Copyright: Copyright ® 2000 Novell, Inc.


Erster Bannername

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Standardumleitung

Der Text, der in der oberen Hälfte der Bannerseite angezeigt wird. Dieser Text darf aus maximal 12 Zeichen bestehen.


Zweiter Bannername

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Standardumleitung

Der Text, der in der unteren Hälfte der Bannerseite angezeigt wird. Dieser Text darf aus maximal 12 Zeichen bestehen.


Lizenzvereinbarung akzeptieren

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Einrichtung

Ist dieser Parameter auf "Aus" gesetzt, wird der Lizenzvertrag während der Installation eingeblendet. Bei der Einstellung "Ein" wird der Lizenzvertrag nicht angezeigt. Sie erklären jedoch, daß Sie den Vertrag im Auftrag Ihrer Organisation akzeptieren und für die Einhaltung der Lizenzbedingungen von den Benutzern Ihrer Organisation verantwortlich sind.


Adapter

Eigenschaftsseite: Novell®-Kompatibilitätsmodus

Registerkarte: Karten

Wählen Sie den gewünschten Netzwerkadapter aus.


Adapter (Eigenschaftsseite "Kompatibilitätsmodus")
Adapter

Eigenschaftsseite: Novell® IPX™-Kompatibilitätsadapter

Registerkarte: Parameter

Wählen Sie den Adapter aus, dessen Einstellungen geändert werden sollen. Die Einstellungen, die Sie bei Auswahl der Option "Standardeinstellungen" festlegen, werden auf alle Adapter angewendet, für die das Kontrollkästchen "Standardeinstellungen verwenden" aktiviert ist. Wenn dieses Kontrollkästchen für einen Adapter nicht aktiviert ist, verwendet dieser Adapter die Standardeinstellungen nicht. Etwaige Änderungen werden auf die Adapter angewendet, die noch nicht konfiguriert wurden.


Weitere Suchpfade hinzufügen

Eigenschaftsseite: MIB-Konfiguration der Hostressourcen

Registerkarte: Softwaresuche

Klicken Sie nach der Angabe eines Verzeichnisses auf "Hinzufügen", um es in die Liste weiterer Suchpfade aufzunehmen.


Schaltfläche "Hinzufügen"

Klicken Sie nach der Eingabe des Namens eines neuen Elements auf "Hinzufügen", um das Element der Liste hinzuzufügen.


Rahmentyp hinzufügen

Eigenschaftsseite: IPX™ 32-bit-Protokoll

Registerkarte: Erweiterter IPX

Wählen Sie einen Rahmentyp und klicken Sie dann auf "Hinzufügen", um ihn der Liste der logischen Karten hinzuzufügen, mit denen IPX eine Bindung herstellen soll.


Lokale Modems hinzufügen

Eigenschaftsseite: MIB-Konfiguration der Hostressourcen

Registerkarte: Drucker und Modems

Klicken Sie nach der Auswahl des Modems auf "Hinzufügen", um das Modem in die Liste der lokalen Modems aufzunehmen.


Lokale Drucker hinzufügen

Eigenschaftsseite: MIB-Konfiguration der Hostressourcen

Registerkarte: Drucker und Modems

Geben Sie einen Drucker an und klicken Sie auf "Hinzufügen", um ihn in die Liste der lokalen Drucker aufzunehmen.


Lokale Bandlaufwerke hinzufügen

Eigenschaftsseite: MIB-Konfiguration der Hostressourcen

Registerkarte: Bandlaufwerke

Geben Sie ein Bandlaufwerk an und klicken Sie auf "Hinzufügen", um es in die Liste der lokalen Bandlaufwerke aufzunehmen.


Hinzufügen

Klicken Sie nach der Eingabe des Namens eines neuen Elements auf "Hinzufügen", um das Element der Liste hinzuzufügen.


Baum- und Namenskontextpaar hinzufügen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Client

Klicken Sie auf diese Schaltfläche, um einen neuen Baum und ein Namenskontextpaar hinzuzufügen. Geben Sie dann einen Baumnamen ein und klicken Sie auf "OK".


Zusätzliche Komponenten

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Zusätzliche Komponenten

Erstellt eine Liste der Novell®-Produkte, die mit dem Client installiert werden können. Wählen Sie die Komponenten aus, die während einer unbeaufsichtigten Installation installiert werden sollen, indem Sie die entsprechenden Kontrollkästchen aktivieren.


Zusätzliche Suchpfade

Eigenschaftsseite: MIB-Konfiguration der Hostressourcen

Registerkarte: Softwaresuche

Diese optionale Einstellung bezeichnet Verzeichnisse, die von Host-Ressourcen-MIB (Management Information Base) nach Programmdateien durchsucht werden.

Wenn das Kontrollkästchen neben einem Verzeichnis aktiviert ist, werden auch alle Unterverzeichnisse dieses Verzeichnisses durchsucht.

Neben den Verzeichnissen, die aufgrund der Einstellung "Zu durchsuchende Verzeichnisebenen ab Stamm" durchsucht werden, werden auch die angegebenen Verzeichnisse durchsucht.

Die Programminformationen werden von der Netzwerk-Management-Konsole verwendet. Sie erweisen sich als hilfreich bei der Protokollierung der Software auf den Client-Arbeitsstationen.


Agentenlisten-Verfallszeit

Eigenschaftsseite: Novell® IPX™-Kompatibilitätsadapter

Registerkarte: Parameter

Bereich: 0 bis 65535 (Minuten)

Standardwert: 15

Geben Sie das Mindestintervall an, das ablaufen soll, bevor der Client seine Migrationsagent-Adressierinformationen aktualisiert.

Diese Einstellung wird nur dann verwendet, wenn der Client Migrationsagenten dynamisch findet.

Bei einer Einstellung von 0 aktualisiert der Client nach Auffinden eines Migrationsagenten seine Migrationsagent-Adressierinformationen nicht.

Bei zu hoher Einstellung hat der Client möglicherweise Schwierigkeiten beim Wiederherstellen, wenn ein Migrationsagent entfernt wird.

Bei zu niedriger Einstellung greift der Client möglicherweise zu häufig auf die Netzwerkinformationen zu, wodurch zuviel Verkehr entsteht.


Benutzersicherung ermöglichen

Eigenschaftsseite: TSA-Voreinstellungen

Registerkarte: Standardeinstellungen

Aktivieren Sie das Kontrollkästchen "Benutzersicherung ermöglichen", um dem Sicherungsbenutzer die Sicherungsrechte zu erteilen. Welche Rechte dem Benutzer erteilt werden, hängt von der Gruppe ab, der der Benutzer angehört.


Verbindungsüberwachung zulassen

Eigenschaftsseite: IPX™ 32-bit-Protokoll

Registerkarte: SPX™

Standardwert: Ein

Aktivieren Sie dieses Kontrollkästchen, wenn SPX Anwendungsanfragen für Verbindungen überwachen soll.

Deaktivieren Sie dieses Kontrollkästchen, wenn SPX Anforderungen zur Überprüfung der Verbindungen ignorieren soll.


IPX-Zugriff durch Interrupt 64h gestatten

Eigenschaftsseite: IPX 32-bit-Protokoll

Registerkarte: IPX

Standardwert: Ein

Aktivieren Sie dieses Kontrollkästchen, damit DOS-Anwendungen Interrupt 64h für den Zugriff auf IPX™-Services verwenden können.

Deaktivieren Sie dieses Kontrollkästchen, wenn eine DOS-Anwendung vorhanden ist, die Probleme verursacht, weil IPX Interrupt 64h belegt.

Deaktivieren Sie dieses Kontrollkästchen, damit Anwendungen Interrupt 64h auch für andere Funktionen als den Zugriff auf IPX-Services verwenden können.

Deaktivieren Sie dieses Kontrollkästchen, wenn eine Anwendung unter einer früheren Version von NetWare® ausgeführt wird, mit NetWare 3.1 aber hängenbleibt.

Anwendungen sollten Interrupt 2Fh zum Abruf der FAR-Aufrufadresse (File Address Register) verwenden und diese Adresse für den Zugriff auf IPX-Services einsetzen. Dies ist die empfohlene Vorgehensweise, weil dadurch auf wirksame Weise Konflikte bei der Verwendung von Interrupt 64h vermieden werden.


IPX-Zugriff durch Interrupt 7Ah gestatten

Eigenschaftsseite: IPX 32-bit-Protokoll

Registerkarte: IPX

Standardwert: Ein

Aktivieren Sie dieses Kontrollkästchen, um DOS-Anwendungen die Verwendung von Interrupt 7Ah für den Zugriff auf IPX™-Services zu gestatten.

Deaktivieren Sie dieses Kontrollkästchen, wenn eine DOS-Anwendung vorhanden ist, die Probleme verursacht, weil IPX Interrupt 7Ah belegt.

Deaktivieren Sie dieses Kontrollkästchen, damit Anwendungen Interrupt 7Ah auch für andere Funktionen als den Zugriff auf IPX-Services verwenden können.

Deaktivieren Sie dieses Kontrollkästchen, wenn eine Anwendung unter einer früheren Version von NetWare® ausgeführt wird, mit NetWare 3.1 aber hängenbleibt.

Anwendungen sollten Interrupt 2Fh zum Abruf der FAR-Aufrufadresse (File Address Register) verwenden und diese Adresse für den Zugriff auf IPX-Services einsetzen. Dies ist die empfohlene Vorgehensweise, weil dadurch auf wirksame Weise Konflikte bei der Verwendung von Interrupt 7Ah vermieden werden.


Neustart-Aufforderung nach Beendigung

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Einrichtung

Standardwert: Ein

Ist dieser Parameter auf "Ein" gesetzt, wird zur Beendigung des Installationsvorgangs der letzte Installationsbildschirm eingeblendet. Dieser Bildschirm teilt dem Benutzer mit, daß die Arbeitsstation neu gebootet werden muß, bevor die Installation wirksam wird. Der Benutzer wird gefragt, ob die Arbeitsstation neu gebootet werden soll.

Ist der Parameter auf "Aus" gesetzt, wird die Arbeitsstation nach Abschluß der Installation automatisch neu gestartet.


Aufforderung zur Installation von NetWare/IP

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Einrichtung

Standardwert: Aus

Dieser Parameter wird zusammen mit dem Parameter "NetWare®/IP* installieren" eingesetzt. Die folgenden Situationen sind möglich:

AskNetWareIP=No	InstallNetWareIP=No

Sie werden nicht gefragt, ob Sie NetWare/IP installieren möchten, und NetWare/IP wird nicht installiert.

AskNetWareIP=No	InstallNetWareIP=Yes

NetWare/IP wird ohne Nachfrage automatisch installiert.

AskNetWareIP=Yes

Sie werden gefragt, ob Sie NetWare/IP installieren möchten. Wählen Sie "Ja" oder "Nein". Wenn Sie "AskNetWareIP" auf "Ja" setzen, müssen Sie für den Parameter "InstallNetWareIP" keinen Wert angeben. Sie können jedoch durch entsprechendes Setzen des Parameters "InstallNetWareIP" festlegen, welche der Schaltflächen ("Ja" oder "Nein") in der Anfrage als Standard angezeigt werden soll.

AskNetWareIP=Yes	InstallNetWareIP=Yes

Die Anfrage, ob NetWare/IP installiert werden soll, wird mit der Schaltfläche "Ja" als Standard angezeigt.

AskNetWareIP=Yes	InstallNetWareIP=No

Die Anfrage, ob NetWare/IP installiert werden soll, wird mit der Schaltfläche "Nein" als Standard angezeigt.


Aufforderung zum Entfernen von Microsoft NetWare Client

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Einrichtung

Standardwert: Aus

Wenn dieser Parameter auf "Ein" gesetzt ist, wird der Arbeitsstationsbenutzer gefragt, ob der Microsoft-Client während der Installation gelöscht werden soll. Ist der Parameter auf "Aus" gesetzt, wird der Microsoft*-Client automatisch entfernt.


Aufforderung zur Verwendung von Novell GINA

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Einrichtung

Standardwert: Aus

Wenn dieser Parameter auf "Ein" gesetzt ist, wird der Arbeitsstationsbenutzer gefragt, ob Novell®-GINA anstelle eines bereits installierten Drittanbieter-GINA verwendet werden soll. Setzen Sie diese Einstellung nach Möglichkeit auf "Aus". Ist der Parameter auf "Aus" gesetzt, wird dieses Dialogfeld nicht angezeigt und Novell-GINA installiert.


Novell-GINA empfehlen, wenn Drittanbieter-GINA gefunden wird

Eigenschaftsseite: Novell-Clientkonfiguration

Registerkarte: Client

Standardwert: Aktiviert

Wenn die Arbeitsstation den GINA eines anderen Herstellers als Novell® verwendet und die Einstellung aktiviert ist, wird der Benutzer gefragt, ob Novell-GINA anstelle des Dritthersteller-GINA verwendet werden soll.

Wenn diese Einstellung sowie "Novell-GINA verwenden, wenn Drittanbieter-GINA gefunden wird" nicht aktiviert ist, wird Novell-GINA verwendet, ohne daß der Benutzer danach gefragt wird.


Konfiguration automatisch erkennen

Eigenschaftsseite: NetWare/IP-Konfiguration

Registerkarte: Parameter

Standardwert: Aus

Wählen Sie diesen Parameter aus, wenn DHCP für die Bereitstellung von NetWare®/IP*-Parametern konfiguriert ist.


Automatisches Umleitungsende

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Standardumleitung

Standardwert: Ein

Aktivieren Sie dieses Kontrollkästchen, wenn umgeleitete Daten nach dem Beenden einer Anwendung geschlossen und an den Drucker geschickt werden sollen. Soll dies nicht geschehen, deaktivieren Sie das Kontrollkästchen. (Auf diese Weise können an den Druckauftrag weitere Informationen angefügt werden.)


Automatisch registrieren

Eigenschaftsseite: TSA-Voreinstellungen

Registerkarte: Standardeinstellungen

Aktivieren Sie das Kontrollkästchen "Autom. registrieren", wenn Sie sich beim Start automatisch bei TSAProxy registrieren möchten. Andernfalls können Sie sich registrieren, indem Sie im Bildschirm "Registrierung" auf "Registrieren" klicken.


Bei Neustart automatisch registrieren

Eigenschaftsseite: Ziel-Service-Agent

Registerkarte: TSA-Informationen

Aktivieren Sie das Kontrollkästchen "Beim Neu-Booten automatisch registrieren", wenn Sie sich beim Start automatisch bei TSAProxy registrieren möchten. Andernfalls können Sie sich registrieren, indem Sie im Bildschirm "Registrierung" auf "Registrieren" klicken.


Bindery-Verbindung
Kontrollkästchen "Bindery-Verbindung"

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Anmeldung

Wenn Sie "Beim Server anmelden" auswählen, wird das Kontrollkästchen "Bindery-Verbindung" verfügbar. Aktivieren Sie dieses Kontrollkästchen, wenn Sie sich mit Bindery-Services statt mit eDirectory™ beim Server anmelden möchten.


Bindery-Anmeldung

Wenn Sie auf "Bindery" klicken, melden Sie sich bei der Netzwerkanmeldung bei einem NetWare®-Server an. Das heißt, Sie können auf die Dateien, Anwendungen und andere Services zugreifen, die auf diesem Server verfügbar sind.

Wenn Sie sich für eine Bindery-Verbindung entscheiden, können Sie nicht auf andere eDirectory™-Objekte zugreifen, die auf diesem Server nicht verfügbar sind.


Bitmap-Dateiname

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Standardwert: NWELCOME.BMP

Mit dieser Option können Sie angeben, welches Bitmap im Eingangsbildschirm nach dem Starten von Windows* NT/2000/XP* angezeigt werden soll. Hierzu können Sie ein beliebiges Bitmap aus dem Windows NT/2000/XP-Verzeichnis wählen. Sie können das Feld auch leer lassen, wenn Sie kein Bitmap verwenden möchten.


SAP: Nächste Serverabfragen an Netzwerk senden

Eigenschaftsseite: NetWare/IP-Konfiguration

Registerkarte: Parameter

Standardwert: Aus

Aktivieren Sie dieses Kontrollkästchen, damit der NetWare®/IP*-Client durch Versand der Anfrage auf dem lokalen Netzwerk nach dem nächstgelegenen NetWare-Server sucht. Deaktivieren Sie dieses Kontrollkästchen, damit der Client durch Versand der Anfrage an einen NetWare/IP-Server oder an einen DSS (SAP/RIP-Server) nach dem nächstgelegenen NetWare-Server sucht.

Dies ist eine optionale Einstellung für NetWare/IP.


Titel

Eigenschaftsseite: Novell-Clientkonfiguration

Registerkarte: Erweiterte Anmeldung

Standardwert: Anmeldung beginnen

Beispiel: Hallo, Maria!

Mit dieser Option können Sie den Text festlegen, der beim Aufruf von Windows* NT/2000/XP* als Überschrift des Eingangsbildschirms angezeigt wird.


Aktuelle Verbindungen unterbrechen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Anmeldung

Wenn Sie dieses Kontrollkästchen aktivieren, werden alle bereits hergestellten Serververbindungen unterbrochen, wenn Sie sich anmelden.


