servizio

Questa è una lista di nomi dei campi di variabilità da segnalare alle applicazioni SLP della workstation. Sono consentiti nomi di campi di variabilità multipli. L’ordine della lista riflette l’ordine di preferenza. I campi di variabilità possono inoltre essere configurati tramite DHCP o rilevati in modo dinamico da agenti di directory.

Un campo di variabilità è simile a un insieme di servizi all’interno di un gruppo logico. È possibile usare un campo di variabilità per creare un gruppo di servizi e di agenti di directory registrati con questi agenti di directory in una grande organizzazione.

Per aggiungere un campo di variabilità alla lista:

1.	Immettere un nome.

2.	Fare clic su Aggiungi.

Per rimuovere un campo di variabilità dalla lista:

1.	Fare clic su un nome nella lista.

2.	Fare clic su Cancella.

Per sostituire un campo di variabilità esistente nella lista con un nuovo campo:

1.	Digitare il nome del nuovo campo di variabilità.

2.	Fare clic sul nome dell’elemento che si desidera sostituire.

3.	Fare clic su Sostituisci.

Per spostare un campo di variabilità all’interno della lista:

1.	Fare clic sul nome del campo di variabilità che si desidera spostare.

2.	Fare clic su Su o Giù per spostare l’elemento nella posizione desiderata.


Timeout ricerca (sec.)

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login senza contesto

Intervallo: da 0 a 999 (secondi)

Default: 2

Specificare il periodo di tempo massimo (in secondi) entro il quale il login di Novell può cercare i servizi eDirectory™ per l’utente specificato. Se il valore impostato è troppo basso, il tempo per la ricerca potrebbe terminare prima che l’utente venga individuato. Se il valore impostato è troppo elevato, la ricerca di un utente non valido o non disponibile potrebbe richiedere troppo tempo.

All’inizio è consigliabile impostare un valore basso. Successivamente, se si verificano dei timeout durante le ricerche, impostare il valore su un numero più elevato fino a quando le ricerche non verranno eseguite in modo coerente e corretto.


Secondi prima del timeout

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Cattura di default

Intervallo: da 0 a 1.000 (secondi)

Default: 0

Specifica il numero di secondi di attesa da parte del sistema operativo in seguito alla ricezione degli ultimi dati che precede la fine del lavoro di stampa.


Sicurezza

Pagina delle proprietà: Preferenze TSA

Scheda: Preferenze

Selezionare la casella di controllo Sicurezza per registrare eventi di sicurezza.


Server

Pagina delle proprietà: Gateway IP

Si tratta del nome del server su cui viene usato il gateway IP.


Server

Pagina delle proprietà: Target Service Agent

Scheda: Informazioni di TSA

Utilizzare il campo Server per specificare il nome del server al quale TSA deve essere registrato.


Tempo di risoluzione del server

Pagina delle proprietà: Adattatore di compatibilità Novell® IPX™

Scheda: Parametri

Intervallo: da 0 a 5.000 (millisecondi)

Default: 250

Specifica il periodo di tempo massimo impiegato per determinare se un server noto all’indirizzo IPX è realmente un server IP prima di stabilire una connessione NetWare. Il client si collega al server usando una connessione TCP/IP se viene individuato un server IP che supporta l’indirizzo IPX nel periodo di tempo specificato. Il client si collegherà al server utilizzando una connessione IPX di tunneling se il periodo specificato termina prima del rilevamento di un server IP che supporta l’indirizzo IPX.

Nota: questa impostazione è usata quando le applicazioni IPX richiedono che il client stabilisca delle connessioni NetWare o quando l’utente desidera collegarsi a un server IPX.


Servizio

Pagina delle proprietà: Preferenze TSA

Scheda: Preferenze

Selezionare la casella di controllo Servizio per registrare eventi di servizio.


Servizio (profilo dell'ubicazione)
Servizio

Pagina delle proprietà: Proprietà profilo dell’ubicazione

Scheda: Servizi

Utilizzare questo campo per selezionare il servizio di connessione o di login.

Se si seleziona il servizio di login, sarà possibile configurare le impostazioni di login.


Istanza del servizio

Pagina delle proprietà: Proprietà profilo dell’ubicazione

Scheda: Servizi

Immettere il nome della nuova istanza del servizio oppure selezionare un’istanza del servizio esistente dall’elenco a discesa. Al termine dell’operazione fare clic su Aggiungi.


Impostazione

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Impostazioni avanzate

L’impostazione corrente del parametro selezionato.


Mostra il pulsante Avanzate al login

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login avanzato

Specifica se il pulsante Avanzate nella finestra di dialogo Login è abilitato. Questo pulsante visualizza numerose schede che consentono di specificare parametri del login avanzato.


Mostra cancella connessioni al login

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login avanzato

Specifica se la casella di controllo relativa alla cancellazione delle connessioni viene visualizzata nella finestra di dialogo Login. La casella di controllo consente di cancellare tutte le connessioni precedenti quando viene creata una nuova connessione alla rete.


Mostra lista delle ubicazioni al login

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login avanzato

Specifica se la lista Ubicazione nella finestra di dialogo Login è abilitata. La lista visualizza le posizioni recenti in cui l’utente ha eseguito il login.


Mostra icona TSA sulla barra dei task

Pagina delle proprietà: Target Service Agent

Scheda: Informazioni di TSA

Per visualizzare l’icona TSA sulla barra dei task selezionare questa casella di controllo.


Mostra il pulsante Variabili al login

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login avanzato

Specifica se il pulsante Variabili nella finestra di dialogo Login è abilitato. Il pulsante consente di immettere le variabili dello script di login utilizzate quando l’utente esegue il login.


Al login, mostra solo la workstation
Solo workstation

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login avanzato

Selezionare questa casella se si desidera che la casella di controllo Solo workstation sia disponibile quando gli utenti eseguono il login.