Skriptresultate automatisch schließen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Standardanmeldung

Während der Anmeldung informiert Sie ein Meldungsfeld über den Ablauf der Anmeldung und der Anmeldeskripten. Wenn Sie das Kontrollkästchen "Skriptresultate automatisch schließen" aktivieren, wird dieses Feld geschlossen, es sei denn, während der Anmeldung treten Fehler auf.


Komponente

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Protokolleinstellungen

Gibt die Komponente des ausgewählten Protokolls an, das Sie konfigurieren möchten.


Komponente ist optional

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Diese Einstellung ist auf mehreren Registerkarten zu Komponenten zu finden

Standardwert: Von der Komponente abhängig

Wenn die Einstellung "Anfangsbildschirm anzeigen" aktiviert ist, hat der Benutzer die Möglichkeit, die Komponente nicht zu installieren. Hierzu deaktiviert er das Kontrollkästchen "Diese Komponente installieren".


Verbindung

Eigenschaftsseite: TSA-Voreinstellungen

Registerkarte: Standardeinstellungen

Aktivieren Sie das Kontrollkästchen "Verbindung", wenn Sie Verbindungsereignisse protokollieren möchten.


Verbindungsservice

In diesem Dialogfeld können Sie Laufwerke zuordnen oder Drucker umleiten, die Sie in Ihr Standortprofil aufnehmen möchten. Beim Start der Arbeitsstation werden permanente Verbindungen zu diesen Geräten hergestellt.

Das Dialogfeld "Verbindungs-Service" enthält die folgenden Elemente:

Gerät

Hier werden die Geräte aufgeführt, die zugeordnet oder umgeleitet wurden.

Pfad

Hier wird der Pfad zu den einzelnen Geräten angegeben.

Laufwerk zuordnen

Klicken Sie auf "Laufwerk zuordnen", um ein zuzuordnendes Laufwerk auszuwählen.

Anschluß umleiten

Klicken Sie auf "Anschluß umleiten", um einen Drucker auszuwählen.

Verbindung abbrechen

Klicken Sie auf ein Gerät in der Liste und anschließend auf "Trennen", um das Gerät aus der Liste zu entfernen.

Benutzerspezifische permanente Verbindungen entfernen

Aktivieren Sie dieses Kontrollkästchen, wenn nur für die Arbeitsstation, nicht aber für einzelne Arbeitsstationsbenutzer permanente Verbindungen zu Geräten bestehen sollen.


Inhalt
Hilfe zu Eigenschaften

Diese Hilfe enthält Informationen zu den Eigenschaften von Novell® Client™ für Windows* NT/2000/XP*- und Novell Client für Windows 95/98*-Arbeitsstationen.

Die Datei dient als kontextabhängige Hilfe innerhalb der Eigenschaftsseiten. Sie können sie jedoch auch als Eigenschaftsreferenz verwenden, indem Sie auf "Index" klicken und nach den gewünschten Informationen suchen.


Control Community

Eigenschaftsseite: SNMP

Registerkarte: SNMP

Standardwert: Kein

Dieser Parameter bestimmt den Namen für die Steuerungsgemeinschaft.

Die Steuerungsgemeinschaft ist die Lese-/Schreibgemeinschaft (zur Ausführung von SET-Operationen berechtigt).

Gemeinschaftsnamen sind beliebige ASCII-Zeichenketten, Diese können alle Zeichen mit Ausnahme der folgenden enthalten: Leerzeichen, Tabulatoren, öffnende eckige Klammern ( [ ), Gleichheitszeichen ( = ), Doppelpunkte ( : ) , Strichpunkte ( ; ), doppelte Anführungszeichen ( " ) und Nummernzeichen ( # ).

Bei Gemeinschaftsnamen werden Groß- und Kleinbuchstaben berücksichtigt.

Gemeinschaftsnamen mit Lese-/Schreibzugriff können auch für den Zugriff auf schreibgeschützte Dateien verwendet werden.

Bei Deaktivierung der Steuerungsgemeinschaft werden alle Schreibrechte deaktiviert.


Benutzerdefinierte Konfiguration

Eigenschaftsseite: NetWare/IP-Konfiguration

Registerkarte: Parameter

Standardwert: Ein

Wählen Sie diesen Parameter, wenn DHCP nicht für die Bereitstellung von NetWare®/IP*-Parametern konfiguriert ist oder Sie NetWare/IP für diese Arbeitsstation anpassen müssen.


Angepaßter Baum

Geben Sie den Baum an, der von Arbeitsstations-Manager zum Verwalten Ihrer Arbeitsstation verwendet wird.


DOS-Unterstützung langer Namen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Einstellungen

Parametergruppe: Dateisystem

Standardwert: Ein

Dieser Parameter ermöglicht die Anzeige langer Dateinamen im DOS-Fenster.


Tage zum Speichern temporärer Benutzer

Eigenschaftsseite: Novell® Arbeitsstations-Manager

Registerkarte: Arbeitsstations-Manager

Standardwert: 0

Wenn die Option zum Zwischenspeichern temporärer Benutzer aktiviert ist, können Sie festlegen, für wie viele Tage diese Zwischenspeicherung erfolgt. Die Referenzen des temporären Benutzers werden im Cache gespeichert, so daß sie erneut verwendet werden können.


Standard-Richtlinienunterstützung

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Standardwert: Aktiviert

Nachdem sich der Benutzer über die NetWare®-Anmeldung beim Netzwerk angemeldet hat, wird das Verzeichnis \sys\public\winnt nach der Datei ntconfig.pol durchsucht. Nachdem die Datei gefunden wurde, wird die Richtlinie auf den Benutzer und die Arbeitsstation angewandt.


Weitere Suchpfade entfernen

Eigenschaftsseite: MIB-Konfiguration der Hostressourcen

Registerkarte: Softwaresuche

Wählen Sie nach dem Markieren eines Verzeichnisses "Entfernen", um es aus der Liste der weiteren Suchpfade zu löschen.


Beschreibungsfeld

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Einstellungen

Dieses Feld enthält eine kurze Beschreibung des markierten Parameters.


Verzeichnisagentenliste

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Service-Standort

Dies ist eine Liste von SLP-Verzeichnisagent-Adressen. Es sind mehrere Verzeichnisagent-Adressen zulässig. Jede Adresse stellt einen vollständig qualifizierten Domänennamen (DNS) oder eine aus Dezimalzahlen und Punkten bestehende IP-Adresse dar. Verzeichnisagenten können auch über DHCP konfiguriert oder dynamisch registriert werden.

So fügen Sie der Liste einen Verzeichnisagent hinzu:

1.	Geben Sie einen Namen ein.

2.	Klicken Sie auf "Hinzufügen".

So entfernen Sie einen Verzeichnisagent aus der Liste:

1.	Klicken Sie auf einen Namen in der Liste "Verzeichnisagent".

2.	Klicken Sie auf "Löschen".

So ersetzen Sie einen Verzeichnisagent in der Liste durch einen neuen Verzeichnisagent:

1.	Geben Sie den Namen des neuen Verzeichnisagent ein.

2.	Klicken Sie auf den Namen des Elements, das Sie ersetzen möchten.

3.	Klicken Sie auf "Ersetzen".

So verschieben Sie einen Verzeichnisagent in der Liste nach oben:

1.	Klicken Sie auf den Namen des zu verschiebenden Verzeichnisagent.

2.	Klicken Sie so oft auf "Nach oben", bis das Element in der Liste am gewünschten Platz steht.

So verschieben Sie einen Verzeichnisagent in der Liste nach unten:

1.	Klicken Sie auf den Namen des zu verschiebenden Verzeichnisagent.

2.	Klicken Sie so oft auf "Nach unten", bis das Element in der Liste am gewünschten Platz steht.


Vom Stammverzeichnis aus zu durchsuchende Verzeichnisebenen

Eigenschaftsseite: MIB-Konfiguration der Hostressourcen

Registerkarte: Softwaresuche

Bereich: 0 bis 256 (Ebenen)

Standardwert: 1

Diese Option legt die Anzahl der Ebenen fest, in denen die Host-Ressourcen-MIB im eDirectory™-Baum nach Programmdateien sucht.

Hinweise

Null (0) bedeutet, daß keine Suche durchgeführt wird, außer es werden weitere Suchpfade angegeben.

Die erste Ebene ist das Stammverzeichnis, auf der standardmäßig nur Programmdateien gesucht werden.

Alle lokalen Festplatten werden durchsucht. Diskettenlaufwerke, CD-ROM-Laufwerke oder Netzlaufwerke werden nicht durchsucht.

Wenn Sie einen sehr großen lokalen Plattenspeicher besitzen, sollten Sie die Host-Ressourcen-MIB nicht den ganzen Plattenspeicher durchsuchen lassen. Schränken Sie den Suchvorgang so weit wie möglich ein, um die Leistung zu optimieren.

Die Programminformationen werden von der Netzwerk-Management-Konsole verwendet. Sie erweisen sich bei der Protokollierung der Software auf Client-Arbeitsstationen als nützlich.


Verbindungsgruppe anzeigen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Anmeldung

Durch Aktivieren von "Seite der Verbindungen anzeigen" wird die Registerkarte "Verbindung" im Fenster "Anmeldung" sichtbar. Die Registerkarte "Verbindung" ermöglicht die Konfiguration derselben Parameter, die unter "Seite der Verbindungen anzeigen" vom Fenster "Anmeldung" aus verfügbar sind.

Sie können die Option "Seite der Verbindungen anzeigen" auch von der Datei UNATTEND.TXT aus aktivieren.

Der Abschnitt "Seite der Verbindungen anzeigen" der Eigenschaftsseite "Anmeldung" enthält die folgenden Optionen:

Schaltfläche "Beim Baum anmelden"

Schaltfläche "Beim Server anmelden"

Kontrollkästchen "Aktuelle Verbindungen unterbrechen"

Kontrollkästchen "Bindery-Verbindung"


Anfangsbildschirm anzeigen

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Einrichtung

Standardwert: Ein

Verwenden Sie diesen Parameter zur Anpassung des Installationsvorgangs. Bei der Einstellung "Ja" wird am Beginn der Installation der anfängliche ACU- oder Eingangsbildschirm angezeigt. Bei der Einstellung "Nein" beginnt die Installation ohne Anzeige dieses Bildschirms.


Skriptseite anzeigen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Anmeldung

Bei aktivierter Option "Skriptseite anzeigen" wird die Registerkarte "Skript" im Fenster "Anmeldung" sichtbar. Auf der Registerkarte "Skript" können vom Fenster "Anmeldung" aus dieselben Parameter konfiguriert werden, die unter "Skriptseite anzeigen" verfügbar sind.

Der Abschnitt "Skriptseite anzeigen" der Eigenschaftsseite "Anmeldung" enthält die folgenden Optionen:

Feld "Anmeldeskript"

Feld "Profilskript"

Kontrollkästchen "Skriptresultate automatisch schließen"

Kontrollkästchen "Skripten ausführen"


Skriptresultatfenster anzeigen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Standardanmeldung

Aktivieren Sie die Option "Skriptresultatfenster anzeigen", wenn in einem Statusfenster der Fortschritt der Anmeldung angezeigt werden soll.


Variablengruppe anzeigen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Anmeldung

Bei aktivierter Option "Seite der Variablen anzeigen" wird die Registerkarte "Variablen" im Fenster "Anmeldung" sichtbar. Die Registerkarte "Variablen" ermöglicht die Konfiguration derselben Parameter, die unter "Seite der Variablen anzeigen" vom Fenster "Anmeldung" aus verfügbar sind.

Zur Verwendung in den Anmeldeskripten können Sie bis zu vier Variablen definieren.


Nach unten

Wenn Sie ein Element in der Liste um eine Position nach unten verschieben möchten, klicken Sie auf das Element und anschließend auf "Nach unten".


Verfügbare Laufwerke

Eigenschaftsseite: TSA-Voreinstellungen

Registerkarte: Standardeinstellungen

Im Listenfeld "Verfügbare Laufwerke" werden alle verfügbaren lokalen Laufwerke angezeigt.


Beglaubigungs-Traps aktivieren

Eigenschaftsseite: SNMP

Registerkarte: SNMP

Standardwert: Aus

Aktivieren Sie dieses Kontrollkästchen, um die Sicherheit Ihrer Arbeitsstation zu erhöhen. Desktop-SNMP wird dann eine Unterbrechungsmeldung senden, wenn ein Benutzer ohne die entsprechenden Zugriffsrechte versucht, mit SNMP Informationen abzurufen oder zu ändern, die Desktop-SNMP verwaltet.


Banner aktivieren

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Standardumleitung

Standardwert: Aus

Aktivieren Sie dieses Kontrollkästchen, wenn für jeden Druckauftrag eine Bannerseite angezeigt werden soll.


Kontextlose Anmeldung aktivieren
Aktivieren

Eigenschaftsseite: Novell-Clientkonfiguration

Registerkarte: Kontextlose Anmeldung

Standardwert: Deaktiviert (nicht markiert)

Durch Aktivieren dieses Kontrollkästchens wird die kontextlose Anmeldung aktiviert. Mit der kontextlosen Anmeldung ist die Anmeldung beim Netzwerk möglich, ohne daß ein eDirectory™-Kontext angegeben werden muß.


Steuerungsgemeinschaft aktivieren

Eigenschaftsseite: SNMP

Registerkarte: SNMP

Werte: Angegeben | Beliebig | Aus

Standardwert: Kein

Die Steuerungsgemeinschaft ist die Lese-/Schreibgemeinschaft (die Gemeinschaft, die SET-Operationen ausführen darf).

Wählen Sie eine der folgenden Einstellungen aus:

"Angegeben" aktiviert die Steuerungsgemeinschaft mit dem angegebenen Gemeinschaftsnamen. Der Novell SNMP-Agent verwendet nur die angegebene Steuerungsgemeinschaft.

"Beliebig" aktiviert die Steuerungsgemeinschaft und gewährt allen Gemeinschaftsnamen Lese- und Schreibzugriff. Jede Gemeinschaftszeichenkette kann für den Zugriff verwendet werden. Die angegebene Steuerungsgemeinschaft besitzt denselben Zugriff wie die anderen Steuerungsgemeinschaften.

"Aus" deaktiviert die Steuerungsgemeinschaft. Die angegebene Steuerungsgemeinschaft kann nicht auf die Steuerungsgemeinschaft zugreifen. Dies ist ebenfalls keinem anderen Gemeinschaftsnamen möglich. Bei deaktivierter Steuerungsgemeinschaft kann keine Verwaltungseinheit auf Informationen über diese Gemeinschaft zugreifen. Beispielsweise kann der Novell SNMP-Agent von keinem Benutzer zum Ausführen von SET-Operationen für die verwalteten Daten eingesetzt werden.

Hinweis: "Omitted" wird für diesen Parameter nicht mehr unterstützt.


Gateway aktivieren

Eigenschaftsseite: IP-Gateway

Aktivieren Sie dieses Kontrollkästchen, um Novell® IP-Gateway zu verwenden. Wenn dieses Kontrollkästchen aktiviert ist, sind die Felder "Bevorzugter Server" und "Bevorzugter Baum" verfügbar.


Enable Monitor Community

Eigenschaftsseite: SNMP

Registerkarte: SNMP

Werte: Angegeben | Beliebig | Aus

Standardwert: Angegeben

Die Monitorgemeinschaft ist die Nur-Lese-Gemeinschaft (die zur Durchführung von GET- und GET NEXT-Operationen berechtigt ist).

Wählen Sie eine der folgenden Einstellungen aus:

"Angegeben" aktiviert die Monitorgemeinschaft mit dem angegebenen Gemeinschaftsnamen. Der Novell SNMP-Agent verwendet nur die angegebene Monitorgemeinschaft.

"Beliebig" aktiviert die Monitorgemeinschaft und gewährt allen Gemeinschaftsnamen Lesezugriff. Jede Gemeinschaftszeichenkette kann für den Zugriff verwendet werden. Die angegebene Monitorgemeinschaft besitzt denselben Zugriff wie die anderen Monitorgemeinschaften.

Deaktiviert die Monitorgemeinschaft. Bei Deaktivierung der Monitorgemeinschaft werden alle Leserechte deaktiviert. Die angegebene Monitorgemeinschaft kann nicht auf die Monitorgemeinschaft zugreifen. Dies ist ebenfalls keinem anderen Gemeinschaftsnamen möglich. Bei deaktivierter Monitorgemeinschaft kann keine Verwaltungseinheit auf Informationen über diese Gemeinschaft zugreifen. Beispielsweise kann der Novell SNMP-Agent von keinem Benutzer zum Ausführen von GET-Operationen für die verwalteten Daten eingesetzt werden.

Hinweis: "Omitted" wird für diesen Parameter nicht mehr unterstützt.


Ursprungsleitweg über NDIS aktivieren

Eigenschaftsseite: IPX 32-bit-Protokoll

Registerkarte: IPX

Standardwert: Aus

Aktivieren Sie dieses Kontrollkästchen, wenn Sie einen NDIS**-Treiber für einen Token-Ring- oder FDDI-Netzwerkadapter verwenden und die Ursprungsleitwegfunktion verwendet werden soll.

Diese Einstellung ist anwendbar auf alle logischen Karten für Token-Ring- und FDDI NDIS-Treiber.

ODI*-LAN-Treiber unterstützen diese Funktion nicht.


Registerkarten aktivieren

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Standardumleitung

Standardwert: Aus

Aktivieren Sie dieses Kontrollkästchen, wenn die angegebene Anzahl der Leerzeichen anstelle von Tabulatorzeichen gedruckt werden soll. Deaktivieren Sie dieses Kontrollkästchen, wenn keine Leerzeichen anstelle von Tabulatoren gedruckt werden sollen. Für Bytestrom-Druckaufträge müssen keine Tabulatoren aktiviert werden.


Diesen Adapter aktivieren

Eigenschaftsseite: Novell® IPX™-Kompatibilitätsadapter

Registerkarte: Parameter

Standardwert: Aktiviert

Aktivieren Sie dieses Kontrollkästchen, wenn mit dem im Feld "Adapter" angegebenen Adapter die Funktion "IPX-Kompatibilität" über den Adapter aktiviert werden soll.

Wenn eine Konfiguration für mehrere Adapter vorliegt und "IPX-Kompatibilität" über einige, jedoch nicht alle Adapter funktionieren soll, deaktivieren Sie die Adapter, die nicht den Kompatibilitäts-Modus verwenden sollen.


Temporären Benutzer-Cache aktivieren

Eigenschaftsseite: Novell® Arbeitsstations-Manager

Registerkarte: Arbeitsstations-Manager

Die Referenzen temporärer Benutzer können in einem Cache gespeichert werden, so daß sie erneut verwendet werden können. Um diese Option zu aktivieren, markieren Sie das Kontrollkästchen "Temporären Benutzer-Cache aktivieren". Bei aktiviertem Kontrollkästchen ist der Parameter "Tage zum Speichern temporärer Benutzer" verfügbar.


Arbeitsstations-Manager aktivieren

Eigenschaftsseite: Novell® Arbeitsstations-Manager

Registerkarte: Arbeitsstations-Manager

Mit diesem Kontrollkästchen wird der "Arbeitsstation-Manager" aktiviert. Wenn dieses Kontrollkästchen aktiviert ist, werden auch die anderen Optionen auf der Registerkarte "Arbeitsstations-Manager" verfügbar.


Zu protokollierende Ereignisse

Eigenschaftsseite: TSA-Voreinstellungen

Registerkarte: Standardeinstellungen

Geben Sie im Gruppenfeld "Zu protokollieren" die zu protokollierenden Ereignisse an.

Verbindung

Registrierung

Sicherheit

Service


Liste gefilterter Servicetypen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Service-Standort

Sie können bestimmte Service-Typen festlegen, die in einem speziellen gefilterten Bereich in der Bereichsliste für Registrierfilter registriert werden. Die von Ihnen festgelegten Service-Typen gelten ausschließlich für den jeweiligen gefilterten Bereich.

So erstellen Sie einen speziellen Service-Typen für einen gefilterten Bereich:

1.	Heben Sie den speziellen gefilterten Bereich in der Bereichsliste für Registrierfilter hervor.

2.	Geben Sie in der Liste gefilterter Servicetypen den Service-Typ ein, und klicken Sie auf "Hinzufügen".

3.	Wiederholen Sie Schritt 2, um diesem gefilterten Bereich weitere Service-Typen hinzuzufügen.


Erstes Netzlaufwerk

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Client

Standardwert: F

Dieser Parameter setzt bei der Verbindung mit einem NetWare®-Server das erste Netzlaufwerk auf den ausgewählten Laufwerksbuchstaben.

Das erste Netzlaufwerk gilt für alle Anmeldungen von Benutzern beim Netzwerk, die die Arbeitsstation verwenden, auf der es festgelegt ist.


Systemneustart erzwingen, auch wenn andere Anwendungen ausgeführt werden

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Einrichtung

Standardwert: Deaktiviert

Warnung: Das Aktivieren dieser Option kann einen Datenverlust zur Folge haben.

Wenn diese Einstellung aktiviert ist, wird die Arbeitsstation nach der Installation des Client automatisch neu gestartet. Eventuell geöffnete Anwendungen werden ohne Sicherung ungespeicherter Daten geschlossen.

Wenn diese Einstellung deaktiviert ist, wird die Arbeitsstation nicht neu gestartet, es sei denn, der Parameter "Neustart nach Beendigung" ist aktiviert. Wenn "Neustart nach Beendigung" aktiviert und "Systemneustart erzwingen, auch wenn andere Anwendungen ausgeführt werden" deaktiviert ist, können die Benutzer der Arbeitsstationen die Daten speichern und die Anwendungen schließen, bevor die Arbeitsstation heruntergefahren wird.


Formularvorschub

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Standardumleitung

Standardwert: Aus

Aktivieren Sie dieses Kontrollkästchen, wenn der Drucker am Ende des Druckauftrags eine leere Seite einfügen soll.


Rahmentyp

Eigenschaftsseite: IPX 32-bit-Protokoll

Registerkarte: Erweiterter IPX

Standardwert: Ethernet_802.2

Wählen Sie einen Rahmentyp und klicken Sie anschließend auf "Hinzufügen", um ihn in die Liste mit den Rahmentypen, die IPX verwenden soll, aufzunehmen.

Zu den häufig verwendeten Rahmentypen zählen Ethernet_802.2, Ethernet_802.3, Ethernet_II, Ethernet_SNAP, Token-Ring und Token-Ring_SNAP.


Rahmentyp der primären logischen Karte

Eigenschaftsseite: IPX 32-bit-Protokoll

Registerkarte: Erweiterter IPX

Standardwert: Ethernet_802.2

Dieser Parameter legt den Rahmentyp der logischen Karte fest, die IPX™ als primäre Karte verwendet.

Zu den häufig verwendeten Rahmentypen zählen Ethernet_802.2, Ethernet_802.3, Ethernet_II, Ethernet_SNAP, Token-Ring und Token-Ring_SNAP.


Gateway-Listen-Verfallszeit

Eigenschaftsseite: Novell®-Kompatibilitätsmodus

Registerkarte: Karten

Standardwert: 250


Eingriff

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Standardumleitung

Standardwert: Aus

Aktivieren Sie dieses Kontrollkästchen, um Druckaufträge anzuhalten.


Nur IP

Installiert den IP-Protokollstapel, der ermöglicht, daß der Client in Nur-IP-Netzwerken ausgeführt wird. Mit dieser Option kann die Arbeitsstation nicht mit IPX-Servern kommunizieren.


IP und IPX

Diese Option ermöglicht, daß der Client sowohl in IP- als auch in IPX-Netzwerken ausgeführt werden kann. Die Arbeitsstation verwendet dasselbe Protokoll wie der Server, mit dem sie kommuniziert.


IP mit Kompatibilitätsmodus
IP mit IPX-Kompatibilitätsmodus

Installiert IP und bezieht den Kompatibilitätsmodus mit ein. Dieser ermöglicht, daß IPX-Anwendungen in Nur-IP-Netzwerken ausgeführt werden können, wobei IPX-Pakete in IP-Pakete konvertiert werden. Darüber hinaus ermöglicht der IPX-Kompatibilitätsmodus dem Client, mit Services in Nur-IPX-Netzwerken zu kommunizieren, wenn der Migrationsagent auf NetWare 5-Servern installiert ist. Der IPX-Kompatibilitätsmodus ist vom Service Location Protocol (SLP) abhängig.


IPX-Kompatibilitätsbereich

Eigenschaftsseite: Novell IPX-Kompatibilitätsadapter

Registerkarte: Parameter

Standardwert: Kein Bereich angegeben

Wenn Sie im Netzwerk einen SLP-Bereich einrichten möchten, der nur die Kompatibilitätsmodus-Serviceinformationen enthält, geben Sie einen IPX-Kompatibilitätsbereich an.

In den meisten Fällen ist es nicht notwendig, einen IPX™-Kompatibilitätsbereich anzugeben.

Wenn Sie einen Bereich angeben, müssen Sie dies auf allen Knoten tun, die den Kompatibilitätsmodus verwenden.

Wenn Sie keinen Bereich angeben, verwendet die Arbeitsstation die SLP-Bereiche, die Sie auf der Registerkarte "Service-Standort" in der Eigenschaftsseite "Novell® Client™-Konfiguration" konfiguriert haben.


IPX-Diagnose aktiviert

Eigenschaftsseite: IPX 32-bit-Protokoll

Registerkarte: IPX

Standardwert: Ein

Aktivieren Sie dieses Kontrollkästchen, um die IPX™-Diagnosefunktion zu aktivieren.

Deaktivieren Sie dieses Kontrollkästchen nur, wenn der Netzwerkverwalter nicht in der Lage sein soll, IPX™- und SPX™-Statistiken für diese Arbeitsstation abzurufen.


Nur IPX

Diese Option ermöglicht, daß der Client in Nur-IPX-Netzwerken ausgeführt werden kann. IP wird mit dieser Option nicht installiert.

Wenn Ihr Netzwerk eine frühere NetWare-Version als Version 5 ausführt, installieren Sie den Novell-Client mit der Option "Nur IPX".


IPX-Wiederholungsversuche

Eigenschaftsseite: IPX 32-bit-Protokoll

Registerkarte: IPX

Bereich: 0 bis 65535 (Versuche)

Standardwert: 20

Dieser Parameter legt fest, wie oft die Arbeitsstation versuchen soll, einen Leitweg zu einem Ziel zu finden.

Durch Erhöhen dieser Zahl wird auch der Wert für die SPX™-Wiederholungsversuche erhöht.

Erhöhen Sie den Wert für diesen Parameter, wenn bei IPX™- oder SPX™-Anwendungen eine Zeitüberschreitung eintritt.

IPX setzt diesen Parameter im Vergleich zu früheren NetWare®-Clients auf andere Weise ein.


NetWare/IP installieren

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Zusätzliche Komponenten

Aktivieren Sie dieses Kontrollkästchen, wenn Sie NetWare®/IP* während der Installation der Novell® Client™-Software installieren möchten.

Dieser Parameter wird zusammen mit dem Parameter "Aufforderung zur Installation von NetWare/IP" eingesetzt. Weitere mögliche Situationen finden Sie unter Aufforderung zur Installation von NetWare/IP.


Diese Komponente installieren

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Mehrere Registerkarten zu Komponenten

Standardwert: Von der Komponente abhängig

Wenn "Diese Komponente installieren" aktiviert ist, wird die Komponente installiert.


Interne Version: Hauptversion

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Registerkarten zu verschiedenen Komponenten

Bereich: 0 bis 4,294,967,295

Standardwert: 0

Die Versionsnummern "Hauptversion:" und "Nebenversion:" entscheiden darüber, wann der Client aktualisiert wird. Um die Aktualisierung zu erzwingen, müssen Sie eine höhere Versionsnummer angeben als bei der ersten Installation des Client (z. B. 1, wenn die erste Nummer 0 war). ACU vergleicht die Versionsnummern bei der Client-Anmeldung, erkennt den Unterschied und aktualisiert den Client auf die neueren Dateien des Systems.


Interne Version: Nebenversion

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Registerkarten zu verschiedenen Komponenten

Bereich: 0 bis 4,294,967,295

Standardwert: 0

Die Versionsnummern "Hauptversion:" und "Nebenversion:" entscheiden darüber, wann der Client aktualisiert wird. Um die Aktualisierung zu erzwingen, müssen Sie eine höhere Versionsnummer angeben als bei der ersten Installation des Client (z. B. 1, wenn die erste Nummer 0 war). ACU vergleicht die Versionsnummern bei der Client-Anmeldung, erkennt den Unterschied und aktualisiert den Client auf die neueren Dateien des Systems.


Beibehalten

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Standardumleitung

Standardwert: Aus

Aktivieren Sie dieses Kontrollkästchen, um die Druckaufträge in der Druckwarteschlange nach dem Drucken beizubehalten.


Linienzeichen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Einstellungen

Parametergruppe: Verbindung

Gültige Einstellungen: 1 bis 6

Die sechs Zeichen bestimmen den Rahmen der NWPOPUp-Meldung und haben folgende Bedeutung:

1 = Oben links

2 = Oben rechts

3 = Unten links

4 = Unten rechts

5 = Vertikale Linie

6 = Horizontale Linie


Lokale Modems

Eigenschaftsseite: MIB-Konfiguration der Hostressourcen

Registerkarte: Drucker und Modems

Diese Option legt Angaben zu dem auf dieser Arbeitsstation eingesetzten Modem fest. Diese Informationen werden von der Netzwerk-Management-Konsole verwendet.


Lokale Drucker

Eigenschaftsseite: MIB-Konfiguration der Hostressourcen

Registerkarte: Drucker und Modems

Diese Option legt Angaben zu den an diese Arbeitsstation angeschlossenen Druckern fest. Diese Informationen werden von der Netzwerk-Management-Konsole verwendet.


Lokale Bandlaufwerke

Eigenschaftsseite: MIB-Konfiguration der Hostressourcen

Registerkarte: Bandlaufwerke

Diese Option legt Angaben zu den von dieser Arbeitsstation verwendeten Bandlaufwerken fest. Diese Informationen werden von der Netzwerk-Management-Konsole verwendet.


Standortprofile

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Standortprofile

Mit der Option "Standort-Profile" kann ein Netzwerkverwalter Informationen einer Benutzeranmeldung in einem Profil speichern. Wählt der Benutzer dieses Profil bei der Anmeldung aus, stellt das Profil automatisch die Anmeldeinformationen wie den Benutzernamen, den Server, den Kontext, das Anmeldeskript und andere zutreffende Angaben ein, so daß der Benutzer sie nicht manuell eingeben muß.

So fügen Sie ein Standortprofil hinzu:

1.	Klicken Sie mit der rechten Maustaste auf das N-Symbol in der Task-Leiste. Klicken Sie anschließend auf "Novell Client-Eigenschaften > "Standort".

2. 	Geben Sie den Namen des Profils ein, das Sie hinzufügen möchten.

3. 	Klicken Sie auf "Hinzufügen".

So entfernen Sie ein Standortprofil:

1. 	Klicken Sie auf den Namen des Profils, das Sie entfernen möchten.

2. 	Klicken Sie auf "Entfernen".

So lassen Sie die Eigenschaften eines Profils anzeigen:

1.	Klicken Sie auf den Namen des Profils.

2.	Klicken Sie auf "Eigenschaften".


Beim Server anmelden

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Standardanmeldung

Aktivieren Sie "Beim Server anmelden", um sich bei der Netzwerkanmeldung gleichzeitig bei einem NetWare®-Server anzumelden. Das heißt, Sie können auf die Dateien, Anwendungen und andere Services zugreifen, die auf diesem Server verfügbar sind.

Nach der Auswahl der Anmeldung beim Server wird das Kontrollkästchen "Bindery-Verbindung" verfügbar. Wenn Sie sich für eine Bindery-Verbindung entscheiden, können Sie nicht auf andere eDirectory™-Objekte zugreifen, die auf diesem Server nicht verfügbar sind.


Beim Baum anmelden

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Standardanmeldung

Aktivieren Sie "Beim Baum anmelden", um sich bei der Netzwerkanmeldung gleichzeitig bei einem eDirectory™-Baum anzumelden. Damit haben Sie Zugriff auf Drucker, Server und andere Services, die in dem entsprechenden Baum verfügbar sind.


Anmeldeskript

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Anmeldung

Legt den Namen des Anmeldeskripts fest, das Sie zum Anmelden bei NetWare® verwenden möchten.


Max. Übertragungseinheit

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Einstellungen

Parametergruppe: SLP-Allgemein

Bereich: 576 bis 4096 (Byte)

Standardwert: 1400


Meldungs-Audio-Datei

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Einstellungen

Parametergruppe: Grafische Schnittstelle

Standardwert: Leer

Gibt den Namen der Audio-Datei an, die wiedergegeben wird, wenn eine Meldung eingeht. Die Audio-Datei muß das .wav-Format aufweisen. Ist keine Datei angegeben, wird kein Ton wiedergegeben.


Migrationsagenten

Eigenschaftsseite: Novell® IPX™-Kompatibilitätsadapter

Registerkarte: Parameter

Bereich: Maximal 10 Migrationsagenten

Standardwert: Leer

Geben Sie bis zu zehn Migrationsagenten-Server an, die die Konnektivität zwischen IPX- und IP-Knoten bereitstellen.

Zur Angabe der Server können Sie aus Dezimalzahlen und Punkten bestehende Adressen, vollständig qualifizierte DNS-Namen oder Namen verwenden, die in einer lokalen Host-Adresse enthalten sind.

Wenn keine Migrationsagenten konfiguriert werden, versucht der Client, Migrationsagenten dynamisch über das SLP zu ermitteln.


Monitorgemeinschaft

Eigenschaftsseite: SNMP

Registerkarte: SNMP

Standardwert: Public

Dieser Parameter bestimmt den Namen für die Monitorgemeinschaft, welche die Nur-Lese-Gemeinschaft darstellt, die GET- und GET NEXT-Operationen ausführen darf.

Gemeinschaftsnamen sind beliebige ASCII-Zeichenketten. Diese können alle Zeichen mit Ausnahme der folgenden enthalten: Leerzeichen, Tabulatoren, öffnende eckige Klammern ( [ ), Gleichheitszeichen ( = ), Doppelpunkte ( : ) , Strichpunkte ( ; ), doppelte Anführungszeichen ( " ) und Nummernzeichen ( # ).

Bei Gemeinschaftsnamen werden Groß- und Kleinbuchstaben berücksichtigt.