Per collegarsi alla workstation Window* senza collegarsi alla rete NetWare®, selezionare la casella di controllo Solo workstation nella finestra di dialogo Login.


Static

Selezionare la casella di controllo Static se non si desidera che la lista venga integrata dai campi di variabilità rilevati in modo dinamico da agenti di directory.

Se si seleziona la casella di controllo Static per la lista degli agenti di directory, le richieste SLP saranno inviate agli agenti di directory i cui indirizzi o nomi DNS sono stati configurati nella lista. In caso contrario, le richieste verranno inviate da SLP a tutti gli agenti di directory annunciati nella rete.


Stato

Pagina delle proprietà: Gateway IP

Visualizza lo stato del gateway IP.

I possibili numeri che indicano lo stato e le relative spiegazioni sono:

0   =   Gateway disabilitato

1   =   Gateway non connesso

2   =   Connessione al gateway in esecuzione

3   =   Tempo di accesso al gateway scaduto

4   =   Server gateway occupato

5   =   Accesso al gateway negato

6   =   Gateway connesso

7   =   Server gateway non trovato

8   =   Connessione rifiutata dal server gateway

9   =   Rete locale non disponibile

10 =   Connessione al client gateway interrotta

11 =   Connessione al server gateway reimpostata


Memorizza il profilo dell'utente nella directory Home/Mail

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login avanzato

Questo pulsante è disponibile solo se è selezionata la casella di controllo relativa all’archiviazione del profilo comune NetWare® nella pagina delle proprietà Login avanzato.

Per memorizzare il profilo comune in rete, selezionare l’opzione Memorizza il profilo dell’utente nella directory Home/Mail. La directory Mail dell’utente è usata per le connessioni bindery mentre la directory Home dell’utente è usata per le connessioni eDirectory™.

La memorizzazione del profilo utente in rete consente di utilizzare lo stesso ambiente desktop in tutte le workstation della rete. Le modifiche apportate all'ambiente utente di una workstation verranno salvate nel profilo memorizzato in rete. L'ambiente specificato nel profilo sarà disponibile su tutte le workstation a cui l'utente accede.


Memorizza profilo in una directory del file system NetWare

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login avanzato

Questo pulsante è disponibile solo se è selezionata la casella di controllo relativa all’archiviazione del profilo comune NetWare nella pagina delle proprietà Login avanzato.

Per memorizzare il profilo comune in una directory specifica su un server NetWare®, selezionare l’opzione Memorizza profilo in una directory del file system NetWare. Questa opzione consente di memorizzare il profilo di un utente che esegue il login alla workstation nella directory specificata. Si consiglia di utilizzare questa opzione principalmente per i profili obbligatori.

La memorizzazione del profilo utente in rete consente di utilizzare lo stesso ambiente desktop in tutte le workstation della rete. Le modifiche apportate all'ambiente utente di una workstation verranno salvate nel profilo memorizzato in rete. L'ambiente specificato nel profilo sarà disponibile su tutte le workstation a cui l'utente accede.

La selezione di questa opzione rende disponibile la casella di modifica Percorso. Utilizzare questa casella per specificare l’ubicazione della memorizzazione del profilo.


Contatto sistema

Pagina delle proprietà: SNMP

Scheda: SNMP

Default: Nessuno

Questa impostazione facoltativa specifica il nome dell’amministratore di sistema (amministratore di rete) per la workstation. Usare il nome reale, non il nome utente, dell’utente da contattare in caso di problemi di manutenzione della workstation.

L’impostazione fornisce informazioni al manager SNMP relativamente all’amministratore di sistema della workstation e tali informazioni possono essere recuperate dalle workstation di gestione SNMP.

Può essere utilizzata con o senza le informazioni relative al nome di sistema o all’ubicazione di sistema.


Ubicazione sistema

Pagina delle proprietà: SNMP

Scheda: SNMP

Default: Nessuno

Questa impostazione facoltativa specifica l’ubicazione fisica della workstation.

Fornisce informazioni al manager SNMP in relazione all’ubicazione fisica della workstation e tali informazioni possono essere recuperate dalle workstation di gestione SNMP.

L’impostazione può essere utilizzata con o senza le informazioni relative al contatto di sistema o al nome di sistema.


Nome sistema

Pagina delle proprietà: SNMP

Scheda: SNMP

Default: Nessuno

Questa impostazione facoltativa specifica il nome utente. Utilizzare il nome utente o di login, o il nome host TCP/IP, se assegnati. Ad esempio, se il nome di login è KSMITH, specificare KSMITH.

L’impostazione informa il manager SNMP del nome utente. Tali informazioni possono essere recuperate dalle workstation di gestione SNMP.

L’impostazione può essere utilizzata con o senza le informazioni relative al contatto di sistema o all’ubicazione di sistema.


Marchi di fabbrica, copyright, esclusioni di garanzia e brevetti

Copyright © 1994-2003 Novell, Inc. Tutti i diritti riservati. È vietato riprodurre, fotocopiare, memorizzare su un sistema o trasmettere la presente pubblicazione senza l'espresso consenso scritto dell'editore.

Brevetti USA n. 5,157,663; 5,349,642; 5,455,932; 5,553,139; 5,553,143; 5,594,863; 5,608,903; 5,633,931; 5,652,854; 5,671,414; 5,677,851; 5,692,129. In attesa di brevetto negli Stati Uniti e in altri Paesi.

Novell, Inc. non rilascia alcuna dichiarazione e non fornisce alcuna garanzia in merito al contenuto o uso di questa documentazione e in particolare disconosce qualsiasi garanzia espressa o implicita di commerciabilità o idoneità a qualsiasi scopo specifico. Novell, Inc. inoltre si riserva il diritto di aggiornare la presente pubblicazione e di modificarne il contenuto in qualsiasi momento, senza alcun obbligo di notificare tali revisioni o modifiche a qualsiasi persona fisica o giuridica.

Novell, Inc. inoltre non rilascia alcuna dichiarazione e non fornisce alcuna garanzia in merito a qualsiasi software Novell e, in modo specifico, non riconosce alcuna garanzia, espressa o implicita, di commerciabilità o idoneità per un fine particolare. Novell, Inc. inoltre si riserva il diritto di modificare qualsiasi parte del software Novell in qualsiasi momento, senza alcun obbligo di notificare tali revisioni a qualsiasi persona fisica o giuridica.

Marchi di fabbrica di Novell

Internetwork Packet Exchange e IPX sono marchi di fabbrica di Novell, Inc.

eDirectory è un marchio di fabbrica di Novell, Inc.

NetWare è un marchio registrato di Novell, Inc. negli Stati Uniti e in altri Paesi.

NetWare 4 è un marchio di fabbrica di Novell, Inc.

NetWare 5 è un marchio di fabbrica di Novell, Inc.

NetWare Core Protocol e NCP sono marchi di fabbrica di Novell, Inc.

NetWare/IP è un marchio di fabbrica di Novell, Inc.

Novell è un marchio registrato di Novell, Inc. negli Stati Uniti e in altri Paesi.

Novell Client è un marchio di fabbrica di Novell, Inc.

Open Data-Link Interface e ODI sono marchi di fabbrica di Novell, Inc.

Packet Burst è un marchio di fabbrica di Novell, Inc.

Sequenced Packet Exchange e SPX sono marchi di fabbrica di Novell, Inc.

Marchi commerciali di terze parti

International Business Machines e IBM sono marchi registrati di International Business Machines Corporation.

Microsoft è un marchio registrato di Microsoft Corporation.

MS-DOS è un marchio registrato di Microsoft Corporation.

Network Driver Interface Specification e NDIS sono marchi di fabbrica di PC-Plus Communications LP.

Windows è un marchio registrato di Microsoft Corporation.

Windows 95/98 è un marchio di fabbrica di Microsoft Corporation.

Windows NT/2000/XP è un marchio registrato di Microsoft Corporation.


Albero

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Client

Questa lista è parte del parametro della coppia albero e contesto, che specifica l’ubicazione di ogni oggetto Utente nell’albero eDirectory™ per gli utenti di NetWare® 4* e versioni successive che utilizzano eDirectory. Questa coppia di parametri non viene applicata se si esegue il login a un server NetWare utilizzando servizi di bindery.

Il contesto viene utilizzato per gli utenti che accedono a un albero specificato utilizzando la presente workstation. Dato che è possibile accedere a più alberi, ogni albero è dotato di un contesto specifico personalizzato. È possibile modificare l'albero e il contesto durante l'accesso. Tuttavia, è possibile che un utente disponga di un solo contesto in ciascun albero.


Albero (login)
Albero

Indicare l'albero utilizzato da Workstation Manager per gestire la workstation.


Coppia albero e catalogo

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login senza contesto

Durante una sessione di login, i cataloghi utilizzabili vengono automaticamente trovati. È possibile specificare coppie albero e catalogo per far sì che il login senza contesto utilizzi un catalogo specifico per ogni albero nella lista.


Coppia albero e contesto

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Client

Specifica l’ubicazione di ogni oggetto Utente nell’albero eDirectory™ per gli utenti di NetWare® 4* e versioni successive che utilizzano eDirectory. Non si applica se si esegue il login a un server NetWare 3* o a un server NetWare 4 utilizzando servizi di bindery.

Il contesto viene utilizzato per gli utenti che accedono a un albero specificato utilizzando la presente workstation. Dato che è possibile accedere a più alberi, ogni albero è dotato di un contesto specifico personalizzato. È possibile modificare l'albero e il contesto durante l'accesso. Tuttavia, è possibile che un utente disponga di un solo contesto in ciascun albero.


Albero di fiducia

Pagina delle proprietà: Novell® Workstation Manager

Scheda: Workstation Manager

Specifica l’albero di fiducia utilizzato da Workstation Manager.


Su

Selezionare un elemento dalla lista e fare clic su Su per spostarlo verso l’alto di una posizione nella lista.


Aggiorna tutti i componenti se alcuni sono obsoleti

Pagina delle proprietà: Configurazione dell'installazione

Scheda: Imposta

Default: Abilitato

Se questa casella di controllo è selezionata, tutti i componenti verranno aggiornati se le versioni di alcuni componenti installati sono precedenti a quelle nuove. Se questa casella di controllo non è selezionata, verranno aggiornati solo i componenti obsoleti.


Usa tutti i tipi di frame rilevati

Pagina delle proprietà: Protocollo IPX a 32 bit

Scheda: IPX avanzato

Default: Attivo

Specifica se il protocollo IPX™ viene automaticamente associato a tutte le schede logiche che vengono rilevate.

Quando questo parametro è impostato su Attivo, IPX viene automaticamente associato a tutte le schede logiche. Non è necessario che i driver LAN siano caricati prima del protocollo IPX. Se IPX rileva il caricamento di un driver LAN, verrà associato alle schede logiche presentate dal driver LAN.

Se IPX non deve utilizzare tutte le schede logiche presentate, è possibile migliorare le prestazioni della workstation mediante l’impostazione Usa solo i seguenti tipi di frame per specificare solo le schede logiche necessarie.


Usa contesto (DHCP)

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Impostazioni DHCP

Default: Disabilitato

Interroga il server DHCP per ottenere informazioni sul contesto e colloca tali informazioni nella sezione del servizio di login del profilo dell’ubicazione selezionato dall’elenco a discesa.


Usa DHCP

Pagina delle proprietà: Adattatore di compatibilità Novell® IPX™

Scheda: Parametri

Default: Abilitato

Quando DHCP è abilitato, i driver di compatibilità IPX cercano di ottenere le informazioni relative alla configurazione dei parametri del numero di rete, del tempo di stallo della lista Agenti e dell’agente di migrazione tramite DHCP. Se non è possibile ottenere le informazioni relative alla configurazione tramite DHCP, la modalità di compatibilità utilizza le impostazioni di default.