Bei Deaktivierung der Monitorgemeinschaft werden alle Leserechte deaktiviert.


eDirectory-Anmeldung

Wenn Sie auf "eDirectory™" klicken, melden Sie sich bei der Netzwerkanmeldung bei einem eDirectory-Baum an. Damit haben Sie Zugriff auf Drucker, Server und andere Services, die in dem entsprechenden Baum verfügbar sind.


eDirectory oder Bindery
eDirectory- oder Bindery-Anmeldung

Wählen Sie die gewünschte Methode für das Anmelden beim Netzwerk aus.

Wenn Sie auf "eDirectory™" klicken, melden Sie sich bei der Netzwerkanmeldung bei einem eDirectory-Baum an. Die Auswahl dieser Option ermöglicht den Zugriff auf Drucker, Server und andere Services, die in dem entsprechenden Baum verfügbar sind.

Wenn Sie auf "Bindery" klicken, melden Sie sich bei der Netzwerkanmeldung bei einem NetWare®-Server an. Das heißt, Sie können auf die Dateien, Anwendungen und andere Services zugreifen, die auf diesem Server verfügbar sind. Sie können nicht auf andere eDirectory-Objekte zugreifen, die auf diesem Server nicht verfügbar sind.


Namenskontext

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Client

Standardwert: Root

Dieser Parameter stellt den aktuellen Standort bzw. den Kontext in der eDirectory™-Baumstruktur ein. Beispielsweise bezeichnet "ou=mngt.o=marketing" die organisatorische Einheit "Mngt" in der Organisation "Marketing" als Kontext.

Sollten doppelte Benutzernamen vorhanden sein, legen Sie mit diesem Parameter den Kontext für den gewünschten Benutzernamen fest.

Der Namenskontext darf aus bis zu 256 Zeichen plus dem NULL-Befehl, der das Stammverzeichnis des eDirectory-Baums anzeigt, bestehen.


Reihenfolge der Namensauflösung

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Protokolleinstellungen

Standardreihenfolge: NWHOST, eDirectory, SLP, DNS, DHCP

Diese Liste gibt die Reihenfolge an, in der Protokolle für die Namensauflösung verwendet werden.

Wenn beispielsweise sowohl IP* als auch IPX™ (oder CMD) an einen NetWare® 5-Server gebunden ist, löst der Client den Namen dieses Servers über einen der IP-Namen-Services auf, wenn sie sich in der Liste befinden. Anschließend versucht der Client die IPX-Namen-Services, wenn IPX die zweite Wahl im Feld "Protokoll-Ordnung" darstellt, wobei er die Namen-Services verwendet, die IPX-Adressen unterstützen.

Im NT/2000/XP-Client sind diese nicht der Reihenfolge nach aufgeführt, und es gibt keine Standard-Reihenfolge.

Alle konfigurierten Name-Service-Anbieter werden gleichzeitig abgefragt, um den Namen in eine Adresse aufzulösen. Zunächst werden sie mit einer Cache-Flagge abgefragt, die den Name-Service-Anbietern (name service providers, NSP) die Verwaltung eines Cache ermöglicht, um die Auflösung des Namens zu versuchen. Falls der Name durch keinen der NSPs aufgelöst werden kann, wird er nochmals ohne Cache-Flagge abgefragt, so daß alle NSP versuchen können, den Namen aufzulösen. Der Client wartet entweder die 10 Sekunden, die durch das "Zeitüberschreitungsintervall für Namensauflösung" angegeben wurde (unter "Erweiterte Einstellungen" - "Standard"), oder bis von allen abgefragten NSPs "NOT_FOUND" bzw. "NO_MORE" zurückgegeben wird.


Nächstgelegene NetWare/IP-Server

Eigenschaftsseite: NetWare/IP-Konfiguration

Registerkarte: Server

Standardwert: Kein

Beispiele:

MeieDirectorys	Hostname

meieDirectorys.atlantik.com	vollständiger Hostname

222.33.44.55	IP-Adresse für "meieDirectorys"

222.33.0.0	IP-Adreßmaske für "meieDirectorys"

Diese Einstellung wird zur Suche nach den nächstgelegenen NetWare®/IP*-Servern verwendet. Es können bis zu fünf NetWare®/IP*-Server angegeben werden. Sollten die angegebenen Server nicht verfügbar sein, stellt der DSS andere Server bereit.

Geben Sie die Namen der NetWare/IP-Server als DNS-Hostnamen, vollständige Hostnamen, IP-Adressen oder IP-Adreßmasken ein.


NetWare-Speicherung eines zentral gespeicherten Profils

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Um ein zentral gespeichertes Profil zu ermöglichen, aktivieren Sie dieses Kontrollkästchen.


NetWare/IP 1.1-Kompatibilität

Eigenschaftsseite: NetWare/IP-Konfiguration

Registerkarte: Parameter

Standardwert: Aus

Aktivieren Sie dieses Kontrollkästchen, wenn NetWare®/IP* 1.1 auf Ihren Servern ohne das Fehlerkorrekturpaket ausgeführt wird. Mit diesem Parameter wird die erste Version der NetWare/IP und DSS-Server unterstützt. Wenn NetWare/IP 1.1 auf Ihren Servern noch ohne Patch ausgeführt wird, sollten Sie auf den Patch aktualisieren oder auf Version 2.2 aufrüsten. In der Zwischenzeit ermöglicht das Aktivieren dieses Kontrollkästchens die Kommunikation des (NetWare/IP 2.2-kompatiblen) Client mit den NetWare/IP-Servern.


NetWare/IP-Domänenname

Eigenschaftsseite: NetWare/IP-Konfiguration

Registerkarte: Parameter

Standardwert: Kein

Beispiel: NWIP.ATLANTIC.COM

Diese erforderliche Einstellung für NetWare®/IP* gibt die NetWare/IP-Domäne an, die für Ihr Gebiet konfiguriert ist.


Netzwerknummer (Hex)

Eigenschaftsseite: Novell® IPX™-Kompatibilitätsadapter

Registerkarte: Parameter

Standardwert: FFFFFFFD

Gibt die Netzwerknummer des virtuellen IPX-Segments (CMD-Netzwerknummer) an, die vom IPX-Kompatibilitätstreiber über den gewählten Adapter erstellt wurde.

IP-Knoten, die verschiedene CMD-Netzwerknummern verwenden, müssen über Migrationsagenten kommunizieren, die dieselbe CMD-Netzwerknummer unterstützen, wenn sie IPX Client-/Serveranwendungen ausführen.


Netzwerkprotokolle

Novell® Client™ für Windows* unterstützt das Internet-Protokoll (IP), das ursprünglich auf einem NetWare® 5*-Server ausgeführt wird. Wenn Sie den Client mit einer anderen NetWare-Version als NetWare 5 verwenden, können Sie für die IP-Konnektivität NetWare/IP verwenden. Novell Client unterstützt auch die IPX™-/SPX™-Protokollfamilie. Der Client kann parallel mit anderen Protokollstapeln existieren, z. B. mit NetBEUI-Protokollen.

Novell Client kann mit einer der folgenden Protokolloptionen installiert werden:

Nur IP

IP mit IPX-Kompatibilität

IP und IPX (Standard)

IPX

Ermöglicht, daß der Client in Nur-IPX-Netzwerken ausgeführt werden kann. IP wird mit dieser Option nicht installiert.

Hinweis: Wenn Ihr Netzwerk lediglich eine frühere NetWare-Version als NetWare 5 ausführt, installieren Sie den Novell-Client mit der IPX-Option.


Benachrichtigen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Standardumleitung

Standardwert: Ein

Aktivieren Sie dieses Kontrollkästchen, wenn bei beendetem Druckauftrag eine Meldung ausgegeben werden soll.


Anzahl Kopien

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Standardumleitung

Bereich: 1 bis 255

Standardwert: 1

Die zu druckende Anzahl Kopien.


Anzahl Sekunden zwischen Wiederholungen

Eigenschaftsseite: NetWare®/IP*-Konfiguration

Registerkarte: Parameter

Bereich: 5 bis 99 (Sekunden)

Standardwert: 10

Gibt die Anzahl der Sekunden an, die abgewartet wird, bevor ein neuer Versuch zur Beantwortung einer unbeantworteten DSS-Anforderung unternommen wird.


Anzahl Leerstellen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Standardumleitung

Bereich: 1 bis 18

Standardwert: Deaktiviert (8)

Die Anzahl der Leerzeichen, die anstelle von Tabulatoren gedruckt werden. Das Kontrollkästchen "Tabulatoren aktivieren" muß aktiviert sein, damit diese Einstellung wirksam wird.


Parametergruppen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Einstellungen

Sie können die erweiterten Parameter nach Parametergruppen auflisten lassen. In Parametergruppen werden Parameter nach ihrer Funktion sortiert. Dies erleichtert die Suche nach bestimmten Parametertypen.


Parameterliste

Eigenschaftsseite: Novell-Clientkonfiguration

Registerkarte: Erweiterte Einstellungen

Hier werden die verfügbaren erweiterten Parameter für den Novell® Client™ aufgeführt.

Um nähere Informationen zu einem bestimmten Parameter zu erhalten, wählen Sie den entsprechenden Parameter aus und lesen Sie die Beschreibung im Beschreibungsfeld.


Paßwort (TSA)
Paßwort

Eigenschaftsseite: Ziel-Service-Agent

Registerkarte: TSA-Informationen

Geben Sie das Paßwort ein, das der TSA-Benutzer eingeben muß.


Pfad

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Wenn Sie diese Option wählen, wird das Bearbeitungsfeld "Pfad" verfügbar. In diesem Bearbeitungsfeld legen Sie den Speicherort für das Profil fest.


Richtlinienpfad und -dateiname

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Um den Pfad und den Dateinamen für Ihre Richtlinie anzugeben, geben Sie den Pfad zu Ihrer Richtliniendatei im Textfeld "Pfad und Dateiname der Richtlinie" ein. Die Pfadangabe muß den UNC-Namenskonventionen entsprechen.

UNC-Pfadnamen werden nicht nach der normalen MS-DOS*-Konvention für Pfadnamen (Laufwerk:\Verzeichnis) gebildet. Sie verwenden statt dessen folgendes Format:

\\Server\Volume\Ver1\Ver2\Dateiname.Erw


Anschlußnummer

Eigenschaftsseite: NetWare/IP-Konfiguration

Registerkarte: Parameter

Standardwert: ABCD

Wenn die Option "Angepaßten NWIP-Anschluß verwenden" aktiviert ist, geben Sie den für NetWare®/IP* zu verwendenden Anschluß in diesem Feld an.


Pre-allocate VGNMA Memory

Eigenschaftsseite: IPX™ 32-bit-Protokoll

Registerkarte: IPX

Standardwert: Aus

Aktivieren Sie dieses Kontrollkästchen, um konventionellen Speicher für VGNMA-Operationen zuzuordnen. Ordnen Sie vorab VGNMA-Speicher für GNMA-Responder-Anwendungen mit 16 Bit zu, falls diese ansonsten nicht ordnungsgemäß ausgeführt werden können.


Bevorzugte Domänen-SAP/RIP-Server

Eigenschaftsseite: NetWare®/IP*-Konfiguration

Registerkarte: Server

Standardwert: Kein

Beispiele:

dss	 Hostname

dss.atlantic.com	 vollständiger Hostname

2.33.44.55	 IP-Adresse für "meieDirectorys"

2.33.0.0	 IP-Adreßmaske für "meieDirectorys"

Gibt die Domänen-SAP/RIP-Server an, die Sie als bevorzugte Domänen-SAP/RIP-Server verwenden möchten.

Diese Adressen und Namen werden zum Suchen der bevorzugten Domänen-SAP/RIP-Server verwendet. Sollte keiner der angegebenen Domänen-SAP/RIP-Server verfügbar sein, wird von DNS die Liste der Domänen-SAP/RIP-Server abgefragt.

Es dürfen maximal fünf Domänen-SAP/RIP-Server als bevorzugte Server angegeben werden.

Geben Sie die Namen der Domänen-SAP/RIP-Server als Hostnamen, vollständige Hostnamen, IP-Adressen oder IP-Adreßmasken ein.


Bevorzugter IP/IP-Gateway-Server

Eigenschaftsseite: IP-Gateway

Registerkarte: Novell IP Gateway

Geben Sie den Server an, auf dem das zu verwendende Novell® IP-Gateway ausgeführt wird.


Bevorzugter IPX/IP-Gateway-Server

Eigenschaftsseite: IP-Gateway

Registerkarte: Novell IP Gateway

Geben Sie den Server an, auf dem das zu verwendende Novell® IP-Gateway ausgeführt wird.


Bevorzugtes Netzwerkprotokoll

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Protokolleinstellungen

Parametergruppe: Namensauflösung

Werte: Keines, IP, IPX

Standardwert: Kein

Der Client wartet bis zu einem Viertel des Zeitüberschreitungswertes bei Namensauflösungen, um den angegebenen Namen zu einer Adresse des bevorzugten Netzwerktyps aufzulösen. Eine Einstellung dieses Werts auf 0 ermöglicht dem Client, eine Verbindung zur ersten Adresse herzustellen, die von einem der konfigurierten Name-Space-Anbieter zurückgegeben wurde.


Bevorzugter Server

Eigenschaftsseite: Novell-Clientkonfiguration

Registerkarte: Client

Dieser Parameter legt fest, bei welchem Server eDirectory™ die Benutzerbeglaubigung vornehmen soll, wenn die Novell® Client™-Software gestartet wird. Mit dieser Einstellung versucht der Client, eine Verbindung zum angegebenen Server herzustellen.

Die Parameter "Bevorzugter Server" und "Bevorzugter Baum" arbeiten zusammen. Wenn der Parameter "Bevorzugter Server" eingestellt ist, versucht eDirectory, die Benutzerbeglaubigung bei diesem Server vorzunehmen. Wenn der Parameter "Bevorzugter Baum" eingestellt ist, sendet eDirectory eine "Nächstgelegenen Server ermitteln"-Anforderung und versucht, den Benutzer bei dem Server zu beglaubigen, der die Anfrage beantwortet, unabhängig davon, ob "Bevorzugter Server" eingestellt ist.

Der bevorzugte Server gilt für alle Benutzer, die sich von der Arbeitsstation beim Netzwerk anmelden.


Bevorzugter Server (IP-Gateway)
Bevorzugter Server

Eigenschaftsseite: IP-Gateway

Geben Sie den Server an, auf dem das zu verwendende Novell® IP-Gateway ausgeführt wird.

Diese Option ist nur verfügbar, wenn "Gateway aktivieren" markiert ist.


Bevorzugter Server (TSA)

Eigenschaftsseite: TSA-Voreinstellungen

Registerkarte: Standardeinstellungen

Geben Sie im Feld "Bevorzugter Server" den Namen des Servers an, bei dem sich TSA registrieren soll.


Bevorzugter Baum

Eigenschaftsseite: Novell-Clientkonfiguration

Registerkarte: Client

Der Parameter "Preferred Tree" gibt an, mit welchem Directory-Baum die Client-Arbeitsstation beim Starten der Novell® Client™-Software als erstes verbunden werden soll. Aufgrund dieser Einstellung versucht die Client-Software, eine Verbindung zu einem Server innerhalb des angegebenen Baums herzustellen.

Falls ein bevorzugter Baum eingestellt ist, versucht der Client, eine Verbindung mit einem Server innerhalb des angegebenen Baums herzustellen. Falls kein Baum angegeben wurde, versucht der Client, eine Verbindung mit dem konfigurierten bevorzugten Server herzustellen. Wurden weder ein Baum noch ein Server angegeben, stellt der Client eine Verbindung zu einem beliebigen Server her, der auf seine "Nächstgelegenen Server ermitteln"-Anforderung antwortet.

Der bevorzugte Baum gilt für alle Netzwerkanmeldungen, die Benutzer von dieser Arbeitsstation vornehmen. Ein Benutzer kann bei der Netzwerkanmeldung einen anderen Baum für die aktuelle Anmeldesitzung festlegen.


Bevorzugter Baum (IP-Gateway)
Bevorzugter Baum

Eigenschaftsseite: IP-Gateway

Geben Sie den Baum mit dem Server an, auf dem das zu verwendende Novell® IP-Gateway ausgeführt wird.

Diese Option ist nur verfügbar, wenn "Gateway aktivieren" markiert ist.


Primäre logische Karte

Eigenschaftsseite: IPX 32-bit-Protokoll

Registerkarte: Erweiterter IPX

Standardwert: Deaktiviert. IPX™ stellt die primäre Karte automatisch fest.

Aktivieren Sie dieses Kontrollkästchen, um festzulegen, welche logische Karte IPX als primäre Karte verwenden soll. Die logische Karte wird durch Angabe eines Rahmentyps festgelegt.

Standardmäßig erkennt IPX automatisch die primäre Karte. IPX verwendet einen Algorithmus, um automatisch eine primäre Karte zu suchen und auszuwählen, falls diese Option nicht aktiviert ist. Aktivieren Sie diese Option, wenn IPX die richtige primäre Karte nicht findet.


Profilskript

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Anmeldung

Legen Sie ein alternatives eDirectory™-Profilskript für die Anmeldung fest. Dieses Profilskript wird anstelle Ihres normalen eDirectory-Profilskripts ausgeführt.


Eigenschaften

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarten: Standort-Profile, Services

Klicken Sie auf "Eigenschaften", um die Eigenschaften des ausgewählten Profils oder der ausgewählten Service-Instanz anzeigen zu lassen.