Usa impostazioni di default

Pagina delle proprietà: Adattatore di compatibilità Novell® IPX™

Scheda: Parametri

Default: Abilitato

Se l’opzione Usa impostazioni di default è abilitata, l’adattatore utilizzerà le impostazioni specificate quando si seleziona Impostazioni di default nel campo Adattatore.

Se l’opzione è disabilitata, l’adattatore utilizzerà le impostazioni specificate dall’utente.


Usa la porta NWIP definita dall'utente

Pagina delle proprietà: Configurazione NetWare/IP

Scheda: Parametri

Default: Disattivo

Questa opzione viene utilizzata per le reti in cui non è usata la porta NWIP di default (0xABCD). La configurazione della porta NWIP di default corretta migliorerà l’avvio del client NWIP nelle reti NetWare®/IP* 2.2.


Utilizza Novell GINA
Usa Novell GINA se viene trovato un GINA diverso

Pagina delle proprietà: Configurazione dell'installazione

Scheda: Client

Default: Attivo

Specifica se l’Autenticatore GINA di Novell® Client™ per Window* NT/2000/XP* è installato quando viene rilevato un GINA diverso.

Se il parametro Chiedi di usare Novell GINA è impostato su No e l’impostazione Usa Novell GINA se viene trovato un GINA diverso è impostata su Sì, Novell GINA sarà sempre installato.

Se i parametri Chiedi di usare Novell GINA e Usa Novell GINA se viene trovato un GINA diverso sono impostati su No, Novell GINA non verrà utilizzato se esiste un GINA diverso, a eccezione di Microsoft* GINA, che viene sempre sostituito.

Se il parametro Chiedi di usare Novell GINA è impostato su Sì, l’impostazione relativa all’utilizzo determina qual è il pulsante di default nella finestra di dialogo.


Usa solo i seguenti tipi di frame

Pagina delle proprietà: Protocollo IPX a 32 bit

Scheda: IPX avanzato

Default: Disattivo

Specifica le schede logiche a cui è associato il protocollo IPX™. Per specificare le schede logiche, selezionare il tipo di frame. Ogni volta che si seleziona un tipo di frame, fare clic su Aggiungi per aggiungerlo alla lista.

Se IPX non deve usare tutte le schede logiche presentate, è possibile migliorare le prestazioni della workstation utilizzando questa impostazione per specificare solo le schede logiche necessarie.


Usa albero (DHCP)

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Impostazioni DHCP

Default: Disabilitato

Interroga il server DHCP per ottenere informazioni sull’albero e colloca tali informazioni nella sezione del servizio di login del profilo dell’ubicazione selezionato dall’elenco a discesa.


Utente

Pagina delle proprietà: Gateway IP

Visualizza il nome dell’utente che utilizza il gateway IP.


Utente (TSA)
Utente

Pagina delle proprietà: Target Service Agent

Scheda: Informazioni di TSA

Immettere il nome dell’utente a cui è consentito di eseguire Target Service Agent nella workstation.


Variabili %2
Variabili

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login avanzato

È possibile definire un numero massimo di quattro variabili che possono essere utilizzate dagli script di login. Gli script di login necessari per utilizzare queste variabili possono essere impostati dall'utente o dall'amministratore di rete.

Ad esempio, è possibile definire una variabile per mappare un'unità al server di posta elettronica.

Per definire una variabile:

Nota: per completare la procedura, è necessario innanzitutto selezionare le caselle di controllo Pulsante Avanzate e Pulsante Variabili nella pagina delle proprietà Login avanzato. Se non è visualizzato alcun pulsante Avanzate nella finestra di dialogo Login di NetWare, significa che le caselle di controllo non sono state selezionate.

1. Fare clic con il pulsante destro del mouse sull'icona N (Novell) rossa sul system tray.

2. Fare clic su Login di NetWare, quindi su Avanzate, Script e infine su Variabili.

3. Immettere le variabili che si desidera utilizzare nei campi appropriati. Le variabili possono avere una lunghezza massima di 64 caratteri.

Questi parametri sono equivalenti ai parametri corrispondenti che è possibile passare nel comando LOGIN in DOS.


Variabili %3
Variabili

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login avanzato

È possibile definire un numero massimo di quattro variabili che possono essere utilizzate dagli script di login. Gli script di login necessari per utilizzare queste variabili possono essere impostati dall'utente o dall'amministratore di rete.

Ad esempio, è possibile definire una variabile per mappare un'unità al server di posta elettronica.

Per definire una variabile:

Nota: per completare la procedura, è necessario innanzitutto selezionare le caselle di controllo Pulsante Avanzate e Pulsante Variabili nella pagina delle proprietà Login avanzato. Se non è visualizzato alcun pulsante Avanzate nella finestra di dialogo Login di NetWare, significa che le caselle di controllo non sono state selezionate.

1. Fare clic con il pulsante destro del mouse sull'icona N (Novell) rossa sul system tray.

2. Fare clic su Login di NetWare, quindi su Avanzate, su Script e infine su Variabili.

3. Immettere le variabili che si desidera utilizzare nei campi appropriati. Le variabili possono avere una lunghezza massima di 64 caratteri.

Questi parametri sono equivalenti ai parametri corrispondenti che è possibile passare nel comando LOGIN in DOS.


Verbose

Pagina delle proprietà: Configurazione NetWare/IP

Scheda: Parametri

Default: Disattivo

Per risolvere i problemi relativi a NetWare®/IP*, selezionare questa casella di controllo. I messaggi NetWare/IP aggiuntivi vengono registrati quando questo parametro è impostato su Attivo.


Versione

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Client

Visualizza il numero di versione del client.


Consenti ricerca con caratteri jolly

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login senza contesto

Default: Disabilitato (deselezionato)

Se viene eseguita la ricerca con caratteri jolly, è possibile utilizzare i caratteri jolly nel nome utente, anziché immettere il nome utente intero.

Ad esempio, un utente con il nome utente di JLOPEZ può immettere JLOPEZ* come stringa di ricerca.


Frequenza di aggiornamento eDirectory della workstation

Pagina delle proprietà: Novell® Workstation Manager

Scheda: Workstation Manager

Intervallo: da 1 a 60.000 (minuti)

Default: 30

In seguito all’autenticazione del servizio Workstation Manager, viene effettuato periodicamente il polling di eDirectory™ per determinare se alcune azioni pianificate sono state associate o rimosse dalla workstation. Questa impostazione consente all’amministratore di rete di modificare il periodo di tempo che intercorre tra gli aggiornamenti.


Tick

Ci sono circa 18,21 tick al secondo sui PC IBM* e compatibili. È quindi possibile stabilire quanto segue:

3 secondi equivalgono a circa 54 tick

30 secondi equivalgono a circa 545 tick

1 minuto equivale a circa 1.090 tick

5 minuti equivalgono a circa 5.460 tick


variabili %4
Variabili

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login avanzato

È possibile definire un numero massimo di quattro variabili che possono essere utilizzate dagli script di login. Gli script di login necessari per utilizzare queste variabili possono essere impostati dall'utente o dall'amministratore di rete.

Ad esempio, è possibile definire una variabile per mappare un'unità al server di posta elettronica.

Per definire una variabile:

Nota: per completare la procedura, è necessario innanzitutto selezionare le caselle di controllo Pulsante Avanzate e Pulsante Variabili nella pagina delle proprietà Login avanzato. Se non è visualizzato alcun pulsante Avanzate nella finestra di dialogo Login di NetWare, significa che le caselle di controllo non sono state selezionate.

1. Fare clic con il pulsante destro del mouse sull'icona N (Novell) rossa sul system tray.

2. Fare clic su Login di NetWare, quindi su Avanzate, su Script e infine su Variabili.

3. Immettere le variabili che si desidera utilizzare nei campi appropriati. Le variabili possono avere una lunghezza massima di 64 caratteri.

Questi parametri sono equivalenti ai parametri corrispondenti che è possibile passare nel comando LOGIN in DOS.


variabili %5
Variabili

Pagina delle proprietà: Configurazione di Novell® Client™

Scheda: Login avanzato

È possibile definire un numero massimo di quattro variabili che possono essere utilizzate dagli script di login. Gli script di login necessari per utilizzare queste variabili possono essere impostati dall'utente o dall'amministratore di rete.

Ad esempio, è possibile definire una variabile per mappare un'unità al server di posta elettronica.

Per definire una variabile:

Nota: per completare la procedura, è necessario innanzitutto selezionare le caselle di controllo Pulsante Avanzate e Pulsante Variabili nella pagina delle proprietà Login avanzato. Se non è visualizzato alcun pulsante Avanzate nella finestra di dialogo Login di NetWare, significa che le caselle di controllo non sono state selezionate.

1. Fare clic con il pulsante destro del mouse sull'icona N (Novell) rossa sul system tray.

2. Fare clic su Login di NetWare, quindi su Avanzate, su Script e infine su Variabili.

3. Immettere le variabili che si desidera utilizzare nei campi appropriati. Le variabili possono avere una lunghezza massima di 64 caratteri.

Questi parametri sono equivalenti ai parametri corrispondenti che è possibile passare nel comando LOGIN in DOS.


Usa server

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Impostazioni DHCP

Default: Disabilitato

Interroga il server DHCP per ottenere informazioni sul server e imposta tali informazioni nella sezione Servizio di login del profilo dell'ubicazione selezionato dall'elenco a discesa.

Se la casella di controllo dei dati binari DHCP è selezionata, i dati ricevuti dal server DHCP sono costituiti da un indirizzo IP (dati binari).

Se la casella di controllo non è selezionata (default), i dati ricevuti dal server DHCP sono costituiti da informazioni sul server, sull'albero e sul contesto sotto forma di stringa.


Abilita login senza contesto LDAP

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP

Default: Disabilitato

Per abilitare il login senza contesto LDAP, selezionare questa casella di controllo. Per utilizzare il login senza contesto LDAP, è necessario aver installato i servizi LDAP per eDirectory™ sul server aziendale che ospita l'albero aziendale.


Porta

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP

Specificare la porta utilizzata dal login senza contesto LDAP per comunicare con il server LDAP.


Timeout connessione

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP

Default: 10 secondi

Specificare il numero di secondi di attesa prima dell'annullamento della richiesta durante il login senza contesto LDAP.


Nome e ubicazione certificato

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP

Specificare il nome e il percorso nella workstation del certificato che verrà utilizzato durante il login senza contesto LDAP per stabilire una connessione sicura al server LDAP.


Elenco Alberi

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP

Elenca gli alberi in cui sono in esecuzione i servizi LDAP nei quali verranno eseguite le ricerche durante il login.


Alberi - Pulsante Aggiungi

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP

Per aggiungere un albero con servizi LDAP in esecuzione all'elenco degli alberi nei quali verranno eseguite le ricerche durante il login, immettere il nome dell'albero nella casella Alberi, quindi fare clic su Aggiungi.


Alberi - Pulsante Cancella

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP

Per cancellare uno o più alberi sui quali sono in esecuzione i servizi LDAP, selezionare gli alberi e fare clic su Cancella. In tali alberi non verranno più eseguite ricerche durante il login.


Alberi - Pulsante Proprietà

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP

Per impostare le informazioni relative all'ambito del contesto di un albero, selezionare un albero dall'elenco e fare clic su Proprietà. È possibile limitare l'ambito della ricerca selezionando l'opzione Ricerca solo in contesto.