Protokoll

Eigenschaftsseite: TSA-Voreinstellungen

Registerkarte: TSA-Informationen

TSA unterstützt mehrere Protokolle. Zur Zeit stehen zwei Protokolloptionen zur Verfügung: SPX™/IPX™ und TCP/IP. Es werden nur die Protokolle angezeigt, deren Protokollstapel auf der Arbeitsstation installiert sind. Sie können in der Drop-down-Liste "Protokoll" eine beliebige Option auswählen.


Protokoll (Eigenschaftsseite "Client")
Protokoll

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Client

Dieser Parameter gibt die Netzwerkprotokolle an, die der Client für die Kommunikation verwendet.


Protokoll (Eigenschaftsseite "Protokolleinstellungen")
Protokoll

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Protokolleinstellungen

Klicken Sie auf das Protokoll, das Sie konfigurieren möchten.


Protokollkomponenteneinstellung

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Protokolleinstellungen

Verwenden Sie diese Liste zur Auswahl der Elemente, die von der gewählten Protokollkomponente verwendet werden sollen.


Protokoll-Ordnung

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Protokolleinstellungen

Standardreihenfolge: IP, IPX

Verwenden Sie die Liste "Protokoll-Ordnung:" zur Angabe der Reihenfolge von Protokollen, die Novell®-Client™ beim Versuch verwendet, eine Verbindung zum Server herzustellen. Wenn die Liste beispielsweise IPX™ und IP in dieser Reihenfolge enthält, versucht der Client zuerst, eine Verbindung zu IPX herzustellen. Wenn keine IPX-Verbindung hergestellt werden kann, wiederholt der Client den Vorgang unter Verwendung von IP.


Neustart nach Beendigung

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Einrichtung

Standardwert: Aktiviert

Wenn diese Einstellung aktiviert ist, wird die Arbeitsstation nach der Installation der Novell®-Client™-Software automatisch neu gestartet. Wenn gerade Anwendungen ausgeführt werden, haben Sie die Möglichkeit, geöffnete Dateien zu speichern, bevor die Arbeitsstation heruntergefahren wird.

Wenn diese Einstellung aktiviert und "Systemneustart erzwingen, auch wenn andere Anwendungen ausgeführt werden" ebenfalls aktiviert ist, wird die Arbeitsstation heruntergefahren und neu gestartet, ohne daß Sie die Möglichkeit bekommen, geöffnete Dateien zu speichern.

Wenn diese Einstellung deaktiviert ist, wird die Arbeitsstation nach der Installation des Client nicht neu gestartet. Der neue Client und die neuen Einstellungen werden erst dann wirksam, wenn die Arbeitsstation neu gestartet wird.


Registrierung

Eigenschaftsseite: TSA-Voreinstellungen

Registerkarte: Standardeinstellungen

Aktivieren Sie das Kontrollkästchen "Registrierung", wenn Sie Registrierungsereignisse protokollieren möchten.


Bereichsliste für Registrierfilter

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Service-Standort

Dies ist eine Liste mit Namen von Registrierfilterbereichen, die den SLP-Anwendungen auf dieser Arbeitsstation gemeldet werden. Mehrere Bereichsnamen sind zulässig. Diese Liste wird bei der Service-Registrierung zusätzlich zu der bereits erstellten allgemeinen Bereichsliste verwendet.

Registrierfilter strikt anwenden

Aktivieren Sie das Kontrollkästchen "Registrierfilter strikt anwenden", um den Registrierfilterbereich auf diese spezielle Bereichsliste zu begrenzen.

Liste gefilterter Servicetypen

Um spezielle Service-Typen aufzulisten, die in einem bestimmten Bereich der Bereichsliste für Registrierfilter registriert werden, heben Sie diesen Bereich hervor, geben die Service-Typen in die Liste gefilterter Servicetypen ein und klicken anschließend auf "Hinzufügen".


Entfernen

Zum Löschen eines Elements aus der Liste klicken Sie auf das Element und anschließend auf "Entfernen".


Schaltfläche "Entfernen"

Eigenschaftsseite: NetWare®/IP*-Konfiguration

Registerkarte: Server

Entfernt einen Server aus der Liste "Nächstliegende NetWare/IP-Server" bzw. aus der Liste "Bevorzugte SAP/RIP-Server".


Rahmentyp entfernen

Eigenschaftsseite: IPX™ 32-bit-Protokoll

Registerkarte: Erweiterter IPX

Wählen Sie "Entfernen", nachdem Sie in der Liste der Rahmentypen den zu entfernenden Rahmentyp hervorgehoben haben.


IPX entfernen

Aktivieren Sie dieses Kontrollkästchen bei der Installation des Nur-IP-Client, wenn Sie IPX-Stapel entfernen möchten, die zuvor auf der Arbeitsstation installiert waren.

Warnung: Wenn Sie IPX entfernen, kann die Arbeitsstation nicht mit IPX-Servern und -Anwendungen kommunizieren.


Lokale Modems entfernen

Eigenschaftsseite: MIB-Konfiguration der Hostressourcen

Registerkarte: Drucker und Modems

Wählen Sie "Entfernen", nachdem Sie in der Liste der Modems das zu entfernende Modem hervorgehoben haben.


Lokale Drucker entfernen

Eigenschaftsseite: MIB-Konfiguration der Hostressourcen

Registerkarte: Drucker und Modems

Wählen Sie nach der Auswahl eines Druckers "Entfernen", um den Drucker aus der Liste zu löschen.


Lokale Bandlaufwerke entfernen

Eigenschaftsseite: MIB-Konfiguration der Hostressourcen

Registerkarte: Bandlaufwerke

Nachdem Sie ein Bandlaufwerk ausgewählt haben, das aus der Liste entfernt werden soll, klicken Sie auf "Entfernen".


Microsoft-NetWare-Client entfernen

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Client

Standardwert: Ein

Wenn dieser Parameter auf "Ein" eingestellt ist und das Dialogfeld zum Löschen des Client nicht angezeigt wird, wird der Microsoft*-NetWare®-Client automatisch entfernt. Wird das Dialogfeld eingeblendet, dann ist die Schaltfläche "Ja" die Standardschaltfläche.


Baum und Namenskontextpaar entfernen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Client

Nachdem Sie einen Baum und ein Namenskontextpaar ausgewählt haben, die aus der Liste gelöscht werden sollen, klicken Sie auf "Entfernen".


Ersetzen

Wenn Sie ein vorhandenes Element in der Liste durch ein neues Element ersetzen möchten, geben Sie den Namen des neuen Elements ein, wählen ein vorhandenes Element aus und klicken auf "Ersetzen".


Zusätzliche Suchpfade ersetzen

Eigenschaftsseite: MIB-Konfiguration der Hostressourcen

Registerkarte: Softwaresuche

Nachdem Sie das zu ersetzende Verzeichnis angegeben und ein Ersatzverzeichnis aus der Liste "Weitere Suchpfade" ausgewählt haben, klicken Sie auf "Ersetzen".


Schaltfläche "Ersetzen"

Eigenschaftsseite: NetWare®/IP*-Konfiguration

Registerkarte: Server

Ersetzt einen Server in der Liste "Nächstliegende NetWare/IP-Server" bzw. in der Liste "Bevorzugte SAP/RIP-Server".


Lokale Modems ersetzen

Eigenschaftsseite: MIB-Konfiguration der Hostressourcen

Registerkarte: Drucker und Modems

Geben Sie das zu ersetzende Modem an, wählen Sie ein Ersatzmodem aus der Liste "Lokale Modems" aus und klicken Sie dann auf "Ersetzen".


Lokale Drucker ersetzen

Eigenschaftsseite: MIB-Konfiguration der Hostressourcen

Registerkarte: Drucker und Modems

Geben Sie den zu ersetzenden Drucker an, wählen Sie einen Ersatzdrucker aus der Liste "Lokale Drucker" aus und klicken Sie dann auf "Ersetzen".


Lokale Bandlaufwerke ersetzen

Eigenschaftsseite: MIB-Konfiguration der Hostressourcen

Registerkarte: Bandlaufwerke

Geben Sie das zu ersetzende Bandlaufwerk an, wählen Sie ein Ersatzbandlaufwerk aus der Liste "Lokale Bandlaufwerke" aus und klicken Sie auf "Ersetzen".


Baum und Namenskontextpaar ersetzen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Client

Wählen Sie den zu ersetzenden Baum und das Namenskontextpaar aus, klicken Sie auf "Ersetzen" und geben Sie dann die Informationen zum neuen Baum und zum neuen Namenskontext in die entsprechenden Felder ein.


Für TSA verfügbare Ressourcen

Eigenschaftsseite: Ziel-Service-Agent

Registerkarte: TSA-Informationen

Listet die Ressourcen auf, die von TSA gesichert werden können.


Neuversuche mit DSS während des Startvorgangs

Eigenschaftsseite: NetWare®/IP*-Konfiguration

Registerkarte: Parameter

Bereich: 0 bis 10 (Wiederholungsversuche)

Standardwert: 1

Legt fest, wie oft eine nicht beantwortete DSS-Anforderung wiederholt werden soll.


Skripten ausführen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Anmeldung

Ist dieses Kontrollkästchen nicht aktiviert, werden die Anmeldeskripten bei der Anmeldung nicht ausgeführt.


SPX Abort Timeout

Eigenschaftsseite: IPX™ 32-bit-Protokoll

Registerkarte: SPX

Bereich: 1 bis 65535 (Impulse)

Standardwert: 540

Dieser Parameter legt fest, wie lange (in Impulsen) das SPX™-Protokoll auf eine Antwort von der Gegenstelle warten soll, bevor die Sitzung abgebrochen wird.

Ändern Sie diesen Parameter nur, wenn die Zeitüberschreitung für SPX zu früh abläuft.


SPX-Verbindungen

Eigenschaftsseite: IPX™ 32-bit-Protokoll

Registerkarte: SPX

Bereich: 1 bis 255

Standardwert: 15

Diese Einstellung dient zur Kompatibilität mit Anwendungen, die diese Informationen abrufen und auf dieser Grundlage Entscheidungen treffen.

SPX™ verwendet diese Einstellung nicht, um die Anzahl der SPX-Verbindungen zu beschränken. Die Anzahl der SPX-Verbindungen wird nur durch den verfügbaren Speicher beschränkt.


SPX Listen Timeout

Eigenschaftsseite: IPX™ 32-bit-Protokoll

Registerkarte: SPX

Bereich: 1 bis 65535 (Impulse)

Standardwert: 108

Dieser Parameter bestimmt, wie lange (in Impulsen) das SPX™-Protokoll auf ein Paket von der Gegenstelle wartet, bevor die Gegenstelle zum Senden eines Pakets aufgefordert wird. Damit soll bestätigt werden, daß die Verbindung noch aktiv ist.

Ändern Sie diesen Parameter nur, wenn die Zeitüberschreitung für SPX zu früh abläuft.


SPX Verify Timeout

Eigenschaftsseite: IPX™ 32-bit-Protokoll

Registerkarte: SPX

Bereich: 1 bis 65535 (Impulse)

Standardwert: 54

Gibt an, wie oft (in Impulsen) das SPX™-Protokoll ein Paket an die Gegenstelle sendet, um anzuzeigen, daß die Verbindung noch existiert.

Sollten durch die Software, die die Sitzung eingerichtet hat, keine Pakete über die SPX-Verbindung ausgetauscht werden, sendet SPX in regelmäßigen Abständen Pakete, um zu überprüfen, ob die Verbindung noch existiert.

Ändern Sie diesen Parameter nur, wenn die Zeitüberschreitung für SPX zu früh abläuft.


Einstellungen beim Beenden der Anmeldung speichern

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Anmeldung

Wenn Sie dieses Kontrollkästchen aktivieren, werden die eingegebenen oder geänderten Einstellungen beim Schließen der Konfigurationsseite "NetWare®-Anmeldung" automatisch gespeichert. Wenn Sie dieses Kontrollkästchen nicht aktivieren, werden Ihre Einstellungen nicht gespeichert.


Bereichsliste

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Service-Standort

Dies ist eine Liste mit Bereichsnamen, die den SLP-Anwendungen auf dieser Arbeitsstation gemeldet werden. Mehrfache Bereichsnamen sind zulässig. Die Reihenfolge der Liste entspricht der bevorzugten Reihenfolge. Bereiche können auch über DHCP konfiguriert oder von Verzeichnisagenten dynamisch registriert werden.

Ein Bereich ist vergleichbar mit einer Reihe von Services innerhalb einer logischen Gruppe. Sie können einen Bereich beispielsweise zur Erstellung einer Gruppe von Verzeichnisagenten und -Services verwenden, die mit diesen Verzeichnisagenten in einer großen Organisation registriert sind.

So fügen Sie der Liste einen Bereich hinzu:

1.	Geben Sie einen Namen ein.

2.	Klicken Sie auf "Hinzufügen".

So entfernen Sie einen Bereich aus der Liste:

1.	Klicken Sie auf einen Namen in der Liste.

2.	Klicken Sie auf "Löschen".

So ersetzen Sie einen Bereich in der Liste durch einen neuen Bereich:

1.	Geben Sie den Namen des neuen Bereichs ein.

2.	Klicken Sie auf den Namen des Elements, das Sie ersetzen möchten.

3.	Klicken Sie auf "Ersetzen".

So verschieben Sie einen Bereich in der Liste nach oben oder unten:

1.	Klicken Sie auf den Namen des Bereichs, den Sie verschieben möchten.

2.	Klicken Sie auf "Nach oben" und "Nach unten", bis das Element am gewünschten Platz steht.


Zeitüberschreitungsintervall für Suche (Sek.)

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Kontextlose Anmeldung

Bereich: 0 bis 999 (Sekunden)

Standardwert: 2

Legen Sie die maximale Zeitspanne (in Sekunden) fest, während deren die Novell-Anmeldung in eDirectory™ nach einem bestimmten Benutzer suchen soll. Wenn Sie diesen Wert zu niedrig einstellen, wird die Suche möglicherweise abgebrochen, bevor der Benutzer gefunden wird. Wenn Sie ihn zu hoch einstellen, dauert die Suche nach einem ungültigen oder nicht verfügbaren Benutzer möglicherweise zu lange.

Zu Beginn empfiehlt es sich, diesen Wert niedrig einzustellen. Wenn Sie dann beim Suchen Erfahrung mit der Zeitüberschreitung gesammelt haben, erhöhen Sie die Zahl in kleinen Schritten, bis die Suche durchweg erfolgreich ist.


Sekunden bis Zeitüberschreitung

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Standardumleitung

Bereich: 0 bis 1000 (Sekunden)

Standardwert: 0

Dieser Parameter bestimmt, wie viele Sekunden das Betriebssystem nach Empfang der letzten Daten wartet, bevor der Druckauftrag beendet wird.


Sicherheit

Eigenschaftsseite: TSA-Voreinstellungen

Registerkarte: Standardeinstellungen

Aktivieren Sie das Kontrollkästchen "Sicherheit", wenn Sie Sicherheitsereignisse protokollieren möchten.


Server

Eigenschaftsseite: IP-Gateway

Der Name des Servers, auf dem das IP-Gateway eingesetzt wird.


Servername

Eigenschaftsseite: Ziel-Service-Agent

Registerkarte: TSA-Informationen

Geben Sie im Feld "Servername" den Namen des Servers an, bei dem sich TSA registrieren soll.


Serverauflösungszeit

Eigenschaftsseite: Novell® IPX™-Kompatibilitätsadapter

Registerkarte: Parameter

Bereich: 0 bis 5000 (Millisekunden)

Standardwert: 250

Legt die maximale Zeitspanne fest, während deren festgestellt wird, ob ein unter einer IPX-Adresse bekannter Server tatsächlich ein IP-Server ist, bevor eine NetWare-Verbindung hergestellt wird. Wenn innerhalb der festgelegten Zeitspanne ein IP-Server gefunden wird, der die IPX-Adresse unterstützt, verbindet sich der Client mit dem Server über eine TCP/IP-Verbindung. Wenn die festgelegte Zeitspanne vor Auffinden eines IP-Servers, der die IPX-Adresse unterstützt, abläuft, verbindet sich der Client mit dem Server über eine IPX-Tunnelverbindung.

Hinweis: Diese Einstellung wird verwendet, wenn IPX-Anwendungen NetWare-Verbindungen erfordern oder der Benutzer eine Verbindung zu einem IPX-Server herstellen möchte.


Service

Eigenschaftsseite: TSA-Voreinstellungen

Registerkarte: Standardeinstellungen

Aktivieren Sie das Kontrollkästchen "Service ", wenn Sie Service-Ereignisse protokollieren möchten.


Services (Standort-Profil)
Service

Eigenschaftsseite: Eigenschaften von Standort-Profil

Registerkarte: Services

Die Auswahlmöglichkeiten in diesem Feld sind "Verbindungs-Service" und "Anmelde-Service".

Wenn Sie "Anmelde-Service" wählen, können Sie Ihre Anmeldeeinstellungen konfigurieren.


Service-Instanz

Eigenschaftsseite: Eigenschaften des Standort-Profils

Registerkarte: Services

Geben Sie den Namen einer neuen Service-Instanz ein oder wählen Sie eine vorhandene Service-Instanz aus der Drop-down-Liste aus. Klicken Sie nach Fertigstellung auf "Hinzufügen".


Einstellung

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Einstellungen

Die aktuelle Einstellung des ausgewählten Parameters.


Schaltfläche 'Erweitert' beim Anmelden anzeigen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Gibt an, ob die Schaltfläche "Erweitert" im Dialogfeld "Anmeldung" aktiviert ist. Über diese Schaltfläche können Sie verschiedene Registerkarten aufrufen, mit denen Sie erweiterte Anmeldeparameter festlegen können.


Lösch-Verbindungen beim Anmelden anzeigen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Gibt an, ob das Kontrollkästchen "Verbindungen löschen" im Dialogfeld "Anmeldung" angezeigt wird. Mit Hilfe dieses Kontrollkästchens können Sie alle früheren Verbindung löschen, wenn Sie eine neue Verbindung zum Netzwerk erstellen.


Standortliste beim Anmelden anzeigen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Gibt an, ob die Liste "Standort" im Dialogfeld "Anmeldung" aktiviert ist. Diese Liste führt die Stellen auf, bei denen sich der Benutzer zuletzt angemeldet hat.


TSA-Symbol in der Task-Leiste anzeigen

Eigenschaftsseite: Ziel-Service-Agent

Registerkarte: TSA-Informationen

Aktivieren Sie dieses Kontrollkästchen, wenn das TSA-Symbol in der Task-Leiste angezeigt werden soll.


Schaltfläche "Variablen" beim Anmelden anzeigen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Gibt an, ob die Schaltfläche "Variablen" im Dialogfeld "Anmeldung" aktiviert ist. Über diese Schaltfläche können Sie Anmeldeskriptvariablen eingeben, die bei der Anmeldung des Benutzers verwendet werden.


"Nur Arbeitsstation" beim Anmelden anzeigen
Nur Arbeitsstation

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Aktivieren Sie dieses Kontrollkästchen, wenn das Kontrollkästchen "Nur Arbeitsstation" bei der Anmeldung eines Benutzers verfügbar sein soll.

Aktivieren Sie das Kontrollkästchen "Nur Arbeitsstation" im Dialogfeld "Anmeldung", wenn Sie sich bei der Windows*-Arbeitsstation anmelden möchten, ohne sich beim NetWare®-Netzwerk anzumelden.


Statisch

Markieren Sie das Kontrollkästchen "Statisch", wenn Sie nicht möchten, daß der Liste automatisch Bereiche hinzugefügt werden, die von Verzeichnisagenten dynamisch entdeckt wurden.

Wenn Sie das Kontrollkästchen "Statisch" für die Verzeichnisagentenliste markieren, werden SLP-Anfragen an die Verzeichnisagenten gesendet, deren Adressen oder DNS-Namen in der Liste konfiguriert wurden. Andernfalls sendet SLP Anfragen an alle im Netzwerk bekanntgemachten Verzeichnisagenten.


Status

Eigenschaftsseite: IP-Gateway

Zeigt den Status des IP-Gateways an.

Nachfolgend sehen Sie eine Liste der möglichen Statusnummern mit einer Erklärung:

0   =   Gateway deaktiviert

1   =   Gateway nicht verbunden

2   =   Gateway-Verbindung läuft

3   =   Zeitüberschreitung bei Gateway-Zugriff

4   =   Gateway-Server beschäftigt

5   =   Gateway-Zugriff verweigert

6   =   Gateway verbunden

7   =   Kein Gateway-Server gefunden

8   =   Verbindung von Gateway-Server abgelehnt

9   =   Lokales Netzwerk inaktiv

10   =   Verbindung von Gateway-Client abgebrochen

11   =   Verbindung von Gateway-Server zurückgesetzt


Profil im Basis-/E-Mail-Verzeichnis des Benutzers speichern

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Diese Schaltfläche ist nur verfügbar, wenn auf der Eigenschaftsseite "Erweiterte Anmeldung" das Kontrollkästchen "NetWare®-Speicherung zentraler Profile" aktiviert ist.

Wählen Sie die Option "Profil in Benutzer-Basisverzeichnis speichern", um das zentral gespeicherte Profil im Netzwerk zu speichern. Das Mail-Verzeichnis des Benutzers wird für Bindery-Verbindungen verwendet. Das Basisverzeichnis wird für eDirectory™-Verbindungen verwendet.

Das Speichern des Benutzerprofils im Netzwerk gewährt dem Benutzer dieselbe Desktop-Umgebung auf allen Arbeitsstationen im gesamten Netzwerk. Alle an einer Arbeitsstation vorgenommenen Änderungen an der Benutzerumgebung werden in dem auf dem Netzwerk gespeicherten Profil gespeichert. Die im Profil festgelegte Umgebung ist auf allen Arbeitsstationen verfügbar, bei denen sich der Benutzer anmeldet.


Profil in einem NetWare-Dateisystemverzeichnis speichern

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Diese Schaltfläche ist nur verfügbar, wenn auf der Eigenschaftsseite "Erweiterte Anmeldung" das Kontrollkästchen "NetWare®-Speicherung zentraler Profile" aktiviert ist.

Wählen Sie die Option "Profil in einem NetWare-Dateisystemverzeichnis speichern", um das zentral gespeicherte Profil in einem bestimmten Verzeichnis auf einem NetWare®-Server zu speichern. Mit dieser Option werden die Profile aller Benutzer, die sich bei der Arbeitsstation anmelden, im angegebenen Verzeichnis gespeichert. Diese Option ist besonders zur Verwendung mit verbindlichen Profilen gedacht.

Das Speichern des Benutzerprofils im Netzwerk ermöglicht dem Benutzer die Verwendung derselben Desktop-Umgebung auf allen Arbeitsstationen im gesamten Netzwerk. Alle an einer Arbeitsstation vorgenommenen Änderungen an der Benutzerumgebung werden in dem auf dem Netzwerk gespeicherten Profil gespeichert. Die im Profil festgelegte Umgebung ist auf allen Arbeitsstationen verfügbar, bei denen sich der Benutzer anmeldet.

Wenn Sie diese Option wählen, wird das Bearbeitungsfeld "Pfad" verfügbar. In diesem Bearbeitungsfeld legen Sie den Speicherort für das Profil fest.


Systemkontakt

Eigenschaftsseite: SNMP

Registerkarte: SNMP

Standardwert: Kein

Diese optionale Einstellung legt den Namen des Systemverwalters (Netzwerkverwalters) für Ihre Arbeitsstation fest. Verwenden Sie den tatsächlichen Namen (nicht den Benutzernamen, etc.) der Person, die kontaktiert werden soll, falls Ihre Arbeitsstation gewartet werden muß.

Sie teilt dem SNMP-Manager mit, wer der Systemverwalter Ihrer Arbeitsstation ist. Diese Kontaktinformation kann von SNMP-Management-Stationen abgerufen werden.

Diese Daten können für sich oder zusammen mit dem Systemnamen oder dem Systemstandort verwendet werden.


Systemstandort

Eigenschaftsseite: SNMP

Registerkarte: SNMP

Standardwert: Kein

Diese optionale Einstellung gibt den physikalischen Standort Ihrer Arbeitsstation an.

Sie teilt dem SNMP-Manager den physikalischen Standort Ihrer Arbeitsstation mit. Diese Standortinformation kann von SNMP-Management-Stationen abgerufen werden.

Diese Information kann für sich oder zusammen mit dem Systemkontakt oder dem Systemnamen verwendet werden.


Systemname

Eigenschaftsseite: SNMP

Registerkarte: SNMP

Standardwert: Kein

Diese optionale Einstellung gibt Ihren Benutzernamen an. Verwenden Sie Ihren Benutzer- oder Anmeldenamen - oder Ihren TCP/IP-Hostnamen, falls Sie einen besitzen. Geben Sie beispielsweise KSCHMIDT ein, wenn Ihr Anmeldename KSCHMIDT ist.

Sie teilt dem SNMP-Manager Ihren Benutzernamen mit. Diese Information zum Benutzernamen kann von SNMP-Management-Stationen abgerufen werden.

Diese Daten können für sich oder zusammen mit dem Systemkontakt oder dem Systemstandort verwendet werden.


Marken, Copyright, Gewährleistungsausschluß und Patente

Copyright © 1994-2003 Novell, Inc. Alle Rechte vorbehalten. Vervielfältigung, Reproduktion, Speicherung in einem Informations-Retrievalsystem oder Weitergabe dieser Dokumente, entweder ganz oder auszugsweise, ist ohne die ausdrückliche schriftliche Genehmigung des Herausgebers untersagt.

US-Patent-Nr. 5,157,663; 5,349,642; 5,455,932; 5,553,139; 5,553,143; 5,594,863; 5,608,903; 5,633,931; 5,652,854; 5,671,414; 5,677,851; 5,692,129. In den USA und anderen Ländern zum Patent angemeldet.

Novell, Inc. leistet keinerlei Gewähr bezüglich des Inhalts oder Gebrauchs dieses Handbuchs. Insbesondere werden keine ausdrücklichen oder stillschweigenden Gewährleistungen hinsichtlich der handelsüblichen Qualität oder Eignung für einen bestimmten Zweck übernommen. Novell, Inc. behält sich weiterhin das Recht vor, diese Dokumentation zu revidieren und ihren Inhalt jederzeit und ohne vorherige Ankündigung zu ändern.

Novell, Inc. gibt ebenfalls keine Erklärungen oder Garantien in bezug auf Novell-Softwareprodukte ab und schließt insbesondere jegliche ausdrückliche oder stillschweigende Garantie auf Verkäuflichkeit oder Eignung für einen bestimmten Zweck aus. Außerdem behält sich Novell, Inc. das Recht vor, Novell-Software jederzeit ganz oder teilweise zu ändern, ohne daß für Novell, Inc. die Verpflichtung entsteht, Personen oder Organisationen von diesen Änderungen in Kenntnis zu setzen.

Novell-Marken

Internetwork Packet Exchange und IPX sind Marken von Novell, Inc.

eDirectory ist eine Marke von Novell, Inc.

NetWare ist in den Vereinigten Staaten und in anderen Ländern eine eingetragene Marke von Novell, Inc.

NetWare 4 ist eine Marke von Novell, Inc.

NetWare 5 ist eine Marke von Novell, Inc.

NetWare Core Protocol und NCP sind Marken von Novell, Inc.

NetWare/IP ist eine Marke von Novell, Inc.

Novell ist in den Vereinigten Staaten und in anderen Ländern eine eingetragene Marke von Novell, Inc.

Novell Client ist eine Marke von Novell, Inc.

Open Data-Link Interface und ODI sind Marken von Novell, Inc.

Packet Burst ist eine Marke von Novell, Inc.

Sequenced Packet Exchange und SPX sind Marken von Novell, Inc.

Marken von Drittanbietern

International Business Machines und IBM sind eingetragene Marken der International Business Machines Corporation.

Microsoft ist eine eingetragene Marke der Microsoft Corporation.

MS-DOS ist eine eingetragene Marke von Microsoft Corporation.

Network Driver Interface Specification und NDIS sind Marken von PC-Plus Communications LP.

Windows ist eine eingetragene Marke von Microsoft Corporation.

Windows 95/98 ist eine Marke von Microsoft Corporation.

Windows NT/2000/XP ist eine eingetragene Marke der Microsoft Corporation.


Baum

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Client

Diese Liste ist Teil des Parameters "Baum- und Namenskontextpaar", der den Standort der einzelnen Benutzerobjekte im eDirectory™-Baum für Benutzer von NetWare® 4* und höher, die eDirectory™ verwenden, angibt. Bei der Anmeldung bei einem NetWare 3*-Server oder einem NetWare 4*-Server über Bindery-Services hat dieses Parameterpaar keine Bedeutung.

Der Namenskontext gilt für alle Benutzer, die sich von dieser Arbeitsstation aus bei einem bestimmten Baum anmelden. Da eine Anmeldung bei mehreren Verzeichnisbäumen möglich ist, erhält jeder Baum seinen eigenen Namenskontext. Sie können den Baum und den Namenskontext beim Anmelden ändern. Ein Benutzer kann jedoch nur über jeweils einen Namenskontext in einem beliebigen Baum verfügen.


Baum (Anmeldung)
Baum

Geben Sie den Baum an, der von Arbeitsstations-Manager zum Verwalten Ihrer Arbeitsstation verwendet wird.


Baum- und Katalogpaar

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Kontextlose Anmeldung

Während einer Anmeldesitzung werden verwendbare Kataloge automatisch gefunden. Sie können Baum- und Katalogpaare angeben, damit bei der kontextlosen Anmeldung ein bestimmter Katalog für jeden Baum in der Liste verwendet wird.


Baum- und Namenskontextpaar

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Client

Legt den Speicherort jedes Benutzerobjekts im eDirectory™-Baum für Benutzer von NetWare® 4* oder höher fest, die eDirectory verwenden. Bei der Anmeldung bei einem NetWare 3*-Server oder einem NetWare 4*-Server über Bindery-Services hat dies keine Bedeutung.

Der Namenskontext gilt für alle Benutzer, die sich von dieser Arbeitsstation aus bei einem bestimmten Baum anmelden. Da eine Anmeldung bei mehreren Verzeichnisbäumen möglich ist, erhält jeder Baum seinen eigenen Namenskontext. Sie können den Baum und den Namenskontext beim Anmelden ändern. Ein Benutzer kann jedoch nur über jeweils einen Namenskontext in einem beliebigen Baum verfügen.


Berechtigter Baum

Eigenschaftsseite: Novell® Arbeitsstations-Manager

Registerkarte: Arbeitsstations-Manager

Gibt den vom Arbeitsstations-Manager verwendeten berechtigten Baum an.


Nach oben

Wählen Sie ein Element in der Liste aus und klicken Sie auf "Nach oben", um dieses Element in der Liste um eine Position nach oben zu verschieben.


Alle Komponenten aktualisieren, wenn Komponenten veraltet sind

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Einrichtung

Standardwert: Aktiviert

Falls dieses Kontrollkästchen markiert ist, werden alle Komponenten aktualisiert, wenn Komponentenversionen älter als die neuen Versionen sind. Wenn dieses Kontrollkästchen nicht markiert ist, werden nur veraltete Komponenten aktualisiert.


Alle ermittelten Rahmentypen verwenden

Eigenschaftsseite: IPX 32-bit-Protokoll

Registerkarte: Erweiterter IPX

Standardwert: Ein

Legt fest, ob IPX™ automatisch eine Bindung zu allen erkannten logischen Karten herstellt.

Wenn dieser Parameter auf "Ein" gesetzt ist, stellt IPX automatisch eine Bindung zu allen logischen Karten her. Die LAN-Treiber müssen nicht vor IPX geladen werden. Sollte IPX feststellen, daß ein LAN-Treiber geladen ist, werden die logischen Karten für diesen LAN-Treiber gebunden.

Falls IPX nicht alle angebotenen logischen Karten verwenden muß, können Sie die Leistung Ihrer Arbeitsstation verbessern, indem Sie mit Hilfe der Einstellung "Nur folgende Rahmentypen verwenden" nur die benötigten logischen Karten angeben.


Kontext verwenden (DHPC)
Kontext verwenden (DHCP)

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: DHCP-Einstellungen

Standardwert: Deaktiviert

Fragt den DHCP-Server nach Kontextinformationen ab und überträgt diese Informationen in den Abschnitt "Anmelde-Service" des aus der Drop-Down-Liste ausgewählten Standortprofils.


DHCP verwenden

Eigenschaftsseite: Novell® IPX™-Kompatibilitätsadapter

Registerkarte: Parameter

Standardwert: Aktiviert

Wenn DHCP aktiviert ist, versuchen die IPX-Kompatibilitätstreiber, Konfigurationsinformationen zu den Parametern Netzwerknummer, Agentenlisten-Verfallszeit und Migrationsagent über DHCP zu erhalten. Wenn keine Konfigurationsinformationen über DHCP ermittelt werden können, werden vom Kompatibilitätsmodus Standardeinstellungen verwendet.


Standardeinstellungen verwenden

Eigenschaftsseite: Novell® IPX™-Kompatibilitätsadapter

Registerkarte: Parameter

Standardwert: Aktiviert

Wenn "Standardeinstellungen verwenden" aktiviert ist, verwendet der Adapter die im Feld "Adapter" unter "Standardeinstellungen" festgelegten Einstellungen.

Wenn "Standardeinstellungen verwenden" nicht aktiviert ist, verwendet der Adapter die von Ihnen spezifizierten Einstellungen.


Angepaßten NWIP-Anschluß verwenden

Eigenschaftsseite: NetWare/IP-Konfiguration

Registerkarte: Parameter

Standardwert: Aus

Diese Option ist für Netzwerke gedacht, in denen der standardmäßige NWIP-Anschluß (0xABCD) nicht benutzt wird. Die Konfiguration des geeigneten NWIP-Standardanschlusses verbessert das Starten von NWIP-Clients in NetWare/IP* 2.2 Netzwerken.


Novell-GINA verwenden
Novell-GINA verwenden, wenn Drittanbieter-GINA gefunden wird

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Client

Standardwert: Ein

Gibt an, ob der Novell® Client™ für Windows* NT/2000/XP* GINA Authenticator installiert wird, wenn ein GINA eines Drittherstellers erkannt wird.