Elenco Server

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP

Elenca i server associati all'albero con servizi LDAP in esecuzione.


Server - Pulsante Aggiungi

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP

Per aggiungere un server associato all'albero con servizi LDAP in esecuzione, immettere il nome del server nella casella Server, quindi fare clic su Aggiungi. Le ricerche nei server vengono eseguite in base all'ordine di visualizzazione dei server nell'elenco. È possibile modificare l'ordine di ricerca.


Server - Pulsante Cancella

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP

Per cancellare uno o più server LDAP, selezionare i server e fare clic su Cancella.


Server - Pulsante Proprietà

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP

Per configurare le impostazioni di cifratura dei dati e le impostazioni di timeout del server LDAP, selezionare il server dall'elenco e fare clic su Proprietà.


Server - Pulsante Su

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP

Selezionare il server che si desidera spostare verso l'alto nell'elenco di ricerca, quindi scegliere Su. Il server viene spostato di una posizione verso l'alto nell'elenco di ricerca. Le ricerche nei server vengono eseguite in base all'ordine di visualizzazione dei server nell'elenco.


Server - Pulsante Giù

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP

Selezionare il server che si desidera spostare verso il basso nell'elenco di ricerca, quindi scegliere Giù. Il server viene spostato di una posizione verso il basso nell'elenco di ricerca. Le ricerche nei server vengono eseguite in base all'ordine di visualizzazione dei server nell'elenco.


Abilita ambito di ricerca contesto LDAP

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP: Ambito di ricerca del contesto

Default: Disabilitato

È possibile limitare l'ambito di ricerca a un contesto specifico oppure a un contesto e un sottoalbero specifici.


Elenco Contesti

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP: Ambito di ricerca del contesto

Elenca i contesti dell'albero in cui vengono eseguite le ricerche durante il login senza contesto LDAP. Le ricerche nei contesti vengono eseguite in base all'ordine di visualizzazione dei contesti nell'elenco.

Immettere il contesto come contesto LDAP distinto delimitato da virgole (ad esempio, ou=unità_organizzativa,o=organizzazione).

Durante il login senza contesto LDAP l'utente verrà ricercato all'interno del contesto specificato nell'albero.

È possibile specificare più ambiti di ricerca del contesto. Le ricerche negli ambiti di ricerca del contesto vengono eseguite in base all'ordine di visualizzazione nell'elenco. È possibile modificare l'ordine di ricerca.


Contesti - Pulsante Aggiungi

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP: Ambito di ricerca del contesto

Immettere il contesto in cui il login senza contesto LDAP deve eseguire la ricerca, quindi fare clic su Aggiungi. Il contesto deve essere un contesto LDAP distinto delimitato da virgole (ad esempio, ou=unità_organizzativa,o=organizzazione).

Durante il login senza contesto LDAP l'utente verrà ricercato all'interno del contesto specificato nell'albero.


Contesti - Pulsante Cancella

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP: Ambito di ricerca del contesto

Selezionare uno o più contesti nell'albero da cancellare dall'elenco di ricerca del login senza contesto LDAP, quindi fare clic su Cancella. Nei contesti cancellati non verranno più eseguite ricerche.


Contesti - Pulsante Sostituisci

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP: Ambito di ricerca del contesto

Selezionare un contesto da sostituire nell'elenco dei contesti, quindi immettere le informazioni del nuovo contesto nel campo di testo Contesti e fare clic su Sostituisci. È necessario immettere un contesto LDAP distinto delimitato da virgole (ad esempio, ou=unità_organizzativa,o=organizzazione). Le informazioni relative al contesto precedente vengono sostituite dalle informazioni del nuovo contesto, senza modificare l'ordine dei contesti nell'elenco.


Contesti - Pulsante Su

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP: Ambito di ricerca del contesto

Selezionare il contesto che si desidera spostare nell'elenco di ricerca, quindi scegliere Su. Il contesto viene spostato di una posizione verso l'alto nell'elenco. Le ricerche nei contesti vengono eseguite in base all'ordine di visualizzazione dei contesti nell'elenco.


Contesti - Pulsante Giù

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP: Ambito di ricerca del contesto

Selezionare il contesto che si desidera spostare nell'elenco di ricerca, quindi scegliere Giù. Il contesto viene spostato di una posizione verso il basso nell'elenco. Le ricerche nei contesti vengono eseguite in base all'ordine di visualizzazione dei contesti nell'elenco.


Abilita login senza albero LDAP

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP

Default: Disabilitato

Per abilitare il login senza albero, selezionare questa casella di controllo. Il login senza albero consente di eseguire il login alla rete senza specificare un albero.


Dati non cifrati

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP: Proprietà del server LDAP

Selezionare l'opzione Dati non cifrati per abilitare la trasmissione delle parole d'ordine in formato non cifrato. L'uso dei dati non cifrati non garantisce la stessa sicurezza offerta dal metodo SSL.


Dati cifrati (SSL)

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP: Proprietà del server LDAP

Selezionare Dati cifrati (SSL) per cifrare i dati mediante Secure Socket Layer (SSL).


Dati cifrati (SSL) - Porta

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP: Proprietà del server LDAP

Specificare la porta utilizzata dal login senza contesto LDAP per comunicare con il server LDAP quando si utilizza la cifratura SSL.


Timeout ricerca

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP: Proprietà del server LDAP

Default: 10 secondi

Specificare la durata in secondi della ricerca prima dell'annullamento durante il login senza contesto LDAP.


Ricerca in contesto e sottoalbero

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP: Ambito di ricerca del contesto

Per abilitare una ricerca nel contesto specificato e nei container all'interno di tale contesto, selezionare Ricerca in contesto e sottoalbero.


Ricerca solo in contesto

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login senza contesto LDAP

Per abilitare una ricerca solo nel contesto specificato, selezionare Ricerca solo in contesto.


Abilita agente di aggiornamento automatico

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Agente di aggiornamento

Default: Disabilitato

Per abilitare l'avvio automatico dell'agente di aggiornamento automatico di Novell Client, selezionare la casella di controllo Abilita agente di aggiornamento automatico. L'agente di aggiornamento ricerca una nuova versione di Novell Client ad intervalli prestabiliti e dalle ubicazioni specificate. L'agente di aggiornamento viene avviato automaticamente come parte del processo di login. Se non si desidera avviare automaticamente l'agente di aggiornamento, deselezionare questa casella di controllo.


Intervallo di avvio dell'agente di aggiornamento

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Agente di aggiornamento

Default: 7 giorni

Impostare l'intervallo di tempo (in giorni) dopo il quale viene avviato l'agente di aggiornamento automatico per la ricerca di una nuova versione di Novell Client. Default=


Casella di controllo Ubicazione di aggiornamento

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Agente di aggiornamento

Default: Disabilitato

Selezionare questa opzione per abilitare l'agente di aggiornamento automatico alla ricerca di una nuova versione di Novell Client nell'ubicazione di aggiornamento indicata.

L'agente di aggiornamento ricerca eventuali aggiornamenti nelle ubicazioni abilitate nell'ordine seguente: nell'ubicazione di aggiornamento; nell'ubicazione di installazione precedente.

Nota: l'agente di aggiornamento ricerca tipi di file validi in ciascuna ubicazione abilitata e interrompe la ricerca dopo averli individuati. Assicurarsi di disporre dei file più aggiornati nella prima ubicazione in cui l'agente di aggiornamento esegue la ricerca.


Ubicazione di aggiornamento

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Agente di aggiornamento

Specificare l'ubicazione in cui l'agente di aggiornamento automatico ricercherà le nuove versioni del software Novell Client: un percorso UNC, un'unità mappata o un URL.


Casella di controllo Ubicazione di installazione precedente

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Agente di aggiornamento

Default: Disabilitato

Per abilitare l'agente di aggiornamento automatico alla ricerca di una nuova versione del software Novell Client nella stessa ubicazione in cui il software Novell Client è stato installato l'ultima volta, selezionare questa casella di controllo. Non è possibile modificare questa ubicazione.

L'agente di aggiornamento ricerca eventuali aggiornamenti nelle ubicazioni abilitate nell'ordine seguente: nell'ubicazione di aggiornamento; nell'ubicazione di installazione precedente.

Nota: l'agente di aggiornamento ricerca tipi di file validi in ciascuna ubicazione abilitata e interrompe la ricerca dopo averli individuati. Assicurarsi di disporre dei file più aggiornati nella prima ubicazione in cui l'agente di aggiornamento esegue la ricerca.


Ubicazione di installazione precedente

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Agente di aggiornamento

Visualizza l'ubicazione da cui è stata installata la versione di Novell Client attuale. Non è possibile modificare questa ubicazione.


Casella di controllo Sito Web di aggiornamento di Novell Client

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Agente di aggiornamento

Default: Disabilitato

Per abilitare l'agente di aggiornamento automatico alla ricerca di una nuova versione di Novell Client nel sito Web di aggiornamento indicato, selezionare questa casella di controllo.

L'agente di aggiornamento ricerca eventuali aggiornamenti nelle ubicazioni abilitate nell'ordine seguente: nell'ubicazione di aggiornamento; nell'ubicazione di installazione precedente; quindi nel sito Web di aggiornamento di Novell Client.

Nota: l'agente di aggiornamento ricerca tipi di file validi in ciascuna ubicazione abilitata e interrompe la ricerca dopo averli individuati. Assicurarsi di disporre dei file più aggiornati nella prima ubicazione in cui l'agente di aggiornamento esegue la ricerca.


Sito Web di aggiornamento di Novell Client

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Agente di aggiornamento

Specificare il sito Web in cui l'agente di aggiornamento automatico ricercherà le nuove versioni del software Novell Client. È possibile specificare un indirizzo IP o un nome DNS.


File Unattend

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Agente di aggiornamento

Specificare il nome del file Unattend utilizzato dall'agente di aggiornamento automatico per determinare se è necessario aggiornare Novell Client. Il file Unattend deve essere memorizzato nell'ubicazione di aggiornamento o nell'ubicazione di installazione precedente, se abilitate. Non è possibile specificare il file Unattend con il sito Web di aggiornamento di Novell Client.


Casella di controllo Aggiornamento di Service Pack

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Agente di aggiornamento

Default: Disabilitato

Per abilitare l'agente di aggiornamento automatico alla ricerca di un support pack di Novell Client nelle ubicazioni di aggiornamento indicate, selezionare questa casella di controllo.

Nota: l'agente di aggiornamento ricerca tipi di file validi in ciascuna ubicazione abilitata e interrompe la ricerca dopo averli individuati. Assicurarsi di disporre dei file più aggiornati nella prima ubicazione in cui l'agente di aggiornamento esegue la ricerca.


Casella di controllo Dati binari

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Impostazioni DHCP

Default: Disabilitato

Se la casella di controllo Dati binari è selezionata, i dati ricevuti dal server DHCP sono costituiti da un indirizzo IP (dati binari).

Se la casella di controllo non è selezionata (default), i dati ricevuti dal server DHCP sono costituiti da informazioni sul server, sull'albero e sul contesto (sotto forma di stringa).


Login iniziale Novell

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login avanzato

Default: Disabilitato

Per disabilitare la finestra del login iniziale Novell all'avvio della workstation, deselezionare questa casella di controllo.


Parola d'ordine caratteri ASCII estesi OEM

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login avanzato

Default: Disabilitato

Per abilitare l'uso dei caratteri ASCII estesi (OEM) nelle parole d'ordine, selezionare questa casella di controllo. Utilizzare i caratteri ASCII estesi (OEM) solo se si dispone di software precedente che richiede l'uso della tabella codici OEM.