Wenn der Parameter "Verwendung von Novell-GINA empfehlen" auf "Nein" und "Novell-GINA verwenden, wenn Drittanbieter-GINA gefunden wird" auf "Ja" eingestellt ist, wird Novell-GINA immer installiert.

Wenn der Parameter "Verwendung von Novell-GINA empfehlen" auf "Nein" und "Novell-GINA verwenden, wenn Drittanbieter-GINA gefunden wird" auf "Nein" eingestellt ist, wird Novell-GINA nicht verwendet, falls ein Drittanbieter-GINA vorhanden ist (außer beim Microsoft*-GINA, der immer ersetzt wird).

Wenn der Parameter "Verwendung von Novell-GINA empfehlen" auf "Ja" eingestellt ist, bestimmt die Einstellung "Verwenden", welche Schaltfläche im Dialogfeld die Standardschaltfläche ist.


Nur folgende Rahmentypen verwenden

Eigenschaftsseite: IPX 32-bit-Protokoll

Registerkarte: Erweiterter IPX

Standardwert: Aus

Legt die logischen Karten fest, an die IPX™ bindet. Zur Angabe der logischen Karten bestimmen Sie den Rahmentyp. Wählen Sie jedes Mal "Hinzufügen", um einen Rahmentyp in die Liste aufzunehmen.

Sollte IPX nicht alle angebotenen logischen Karten benötigen, können Sie über diese Einstellung nur die benötigten logischen Karten angeben und so die Leistung Ihrer Arbeitsstation verbessern.


Baum verwenden (DHCP)

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: DHCP-Einstellungen

Standardwert: Deaktiviert

Fragt den DHCP-Server nach Bauminformationen ab und überträgt diese Informationen in den Abschnitt "Anmelde-Service" des aus der Drop-Down-Liste ausgewählten Standortprofils.


Benutzer

Eigenschaftsseite: IP-Gateway

Der Name des Benutzers, der gerade das IP-Gateway verwendet.


Benutzername (TSA)
Benutzername

Eigenschaftsseite: Ziel-Service-Agent

Registerkarte: TSA-Informationen

Geben Sie den Namen des Benutzers ein, der berechtigt ist, den Ziel-Service-Agent auf der Arbeitsstation auszuführen.


Variablen %2
Variablen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Zur Verwendung in den Anmeldeskripten können Sie bis zu vier Variablen definieren. Die Einrichtung der Anmeldeskripten zur Verwendung dieser Variablen können entweder Sie selbst oder Ihr Netzwerkverwalter vornehmen.

Sie könnten beispielsweise eine Variable definieren, mit der ein Laufwerk dem Mail-Server zugeordnet wird.

So definieren Sie eine Variable:

Hinweis: Hierzu müssen Sie zunächst die Kontrollkästchen "Schaltfläche 'Erweitert'" und "Schaltfläche 'Variablen'" auf der Eigenschaftsseite "Erweiterte Anmeldung" aktivieren. Falls sich im Dialogfeld "NetWare-Anmeldung" keine Schaltfläche mit der Bezeichnung "Erweitert" befindet, wissen Sie, daß diese Kontrollkästchen nicht aktiviert wurden.

1. Klicken Sie mit der rechten Maustaste auf das rote "N"-Symbol in der Task-Leiste.

2. Klicken Sie auf "NetWare-Anmeldung" > "Erweitert" > "Skript" > "Variablen".

3. Geben Sie in den entsprechenden Feldern die Variablen ein, die Sie verwenden möchten. Die maximale Länge von Variablen beträgt 64 Zeichen.

Diese Parameter sind das Gegenstück zu den entsprechenden Parametern, die mit dem Befehl LOGIN in DOS übergeben werden können.


Variablen %3
Variablen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Zur Verwendung in den Anmeldeskripten können Sie bis zu vier Variablen definieren. Die Einrichtung der Anmeldeskripten zur Verwendung dieser Variablen können entweder Sie selbst oder Ihr Netzwerkverwalter vornehmen.

Sie könnten beispielsweise eine Variable definieren, mit der ein Laufwerk dem Mail-Server zugeordnet wird.

So definieren Sie eine Variable:

Hinweis: Hierzu müssen Sie zunächst die Kontrollkästchen "Schaltfläche 'Erweitert'" und "Schaltfläche 'Variablen'" auf der Eigenschaftsseite "Erweiterte Anmeldung" aktivieren. Falls sich im Dialogfeld "NetWare-Anmeldung" keine Schaltfläche mit der Bezeichnung "Erweitert" befindet, wissen Sie, daß diese Kontrollkästchen nicht aktiviert wurden.

1. Klicken Sie mit der rechten Maustaste auf das rote "N"-Symbol in der Task-Leiste.

2. Klicken Sie auf "NetWare-Anmeldung" > "Erweitert" > "Skript" > "Variablen".

3. Geben Sie in den entsprechenden Feldern die Variablen ein, die Sie verwenden möchten. Die maximale Länge von Variablen beträgt 64 Zeichen.

Diese Parameter sind das Gegenstück zu den entsprechenden Parametern, die mit dem Befehl LOGIN in DOS übergeben werden können.


Verbose

Eigenschaftsseite: NetWare/IP-Konfiguration

Registerkarte: Parameter

Standardwert: Aus

Aktivieren Sie dieses Kontrollkästchen, wenn Sie Fehler in NetWare®/IP* suchen müssen. Wenn dieser Parameter auf "Ein" gesetzt ist, werden zusätzliche NetWare/IP-Meldungen protokolliert.


Version

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Client

Zeigt die Versionsnummer des Client an.


Suche mit Platzhaltern zugelassen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Kontextlose Anmeldung

Standardwert: Deaktiviert (nicht markiert)

Wenn Sie die Suche mit Platzhaltern zulassen, können Sie Platzhalter im Benutzernamen verwenden, anstatt den ganzen Benutzernamen einzugeben.

Beispielsweise könnte ein Benutzer mit dem Benutzernamen JLOPEZ als Suchzeichenkette JLOPEZ* eingeben.


Arbeitsstations-eDirectory-Aktualisierungsrate

Eigenschaftsseite: Novell® Arbeitsstations-Manager

Registerkarte: Arbeitsstations-Manager

Bereich: 1 bis 60000 (Minuten)

Standardwert: 30

Nachdem Sie der Arbeitsstations-Manager-Service beglaubigt hat, fragt er in regelmäßigen Abständen eDirectory™ ab, um festzustellen, ob geplante Aktionen der Arbeitsstation zugeordnet oder von dieser entfernt wurden. Über diese Einstellung kann der Netzwerkverwalter die Abstände zwischen den Aktualisierungen ändern.


Impulse
Impuls

Auf IBM*-PCs und kompatiblen PCs besteht eine Sekunde aus etwa 18,21 Impulsen. Davon ausgehend gilt folgendes:

3 Sekunden entsprechen etwa 54 Impulsen

30 Sekunden entsprechen etwa 545 Impulsen

1 Minute entspricht etwa 1090 Impulsen

5 Minuten entsprechen etwa 5460 Impulsen


Variablen %4
Variablen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Zur Verwendung in den Anmeldeskripten können Sie bis zu vier Variablen definieren. Die Einrichtung der Anmeldeskripten zur Verwendung dieser Variablen können entweder Sie selbst oder Ihr Netzwerkverwalter vornehmen.

Sie könnten beispielsweise eine Variable definieren, mit der ein Laufwerk dem Mail-Server zugeordnet wird.

So definieren Sie eine Variable:

Hinweis: Hierzu müssen Sie zunächst die Kontrollkästchen "Schaltfläche 'Erweitert'" und "Schaltfläche 'Variablen'" auf der Eigenschaftsseite "Erweiterte Anmeldung" aktivieren. Falls sich im Dialogfeld "NetWare-Anmeldung" keine Schaltfläche mit der Bezeichnung "Erweitert" befindet, wissen Sie, daß diese Kontrollkästchen nicht aktiviert wurden.

1. Klicken Sie mit der rechten Maustaste auf das rote "N"-Symbol in der Task-Leiste.

2. Klicken Sie auf "NetWare-Anmeldung" > "Erweitert" > "Skript" > "Variablen".

3. Geben Sie in den entsprechenden Feldern die Variablen ein, die Sie verwenden möchten. Die maximale Länge von Variablen beträgt 64 Zeichen.

Diese Parameter sind das Gegenstück zu den entsprechenden Parametern, die mit dem Befehl LOGIN in DOS übergeben werden können.


Variablen %5
Variablen

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Zur Verwendung in den Anmeldeskripten können Sie bis zu vier Variablen definieren. Die Einrichtung der Anmeldeskripten zur Verwendung dieser Variablen können entweder Sie selbst oder Ihr Netzwerkverwalter vornehmen.

Sie könnten beispielsweise eine Variable definieren, mit der ein Laufwerk dem Mail-Server zugeordnet wird.

So definieren Sie eine Variable:

Hinweis: Hierzu müssen Sie zunächst die Kontrollkästchen "Schaltfläche 'Erweitert'" und "Schaltfläche 'Variablen'" auf der Eigenschaftsseite "Erweiterte Anmeldung" aktivieren. Falls sich im Dialogfeld "NetWare-Anmeldung" keine Schaltfläche mit der Bezeichnung "Erweitert" befindet, wissen Sie, daß diese Kontrollkästchen nicht aktiviert wurden.

1. Klicken Sie mit der rechten Maustaste auf das rote "N"-Symbol in der Task-Leiste.

2. Klicken Sie auf "NetWare-Anmeldung" > "Erweitert" > "Skript" > "Variablen".

3. Geben Sie in den entsprechenden Feldern die Variablen ein, die Sie verwenden möchten. Die maximale Länge von Variablen beträgt 64 Zeichen.

Diese Parameter sind das Gegenstück zu den entsprechenden Parametern, die mit dem Befehl LOGIN in DOS übergeben werden können.


Server (DHCP) verwenden

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: DHCP-Einstellungen

Standard: Deaktiviert

Hiermit lassen Sie eine Abfrage nach Serverinformationen an den DHCP-Server richten und diese Informationen in den Abschnitt "Anmeldeservice" des in der Liste markierten Standortprofils übernehmen.

Wenn das Kontrollkästchen "Binärdaten" aktiviert ist, handelt es sich bei den vom DHCP-Server empfangenen Daten um eine IP-Adresse (Binärdaten).

Wenn das Kontrollkästchen nicht aktiviert ist (Standardeinstellung), handelt es sich bei den vom DHCP-Server empfangenen Daten um Server-, Baum- und Kontextinformationen (Zeichenkettendaten).


Kontextlose LDAP-Anmeldung aktivieren

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung

Standard: Deaktiviert

Mit diesem Kontrollkästchen aktivieren Sie die kontextlose LDAP-Anmeldung. Auf dem Unternehmensserver mit dem Unternehmensbaum muss LDAP-Services für eDirectory™ installiert sein, damit Sie die kontextlose LDAP-Anmeldung nutzen können.


Kontextlose LDAP-Anmeldung - Anschluss

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung

Geben Sie den Anschluss an, den die kontextlose LDAP-Anmeldung für die Kommunikation mit dem LDAP-Server verwendet.


Kontextlose LDAP-Anmeldung - Verbindungszeitüberschreitung

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung

Standard: 10 Sekunden

Geben Sie die Anzahl von Sekunden an, die die kontextlose LDAP-Anmeldung abwarten soll, bevor eine Anforderung abgebrochen wird.


Kontextlose LDAP-Anmeldung - Zertifikat
Kontextlose LDAP-Anmeldung - Name und Standort des Zertifikats

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung

Geben Sie den Pfad und den Namen des Zertifikats auf der Arbeitsstation an, das von der kontextlosen LDAP-Anmeldung verwendet wird, um eine sichere Verbindung mit dem LDAP-Server herzustellen.


LDAP-Liste "Bäume"

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung

Hier werden die während der Anmeldung durchsuchten Bäume aufgelistet, auf denen LDAP-Services ausgeführt werden.


LDAP-Baum - Hinzufügen (Schaltfläche)
LDAP-Baum - Schaltfläche "Hinzufügen"

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung

Um einen Baum, auf dem LDAP-Services ausgeführt werden, zu der Liste der während der Anmeldung durchsuchten Bäume hinzuzufügen, geben Sie einen Baumnamen in das Feld "Bäume" ein und klicken Sie anschließend auf "Hinzufügen".


LDAP-Baum - Löschen (Schaltfläche)
LDAP-Baum - Schaltfläche "Löschen"

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung

Um einen oder mehrere Bäume, auf denen LDAP-Services ausgeführt werden, zu löschen, wählen Sie die Bäume aus und klicken Sie anschließend auf "Löschen". Der entsprechende Baum wird während der Anmeldung nicht mehr durchsucht.


LDAP-Baum - Eigenschaften (Schaltfläche)
LDAP-Baum - Schaltfläche "Eigenschaften"

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung

Um die Kontextbereichsinformationen für einen Baum festzulegen, wählen Sie einen Baum in der Liste aus und klicken Sie anschließend auf "Eigenschaften". Sie können den Suchbereich einschränken, indem Sie die Option "Nur Suchkontext" aktivieren.


LDAP-Liste "Server"

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung

Hier werden die Server aufgelistet, die mit dem Baum verknüpft sind, auf dem LDAP-Services ausgeführt werden.


LDAP-Server - Hinzufügen (Schaltfläche)
LDAP-Server - Schaltfläche "Hinzufügen"

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung

Um einen Server hinzuzufügen, der mit dem LDAP-Services-Baum verknüpft ist, geben Sie einen Servernamen in das Feld "Server" ein und klicken Sie anschließend auf "Hinzufügen". Die Server werden in der Reihenfolge durchsucht, in der sie in dieser Liste aufgeführt werden. Diese Suchreihenfolge kann auch geändert werden.


LDAP-Server - Löschen (Schaltfläche)
LDAP-Server - Schaltfläche "Löschen"

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung

Zum Löschen von einem oder mehreren LDAP-Servern wählen Sie die Server aus und klicken Sie anschließend auf "Löschen".


LDAP-Server - Eigenschaften (Schaltfläche)
LDAP-Server - Schaltfläche "Eigenschaften"

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung

Um die Einstellungen für die LDAP-Server-Zeitüberschreitung und -Datenverschlüsselung festzulegen, wählen Sie einen Server in der Liste aus und klicken Sie anschließend auf "Eigenschaften".


LDAP-Server - Nach oben (Schaltfläche)
LDAP-Server - Schaltfläche "Nach oben"

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung

Wählen Sie den Server aus, der in der Suchliste verschoben werden soll, und klicken Sie dann auf "Nach oben". Der Server wird in der Suchliste um eine Stelle nach oben verschoben. Server werden in der Reihenfolge durchsucht, in der sie in der Liste erscheinen.


LDAP-Server - Nach unten (Schaltfläche)
LDAP-Server - Schaltfläche "Nach unten"

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung

Wählen Sie den Server aus, der in der Suchliste verschoben werden soll, und klicken Sie dann auf "Nach unten". Der Server wird in der Suchliste um eine Stelle nach unten verschoben. Server werden in der Reihenfolge durchsucht, in der sie in der Liste erscheinen.


LDAP-Kontextsuchbereich aktivieren

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung: Kontextsuchbereich

Standard: Deaktiviert

Der Suchbereich kann auf einen bestimmten Kontext oder einen bestimmten Kontext und Teilbaum eingeschränkt werden.


Liste "Kontexte"

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung: Kontextsuchbereich

Hier werden die Kontexte im Baum aufgelistet, die bei der kontextlosen LDAP-Anmeldung durchsucht werden. Kontexte werden in der Reihenfolge durchsucht, in der sie in der Liste erscheinen.

Geben Sie den Kontext als eindeutigen LDAP-Kontext mit Kommabegrenzungszeichen ein (Beispiel: ou=organisatorische_Einheit,o=Organisation).

Die kontextlose LDAP-Anmeldung sucht von dem im Baum angegebenen Kontext aus nach dem Benutzer.

Es darf immer nur ein Kontextsuchbereich angegeben werden. Kontextsuchbereiche werden in der Reihenfolge durchsucht, in der sie in der Liste erscheinen. Diese Suchreihenfolge kann auch geändert werden.


Kontext - Hinzufügen (Schaltfläche)
Kontext - Schaltfläche "Hinzufügen"

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung: Kontextsuchbereich

Geben Sie den Kontext ein, der von der kontextlosen LDAP-Anmeldung durchsucht werden soll, und klicken Sie dann auf "Hinzufügen". Der Kontext muss als eindeutiger LDAP-Kontext mit Kommabegrenzungszeichen eingeben werden (Beispiel: ou=organisatorische_Einheit,o=Organisation).

Die kontextlose LDAP-Anmeldung sucht von dem im Baum angegebenen Kontext aus nach dem Benutzer.


Kontext - Löschen (Schaltfläche)
Kontext Schaltfläche "Löschen"

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung: Kontextsuchbereich

Wählen Sie einen oder mehrere Kontexte in dem Baum aus, die Sie in der Suchliste der kontextlosen LDAP-Anmeldung löschen möchten, und klicken Sie anschließend auf "Löschen". Die gelöschten Kontexte werden nicht mehr durchsucht.