Le versioni più recenti di Novell Client supportano i caratteri ASCII estesi mediante la tabella codici UNICODE e non richiedono l'abilitazione di questa impostazione per gestire i caratteri speciali, quali Ñ o €.


Autenticazione NMAS

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login avanzato

Default: Abilitato

Per abilitare l'uso di NMAS (Novell Modular Authentication Services) durante il login, selezionare questa casella di controllo. L'autenticazione NMAS migliora la sicurezza della rete. Tuttavia, se la rete in uso non utilizza NMAS, il login potrebbe richiedere tempo aggiuntivo e potrebbe essere necessario disabilitare l'autenticazione NMAS.


Mostra al login - Albero

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login avanzato

Default: Abilitato

Specifica se nella finestra di dialogo di login è abilitata la visualizzazione dell'albero.


Mostra al login - Pulsante albero

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login avanzato

Default: Abilitato

Specifica se nella finestra di dialogo di login viene visualizzato il pulsante che consente di sfogliare l'albero.


Mostra al login - Contesto

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login avanzato

Default: Abilitato

Specifica se nella finestra di dialogo di login viene visualizzato il contesto.


Mostra al login - Pulsante contesto

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login avanzato

Default: Abilitato

Specifica se nella finestra di dialogo di login viene visualizzato il pulsante che consente di sfogliare il contesto.


Mostra al login - Pulsante Forza logoff

Pagina delle proprietà: Configurazione del Client™ Novell®

Scheda: Login avanzato

Default: Disabilitato

Specifica se il pulsante Forza logoff è disponibile nella finestra di dialogo di login visualizzata quando la workstation è bloccata. Il pulsante Forza logoff consente di terminare la sessione dell'utente precedente di Novell Client, anche se questi ha bloccato la workstation.

Avviso: i dati non salvati dall'utente precedente andranno persi. Per mantenere le applicazioni aperte e le connessioni di rete attuali, eseguire il login utilizzando il nome utente e la parola d'ordine utilizzati per il login precedente.


Elimina Single Sign-on per questo login

Pagina delle proprietà:  Configurazione del client™ Novell®

Scheda:  Login avanzato

Specifica se la casella di controllo Elimina Single Sign-on per questo login viene visualizzata nella finestra di dialogo Login.  Questa casella di controllo viene visualizzata nella finestra di dialogo Login solo se il prodotto Novell Single Sign-on è installato nella workstation.  La casella di controllo consente di disabilitare il processo di single sign-on per il login attuale.


Elimina richiesta di aggiornamento

Pagina delle proprietà:  Configurazione di Novell® Client™

Scheda:  Agente di aggiornamento

Default:  Disabilitato

Per eliminare la richiesta visualizzata quando l'agente di aggiornamento determina la necessità di eseguire un aggiornamento, selezionare questa casella di controllo. In questo modo non viene richiesta conferma all'utente e l'aggiornamento viene avviato in modo automatico.


Installa NMAS

Pagina delle proprietà: Configurazione dell'installazione

Scheda: Imposta

Default: abilitata

Se questa casella di controllo è selezionata, verrà installato Novell Modular Authentication Services™ (NMAS™). NMAS è parte integrante del metodo di autenticazione con parola d'ordine utilizzato in NetWare® 6.5 o versione successiva. Se questo prodotto viene installato, ma non lo si utilizza nella rete, è possibile che il processo di login richieda più tempo. Deselezionare la casella di controllo per non installare questo prodotto.

Nota: se si installa questo prodotto, sarà possibile disabilitarne l'uso deselezionando l'opzione Autenticazione NMAS nella pagina Login avanzato di Configurazione di Novell Client.


Installa NetIdentity

Pagina delle proprietà:  Configurazione dell'installazione

Scheda:  Installazione

Default:  Disabilitato

Se questa casella di controllo è selezionata, viene installato l'agente NetIdentity. L'agente NetIdentity viene utilizzato nella procedura di autenticazione di Novell® Client™ per fornire l'autenticazione in background delle applicazioni basate su Web che richiedono l'autenticazione a Novell eDirectory™, quali Novell iManager, iPrint e Novell iFolder®.

Se l'agente è installato e gli utenti eseguono l'autenticazione a eDirectory mediante il login a Novell Client o tramite un'applicazione basata su Web che utilizza l'agente NetIdentity, all'utente non verrà richiesto di eseguire il login all'apertura di un'altra applicazione che richiede l'autenticazione a eDirectory.

Se questa casella di controllo è deselezionata, l'agente NetIdentity non viene installato e gli utenti devono eseguire il login a ciascuna applicazione separatamente.


Abilita diritti di amministratore per l'agente di aggiornamento

Pagina delle proprietà:  Configurazione di Novell® Client™

Scheda:  Agente di aggiornamento

Default:  Abilitato

Per accertarsi che l'agente di aggiornamento di Novell Client disponga dei diritti di amministratore sulla workstation, selezionare questa casella di controllo. L'agente di aggiornamento deve disporre dei diritti di amministratore per aggiornare Novell Client. Questa casella di controllo risulta particolarmente utile quando l'utente che esegue il login alla workstation non è l'amministratore della workstation.

Se questa casella di controllo non è selezionata, l'agente di aggiornamento viene avviato con i diritti dell'utente che ha eseguito il login.


Installa NICI

Pagina delle proprietà: Configurazione dell'installazione

Scheda: Imposta

Default: abilitata

Se questa casella di controllo è selezionata, verrà installato Novell® International Cryptographic Infrastructure (NICI). NICI è necessario per l'esecuzione di Novell Modular Authentication Services™ (NMAS™) e di altri prodotti Novell. Se non si utilizza NMAS o qualsiasi altro prodotto Novell che richiede l'uso di NICI, non è necessario selezionare questa opzione. Deselezionare la casella di controllo per non installare questo prodotto.