Kontext - Ersetzen (Schaltfläche)
Kontext - Schaltfläche "Ersetzen"

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung: Kontextsuchbereich

Wählen Sie einen Kontext aus, der in der Liste der Kontexte ersetzt werden soll. Geben Sie dann die Informationen zu dem neuen Kontext in die Liste "Kontexte" ein und klicken Sie anschließend auf "Ersetzen". Geben Sie den Kontext als eindeutigen LDAP-Kontext mit Kommabegrenzungszeichen ein (Beispiel: ou=organisatorische_Einheit,o=Organisation). Die älteren Kontextinformationen werden durch die neuen Kontextinformationen ersetzt, die Reihenfolge der Kontexte in der Liste bleibt gleich.


Kontext - Nach oben (Schaltfläche)
Kontext Schaltfläche "Nach oben"

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung: Kontextsuchbereich

Wählen Sie den Kontext aus, der in der Suchliste verschoben werden soll, und klicken Sie dann auf "Nach oben". Der Kontext wird in der Suchliste um eine Stelle nach oben verschoben. Kontexte werden in der Reihenfolge durchsucht, in der sie in der Liste erscheinen.


Kontext - Nach unten (Schaltfläche)
Kontext Schaltfläche "Nach unten"

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung: Kontextsuchbereich

Wählen Sie den Kontext aus, der in der Suchliste verschoben werden soll, und klicken Sie dann auf "Nach unten". Der Kontext wird in der Suchliste um eine Stelle nach unten verschoben. Kontexte werden in der Reihenfolge durchsucht, in der sie in der Liste erscheinen.


Baumlose Anmeldung aktivieren
Baumlose LDAP-Anmeldung aktivieren

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung

Standard: Deaktiviert

Mit diesem Kontrollkästchen aktivieren Sie die baumlose Anmeldung. Mit der baumlosen Anmeldung können Sie sich beim Netzwerk anmelden, ohne einen Baum anzugeben.


Kontextlose LDAP-Anmeldung - Unverschlüsselte Passwörter
Kontextlose LDAP-Anmeldung - Unverschlüsselte Daten

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung: LDAP-Servereigenschaften

Aktivieren Sie "Unverschlüsselte Daten", um Passwörter im unverschlüsselten Format zu übertragen. Die Verwendung unverschlüsselter Daten ist weniger sicher als die Verwendung von SSL.


Kontextlose LDAP-Anmeldung - Verschlüsselte Daten (SSL)

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung: LDAP-Servereigenschaften

Um Daten mithilfe von SSL (Secure Socket Layer) zu verschlüsseln, aktivieren Sie "Verschlüsselte Daten (SSL)".


Kontextlose LDAP-Anmeldung - Anschluss für verschlüsselte Daten (SSL)

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung: LDAP-Servereigenschaften

Geben Sie den Anschluss an, den die kontextlose LDAP-Anmeldung für die Kommunikation mit dem LDAP-Server bei Verwendung der SSL-Verschlüsselung verwendet.


Kontextlose LDAP-Anmeldung - Suchzeitüberschreitung

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung: LDAP-Servereigenschaften

Standard: 10 Sekunden

Geben Sie die Anzahl von Sekunden an, die die kontextlose LDAP-Anmeldung suchen soll, bevor eine Suche abgebrochen wird.


Suchkontext und Teilbaum

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung: Kontextsuchbereich

Um eine Suche im angegebenen Kontext und allen Containern in diesem Kontext zu aktivieren, wählen Sie "Suchkontext und Teilbaum".


Kontextsuche - Nur Kontext
Nur Suchkontext

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Kontextlose LDAP-Anmeldung

Um eine Suche nur im angegebenen Kontext zu aktivieren, wählen Sie "Nur Suchkontext".


Automatischen Aktualisierungsagenten aktivieren

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Aktualisierungsagent

Standard: Deaktiviert

Aktivieren Sie das Novell Client-Kontrollkästchen "Automatischen Aktualisierungsagenten aktivieren", damit der automatische Novell Client-Aktualisierungsagent automatisch gestartet wird. Der Aktualisierungsagent prüft im festgelegten Intervall und an den festgelegten Orten, ob eine neue Version von Novell Client vorhanden ist. Der Aktualisierungsagent wird automatisch als Teil des Anmeldungsvorgangs gestartet.  Wenn der Aktualisierungsagent nicht automatisch gestartet werden soll, deaktivieren Sie dieses Kontrollkästchen.


Automatischer Aktualisierungsagent - Startintervall

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Aktualisierungsagent

Standard: 7 Tage

Legen Sie das Intervall (in Tagen) fest, in dem der automatische Novell Client-Aktualisierungsagent nach einer neuen Version von Novell Client sucht. Standard=


Automatischer Aktualisierungsagent - Aktualisierungsort aktivieren

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Aktualisierungsagent

Standard: Deaktiviert

Aktivieren Sie die Aktualisierungsorte, damit der automatische Novell Client-Aktualisierungsagent nach einer neuen Version von Novell Client an dem angegebenen Aktualisierungsort sucht.

Der Aktualisierungsagent sucht in der folgenden Reihenfolge der aktivierten Orte nach Aktualisierungen: Zuerst wird am Aktualisierungsort gesucht, als Zweites wird der vorherige Installationsort durchsucht.

Hinweis: Der Aktualisierungsagent sucht an jedem aktivierten Ort nach gültigen Dateitypen und stoppt, sobald er gültige Dateitypen gefunden hat. Stellen Sie sicher, dass sich die neuesten Dateien an dem ersten Ort befinden, den der Aktualisierungsagent durchsucht.


Automatischer Aktualisierungsagent - Ort
Automatischer Aktualisierungsagent - Aktualisierungsort

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Aktualisierungsagent

Geben Sie den Ort an, an dem der automatische Aktualisierungsagent nach neuen Versionen der Novell Client-Software suchen soll. Dies kann ein UNC-Pfad, ein zugeordnetes Laufwerk oder eine URL sein.


Automatischer Aktualisierungsagent - Vorherigen Installationsort aktivieren

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Aktualisierungsagent

Standard: Deaktiviert

Aktivieren Sie diese Option, um festzulegen, dass der automatische Novell Client-Aktualisierungsagent nach einer neuen Version der Novell Client-Software an dem Ort suchen soll, von dem aus die Novell Client-Software bei der letzten Installation installiert wurde. Dieser Ort kann nicht bearbeitet werden.

Der Aktualisierungsagent sucht in der folgenden Reihenfolge der aktivierten Orte nach Aktualisierungen: Zuerst wird am Aktualisierungsort gesucht, als Zweites wird der vorherige Installationsort durchsucht.

Hinweis: Der Aktualisierungsagent sucht an jedem aktivierten Ort nach gültigen Dateitypen und stoppt, sobald er gültige Dateitypen gefunden hat. Stellen Sie sicher, dass sich die neuesten Dateien an dem ersten Ort befinden, den der Aktualisierungsagent durchsucht.


Automatischer Aktualisierungsagent - Vorheriger Installationsort

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Aktualisierungsagent

Hier wird der Ort angezeigt, von dem aus Novell Client installiert wurde. Dieser Ort kann nicht bearbeitet werden.


Website für die Novell Client-Aktualisierung aktivieren

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Aktualisierungsagent

Standard: Deaktiviert

Aktivieren Sie diese Option, damit der automatische Novell Client-Aktualisierungsagent nach einer neuen Version von Novell Client auf der angegebenen Website sucht.

Der Aktualisierungsagent sucht in der folgenden Reihenfolge der aktivierten Orte nach Aktualisierungen: Zuerst wird am Aktualisierungsort gesucht, als Zweites wird der vorherige Installationsort durchsucht und als Drittes die Website für die Novell Client-Aktualisierung.

Hinweis: Der Aktualisierungsagent sucht an jedem aktivierten Ort nach gültigen Dateitypen und stoppt, sobald er gültige Dateitypen gefunden hat. Stellen Sie sicher, dass sich die neuesten Dateien an dem ersten Ort befinden, den der Aktualisierungsagent durchsucht.


Website für die Novell Client-Aktualisierung - Ort
Website für die Novell Client-Aktualisierung - Aktualisierungsort

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Aktualisierungsagent

Geben Sie die Website an, auf der der automatische Aktualisierungsagent nach neuen Versionen der Software Novell Client suchen soll. Dies kann eine IP-Adresse oder ein DNS-Hostname sein.


Automatischer Aktualisierungsagent - Datei zur unbeaufsichtigten Installation

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Aktualisierungsagent

Geben Sie den Namen der Datei zur unbeaufsichtigten Installation ein, die der automatische Aktualisierungsagent verwendet, um festzustellen, ob Novell Client aktualisiert werden sollte. Die Datei zur unbeaufsichtigten Installation muss sich am Aktualisierungsort oder am vorherigen Installationsort befinden, wenn diese Orte aktiviert sind. Die Datei zur unbeaufsichtigten Installation kann nicht angegeben werden, wenn die Website für Novell Client-Aktualisierung aktiviert ist.


Automatischer Aktualisierungsagent - Support Pack-Aktualisierung aktivieren

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Aktualisierungsagent

Standard: Deaktiviert

Aktivieren Sie diese Option, damit der automatische Novell Client-Aktualisierungsagent nach einem Support Pack an den angegebenen Aktualisierungsorten sucht.

Hinweis: Der Aktualisierungsagent sucht an jedem aktivierten Ort nach gültigen Dateitypen und stoppt, sobald er gültige Dateitypen gefunden hat. Stellen Sie sicher, dass sich die neuesten Dateien an dem ersten Ort befinden, den der Aktualisierungsagent durchsucht.


DHCP-Binärdaten (Kontrollkästchen)
Kontrollkästchen "Binärdaten" (DHCP)

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: DHCP-Einstellungen

Standard: Deaktiviert

Wenn das Kontrollkästchen "Binärdaten" für DHCP aktiviert ist, handelt es sich bei den vom DHCP-Server empfangenen Daten um eine IP-Adresse (Binärdaten).

Wenn das Kontrollkästchen nicht aktiviert ist (Standardeinstellung), handelt es sich bei den vom DHCP-Server empfangenen Daten um Server-, Baum- und Kontextinformationen (Zeichenkettendaten).


Umgehung der Novell-Erstanmeldung

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Standard: Deaktiviert

Um das anfängliche Novell-Anmeldefenster beim Starten der Arbeitsstation zu deaktivieren, deaktivieren Sie diese Option.


OEM-Passwort mit erweiterten ASCII-Zeichen
Erweitertes OEM-ASCII-Passwort

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Standard: Deaktiviert

Aktivieren Sie diese Option, um die erweiterten OEM-ASCII-Zeichen in Passwörtern zu verwenden. Sie sollten nur erweiterte OEM-ASCII-Zeichen verwenden, wenn Sie mit Vorläuferprogrammen arbeiten, die die OEM-Codepage verwenden.

Die neuesten Versionen von Novell Client unterstützen erweiterte ASCII-Zeichen unter Verwendung der UNICODE-Codepage und benötigen diese Einstellung für die Behandlung von Sonderzeichen wie Ñ oder €.


NMAS-Beglaubigung

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Standard: Aktiviert

Aktivieren Sie diese Option, um die NMAS-Services (Novell Modular Authentication Services) bei der Anmeldung zu verwenden. Die NMAS-Beglaubigung erhöht die Sicherheit im Netzwerk. Wenn Ihr Netzwerk jedoch nicht NMAS verwendet, kann die Anmeldung länger dauern. In diesem Fall kann eine Deaktivierung der NMAS-Beglaubigung sinnvoll sein.


Beim Anmelden anzeigen - Baum

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Standard: Aktiviert

Gibt an, ob die Baumanzeige im Dialogfeld "Anmeldung" aktiviert ist.


Beim Anmelden anzeigen - Schaltfläche zum Durchsuchen des Baums

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Standard: Aktiviert

Gibt an, ob die Schaltfläche zum Durchsuchen des Baumes im Dialogfeld "Anmeldung" angezeigt wird.


Beim Anmelden anzeigen - Kontext

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Standard: Aktiviert

Gibt an, ob der Kontext im Dialogfeld "Anmeldung" angezeigt wird.


Beim Anmelden anzeigen - Schaltfläche für die Kontextsuche

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Standard: Aktiviert

Gibt an, ob die Schaltfläche für die Kontextsuche im Dialogfeld "Anmeldung" angezeigt wird.


Abmeldung erzwingen (Schaltfläche) anzeigen
Schaltfläche "Abmeldung erzwingen" anzeigen

Eigenschaftsseite: Novell®-Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Standard: Deaktiviert

Gibt an, ob die Schaltfläche "Abmeldung erzwingen" im Dialogfeld "Anmeldung" angezeigt wird, die bei Sperren der Arbeitsstation angezeigt wird. Über die Schaltfläche "Abmeldung erzwingen" können Sie die Novell Client-Sitzung des zuvor angemeldeten Benutzers beenden, auch wenn er die Arbeitsstation gesperrt hat.

Achtung: Alles, was geöffnet ist und vom vorheriger Benutzer nicht gespeichert wurde, geht dabei verloren. Um geöffnete Anwendungen und aktuelle Netzwerkverbindungen zu erhalten, melden Sie sich unter dem Benutzernamen und dem Passwort des vorherigen Benutzers an.


Single Sign-on für diese Anmeldung unterdrücken

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Erweiterte Anmeldung

Gibt an, ob das Kontrollkästchen "Single Sign-on für diese Anmeldung unterdrücken" im Dialogfeld "Anmeldung" angezeigt wird. Dieses Kontrollkästchen wird im Dialogfeld "Anmeldung" nur dann angezeigt, wenn Novell Single Sign-on auf der Arbeitsstation installiert ist. Das Kontrollkästchen ermöglicht es Ihnen, den Single Sign-on-Prozess für den aktuellen Anmeldeversuch zu deaktivieren.


Aktualisierungsaufforderung unterdrücken

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Aktualisierungsagent

Standard: Deaktiviert

Aktivieren Sie dieses Kontrollkästchen zur Unterdrückung der Aktualisierungsaufforderung, die angezeigt wird, wenn der Aktualisierungsagent feststellt, dass eine Aktualisierung erforderlich ist. Die Aktualisierung wird in diesem Fall ohne Bestätigung des Benutzers gestartet.


NICI und NMAS installieren
NMAS installieren

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Einrichtung

Standard: Aktiviert

Wenn dieses Kontrollkästchen aktiviert ist, wird Novell Modular Authentication Services™ (NMAS™) installiert. NMAS ist ein integraler Bestandteil der Passwortbeglaubigung von NetWare® 6.5 oder höher. Wenn NMAS in Ihrem Netzwerk nicht verwendet wird, diese Komponente aber installiert ist, dauert die Anmeldung vermutlich länger. Deaktivieren Sie dieses Kontrollkästchen, wenn diese Komponente nicht installiert werden soll.

Hinweis: Dieses Produkt kann, wenn es installiert ist, auch auf der Seite "Novell Client-Konfiguration – Erweiterte Anmeldung" deaktiviert werden. Deaktivieren Sie dazu das Kontrollkästchen "NMAS-Beglaubigung".


NetIdentity installieren

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Einrichtung

Standard: Deaktiviert

Wenn dieses Kontrollkästchen aktiviert ist, wird der Agent NetIdentity installiert. Dieser Agent stellt gemeinsam mit der Novell® Client™-Beglaubigung Hintergrundinformationen für Webanwendungen bereit, die eine Novell eDirectory™-Beglaubigung erfordern (z. B. Novell iManager, iPrint und Novell iFolder®).

Ist der Agent installiert und die eDirectory-Beglaubigung über die Novell Client-Anmeldung oder eine Webanwendung erfolgt, die den Agent NetIdentity nutzt, muss sich der Benutzer nicht erneut anmelden, wenn er eine andere Anwendung öffnet, für die eine eDirectory-Beglaubigung erforderlich ist.

Wenn das Kontrollkästchen deaktiviert ist, wird der Agent NetIdentity nicht installiert. Die Benutzer müssen sich in diesem Fall bei jeder Anwendung erneut anmelden.


Verwalterrechte für Aktualisierungsagent aktivieren

Eigenschaftsseite: Novell® Client™-Konfiguration

Registerkarte: Aktualisierungsagent

Standard: Aktiviert

Aktivieren Sie dieses Kontrollkästchen, um sicherzustellen, dass der Novell Client-Aktualisierungsagent auf der Arbeitsstation über Verwalterrechte verfügt. Diese Rechte benötigt der Aktualisierungsagent zur Aktualisierung des Novell Client. Das Kontrollkästchen sollten Sie aktivieren, wenn der Benutzer, der sich bei der Arbeitsstation anmeldet, nicht der Verwalter der Arbeitsstation ist.

Wenn das Kontrollkästchen deaktiviert ist, wird der Aktualisierungsagent mit den Rechten des aktuell angemeldeten Benutzers gestartet.


NICI installieren

Eigenschaftsseite: Installationskonfiguration

Registerkarte: Einrichtung

Standard: Aktiviert

Wenn dieses Kontrollkästchen aktiviert ist, wird Novell® International Cryptographic Infrastructure (NICI) installiert. NICI ist für Novell Modular Authentication Services™ (NMAS™) und weitere Produkte von Novell erforderlich. Falls Sie NMAS oder andere Produkte, für die NICI erforderlich ist, nicht verwenden, müssen Sie dieses Produkt nicht installieren. Deaktivieren Sie dieses Kontrollkästchen, wenn diese Komponente nicht installiert werden soll.